/*
 Navicat Premium Data Transfer

 Source Server         : local_mariadb
 Source Server Type    : MariaDB
 Source Server Version : 100338 (10.3.38-MariaDB)
 Source Host           : localhost:33066
 Source Schema         : omc_db

 Target Server Type    : MariaDB
 Target Server Version : 100338 (10.3.38-MariaDB)
 File Encoding         : 65001

 Date: 14/05/2024 11:56:23
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for mml_system
-- ----------------------------
DROP TABLE IF EXISTS `mml_system`;
CREATE TABLE `mml_system`  (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `ne_type` varchar(16) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `category` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `cat_display` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `operation` varchar(10) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `object` varchar(16) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `mml_display` varchar(128) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `object_type` varchar(16) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT 'General',
  `param_json` longtext CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT NULL,
  `status` enum('Active','Inactive') CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT 'Active' COMMENT '激活: Active 未激活: Inactive',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 906 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of mml_system
-- ----------------------------
INSERT INTO `mml_system` VALUES (833, 'UPF', 'upfManagement', 'UPF Management', 'help', '', 'List UPF MML CMD', 'General', 'null', 'Active');
INSERT INTO `mml_system` VALUES (834, 'UPF', 'systemManagement', 'System Management', 'set', 'n3 driver', 'Set N3 Driver', 'General', '[{\"comment\":\"\",\"display\":\"Type\",\"filter\":\"\",\"name\":\"type\",\"optional\":\"false\",\"type\":\"int\"},{\"comment\":\"\",\"display\":\"IP address\",\"filter\":\"\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Mask\",\"filter\":\"\",\"name\":\"mask\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Mac address\",\"filter\":\"\",\"name\":\"mac\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"PCI address\",\"filter\":\"\",\"name\":\"pci\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (835, 'UPF', 'systemManagement', 'System Management', 'set', 'n4 ip', 'Set N4 IP Address', 'General', '[{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (836, 'UPF', 'systemManagement', 'System Management', 'set', 'n6 driver', 'Set N6 Driver', 'General', '[{\"comment\":\"\",\"display\":\"Type\",\"filter\":\"\",\"name\":\"type\",\"optional\":\"false\",\"type\":\"int\"},{\"comment\":\"\",\"display\":\"IP address\",\"filter\":\"\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Mask\",\"filter\":\"\",\"name\":\"mask\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Mac address\",\"filter\":\"\",\"name\":\"mac\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"PCI address\",\"filter\":\"\",\"name\":\"pci\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (837, 'UPF', 'systemManagement', 'System Management', 'set', 'n9 driver', 'Set N9 Driver', 'General', '[{\"comment\":\"\",\"display\":\"Type\",\"filter\":\"\",\"name\":\"type\",\"optional\":\"false\",\"type\":\"int\"},{\"comment\":\"\",\"display\":\"IP address\",\"filter\":\"\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Mask\",\"filter\":\"\",\"name\":\"mask\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Mac address\",\"filter\":\"\",\"name\":\"mac\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"PCI address\",\"filter\":\"\",\"name\":\"pci\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (838, 'UPF', 'systemManagement', 'System Management', 'set', 'dnn', 'Set DNN', 'General', '[{\"comment\":\"\",\"display\":\"DNN\",\"filter\":\"\",\"name\":\"dnn\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (839, 'UPF', 'systemManagement', 'System Management', 'set', 'pfcp', 'Set PFCP', 'General', '[{\"comment\":\"\",\"display\":\"Path\",\"filter\":\"\",\"name\":\"path\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Local IP Address\",\"filter\":\"\",\"name\":\"local\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Remote IP Address\",\"filter\":\"\",\"name\":\"remote\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (840, 'UPF', 'systemManagement', 'System Management', 'set', 'qos', 'Set Qos', 'General', '[{\"comment\":\"\",\"display\":\"Index\",\"filter\":\"\",\"name\":\"index\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"5qi\",\"filter\":\"\",\"name\":\"5qi\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Priority