SET FOREIGN_KEY_CHECKS = 0;

INSERT IGNORE INTO `wfc_system_db`.`sys_menu` VALUES (2033, 'menu.device.alerts.management', 2028, 21, '/device/alerts', 'view.device_alerts', NULL, 1, 0, 'C', '0', '0', '', 'carbon:ai-results-low', 'admin', '2025-06-04 15:35:21', '', '2025-06-04 15:37:11', '', 'device_alerts');
INSERT IGNORE INTO `wfc_system_db`.`sys_menu` VALUES (2034, 'menu.device.access.management', 2028, 22, '/device/access', 'view.device_access', NULL, 1, 0, 'C', '0', '0', NULL, 'carbon:carbon', 'super', '2025-06-04 15:40:48', '', NULL, '', 'device_access');

INSERT IGNORE INTO `wfc_system_db`.`sys_role_menu` VALUES (2, 2033);
INSERT IGNORE INTO `wfc_system_db`.`sys_role_menu` VALUES (2, 2034);

SET FOREIGN_KEY_CHECKS = 1;