SET FOREIGN_KEY_CHECKS = 0;

INSERT INTO `wfc_system_db`.`sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `name`) VALUES (2031, 'menu.device.wlan.management', 2028, 12, '/device/wlan', 'view.device_wlan', NULL, 1, 1, 'C', '0', '0', '', 'carbon:rocket', 'super', '2025-02-18 10:46:31', '', NULL, '', 'device_wlan');

INSERT INTO `wfc_system_db`.`sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `name`) VALUES (2032, 'menu.device.portal.management', 2028, 14, '/device/portal', 'view.device_portal', NULL, 1, 1, 'C', '0', '0', '', 'carbon:building-insights-3', 'super', '2025-02-18 10:46:31', '', NULL, '', 'device_portal');

INSERT INTO `wfc_system_db`.`sys_role_menu` (`role_id`, `menu_id`) VALUES (2, 2032);

SET FOREIGN_KEY_CHECKS = 1;