
-- 调度任务记录日志字典
insert into `omc_db`.sys_dict_type values(null, '任务日志记录', 'sys_job_save_log',    '1', 'maskAdmin', REPLACE(unix_timestamp(now(3)),'.',''), '', 0, '任务日志记录列表');


insert into `omc_db`.sys_dict_data values(null,  1,  '不记录',        '0',         'sys_job_save_log',   '',   '',               '1', 'maskAdmin', REPLACE(unix_timestamp(now(3)),'.',''), '', 0, '不记录日志');
insert into `omc_db`.sys_dict_data values(null,  2,  '记录',          '1',         'sys_job_save_log',   '',   '',               '1', 'maskAdmin', REPLACE(unix_timestamp(now(3)),'.',''), '', 0, '记录日志');

-- 调度任务记录日志字段
ALTER TABLE `omc_db`.`sys_job` 
ADD COLUMN `save_log` varchar(1) NULL DEFAULT '0' COMMENT '是否记录任务日志（0不记录 1记录）' AFTER `status`;

UPDATE `omc_db`.`sys_job` SET `save_log` = '1';
