/*
 Navicat Premium Data Transfer

 Source Server         : local_mariadb
 Source Server Type    : MariaDB
 Source Server Version : 100338 (10.3.38-MariaDB)
 Source Host           : localhost:33066
 Source Schema         : omc_db

 Target Server Type    : MariaDB
 Target Server Version : 100338 (10.3.38-MariaDB)
 File Encoding         : 65001

 Date: 06/08/2023 01:23:04
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for ne_link
-- ----------------------------
DROP TABLE IF EXISTS `ne_link`;
CREATE TABLE `ne_link`  (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `ne_type` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
  `ne_id` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL DEFAULT '',
  `rm_uid` varchar(40) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `interface` varchar(16) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `status` enum('UP','DOWN','STANDBY') CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT 'UP' COMMENT 'UP, DOWN, STANDBY',
  `created_at` datetime NULL DEFAULT current_timestamp(),
  `updated_at` datetime NULL DEFAULT current_timestamp(),
  `deleted_at` datetime NULL DEFAULT current_timestamp(),
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE INDEX `idx_netype_neid`(`ne_type`, `ne_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 167 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
