/*
 Navicat Premium Data Transfer

 Source Server         : root@192.168.0.229
 Source Server Type    : MariaDB
 Source Server Version : 100335 (10.3.35-MariaDB-log)
 Source Host           : 192.168.0.229:33066
 Source Schema         : omc_db

 Target Server Type    : MariaDB
 Target Server Version : 100335 (10.3.35-MariaDB-log)
 File Encoding         : 65001

 Date: 16/08/2023 09:31:57
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for monitor_network
-- ----------------------------
DROP TABLE IF EXISTS `monitor_network`;
CREATE TABLE `monitor_network`  (
  `id` int(11) NOT NULL AUTO_INCREMENT COMMENT 'id',
  `created_at` datetime NULL DEFAULT NULL COMMENT '创建时间',
  `updated_at` datetime NULL DEFAULT NULL COMMENT '更新时间',
  `name` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '网卡名',
  `up` float NULL DEFAULT NULL COMMENT '上行',
  `down` float NULL DEFAULT NULL COMMENT '下行',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 43 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci COMMENT = '监控_网络IO' ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
