SET FOREIGN_KEY_CHECKS = 0;

-- 
REPLACE INTO `sys_config` VALUES (6, 'config.sys.officialUrl', 'sys.officialUrl', 'https://www.bluearcus.com', 'Y', '0', 'system', 1704960008300, 'system', 1704960008300, 'config.sys.officialUrlRemark');
REPLACE INTO `sys_config` VALUES (26, 'config.sys.title', 'sys.title', 'config.sys.titleValue', 'Y', '0', 'system', 1704960008300, 'system', 1704960008300, 'config.sys.titleRemark');
REPLACE INTO `sys_config` VALUES (27, 'config.sys.copyright', 'sys.copyright', 'config.sys.copyrightValue', 'Y', '0', 'system', 1704960008300, 'system', 1704960008300, 'config.sys.copyrightRemark');
REPLACE INTO `sys_config` VALUES (28, 'config.sys.i18nOpen', 'sys.i18n.open', 'false', 'Y', '0', 'system', 1704960008300, 'system', 1704960008300, 'config.sys.i18nOpenRemark');
REPLACE INTO `sys_config` VALUES (29, 'config.sys.i18nDefault', 'sys.i18n.default', 'en_US', 'Y', '0', 'system', 1704960008300, 'system', 1704960008300, 'config.sys.i18nDefaultRemark');

-- 
REPLACE INTO `sys_i18n` VALUES (281, '0', 'system', 1699348237468, 'system', 1699348237468, 'config.sys.titleValue', 'BlueArcus EMS', 'BlueArcus EMS');
REPLACE INTO `sys_i18n` VALUES (282, '0', 'system', 1699348237468, 'system', 1699348237468, 'config.sys.copyrightValue', 'Copyright ©2024 BlueArcus', 'Copyright ©2024 BlueArcus');

-- set internationalization switching to ON
-- REPLACE INTO `omc_db`.`sys_role_menu` (`role_id`, `menu_id`) VALUES (2, 2122);
UPDATE `sys_menu` SET `status` = '0' WHERE `menu_id` = 2122;

SET FOREIGN_KEY_CHECKS = 1;