-- sys_config
UPDATE `sys_config` SET `config_value` = 'https://www.agrandtech.com' WHERE `config_id` = 6;
UPDATE `sys_config` SET `config_value` = 'true' WHERE `config_id` = 28;
UPDATE `sys_config` SET `config_value` = 'en_US' WHERE `config_id` = 29;

-- sys_i18n
UPDATE `sys_i18n` SET `value_zh` = 'AGrand EMS', `value_en` = 'AGrand EMS' WHERE `id` = 281;
UPDATE `sys_i18n` SET `value_zh` = 'Copyright ©2025 千通科技', `value_en` = 'Copyright ©2025 AGrandTech' WHERE `id` = 282;

-- set internationalization switching to ON
UPDATE `sys_menu` SET `status_flag` = '1' WHERE `menu_id` = 2122;