Level\",\"filter\":\"\",\"name\":\"priority\",\"optional\":\"false\",\"type\":\"int\"},{\"comment\":\"\",\"display\":\"MBR\",\"filter\":\"\",\"name\":\"mbr\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"GBR\",\"filter\":\"\",\"name\":\"gbr\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (841, 'UPF', 'systemManagement', 'System Management', 'set', 'pccrule', 'Set PCC Rule', 'General', '[{\"comment\":\"\",\"display\":\"Index\",\"filter\":\"0~65535\",\"name\":\"index\",\"optional\":\"false\",\"type\":\"int\"},{\"comment\":\"\",\"display\":\"Precedence\",\"filter\":\"\",\"name\":\"precedence\",\"optional\":\"false\",\"type\":\"int\"},{\"comment\":\"\",\"display\":\"QOS Index\",\"filter\":\"\",\"name\":\"qosindex\",\"optional\":\"false\",\"type\":\"int\"},{\"comment\":\"\",\"display\":\"Filter Direction\",\"filter\":\"{\\\"0\\\":\\\"NA\\\", \\\"1\\\":\\\"Uplink\\\", \\\"2\\\":\\\"Downlink\\\", \\\"3\\\":\\\"Bidirectionallink\\\"}\",\"name\":\"direction\",\"optional\":\"true\",\"type\":\"int\"},{\"comment\":\"\",\"display\":\"Filter\",\"filter\":\"\",\"name\":\"filter\",\"optional\":\"true\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Application ID\",\"filter\":\"\",\"name\":\"appid\",\"optional\":\"true\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (842, 'UPF', 'systemManagement', 'System Management', 'exec', 'shell', 'Execute Shell Command', 'General', '[{\"comment\":\"\",\"display\":\"CMD\",\"filter\":\"\",\"name\":\"cmd\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (843, 'UPF', 'systemManagement', 'System Management', 'reload', '', 'Reload Config', 'General', 'null', 'Inactive');
INSERT INTO `mml_system` VALUES (853, 'SMF', 'smfManagement', 'SMF Management', 'help', '', 'List SMF MML CMD', 'General', 'null', 'Active');
INSERT INTO `mml_system` VALUES (854, 'SMF', 'systemManagement', 'System Management', 'set', 'n7 server', 'Set N7 Server', 'General', '[{\"comment\":\"\",\"display\":\"Scheme\",\"filter\":\"{\\\"0\\\":\\\"http\\\", \\\"1\\\":\\\"https\\\"}\",\"name\":\"scheme\",\"optional\":\"false\",\"type\":\"enum\"},{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"0~64\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Port\",\"filter\":\"0~65535\",\"name\":\"port\",\"optional\":\"false\",\"type\":\"int\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (855, 'SMF', 'systemManagement', 'System Management', 'set', 'n7 client', 'Set N7 Client', 'General', '[{\"comment\":\"\",\"display\":\"Scheme\",\"filter\":\"{\\\"0\\\":\\\"http\\\", \\\"1\\\":\\\"https\\\"}\",\"name\":\"scheme\",\"optional\":\"false\",\"type\":\"enum\"},{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"0~64\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (856, 'SMF', 'systemManagement', 'System Management', 'set', 'n10 server', 'Set N10 Server', 'General', '[{\"comment\":\"\",\"display\":\"Scheme\",\"filter\":\"{\\\"0\\\":\\\"http\\\", \\\"1\\\":\\\"https\\\"}\",\"name\":\"scheme\",\"optional\":\"false\",\"type\":\"enum\"},{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"0~64\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Port\",\"filter\":\"0~65535\",\"name\":\"port\",\"optional\":\"false\",\"type\":\"int\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (857, 'SMF', 'systemManagement', 'System Management', 'set', 'n10 client', 'Set N10 Client', 'General', '[{\"comment\":\"\",\"display\":\"Scheme\",\"filter\":\"{\\\"0\\\":\\\"http\\\", \\\"1\\\":\\\"https\\\"}\",\"name\":\"scheme\",\"optional\":\"false\",\"type\":\"enum\"},{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"0~64\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (858, 'SMF', 'systemManagement', 'System Management', 'set', 'n11 server', 'Set N11 Server', 'General', '[{\"comment\":\"\",\"display\":\"Scheme\",\"filter\":\"{\\\"0\\\":\\\"http\\\", \\\"1\\\":\\\"https\\\"}\",\"name\":\"scheme\",\"optional\":\"false\",\"type\":\"enum\"},{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"0~64\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Port\",\"filter\":\"0~65535\",\"name\":\"port\",\"optional\":\"false\",\"type\":\"int\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (859, 'SMF', 'systemManagement', 'System Management', 'set', 'n11 client', 'Set N11 Client', 'General', '[{\"comment\":\"\",\"display\":\"Scheme\",\"filter\":\"{\\\"0\\\":\\\"http\\\", \\\"1\\\":\\\"https\\\"}\",\"name\":\"scheme\",\"optional\":\"false\",\"type\":\"enum\"},{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"0~64\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (860, 'SMF', 'systemManagement', 'System Management', 'set', 'dnn', 'Set DNN', 'General', '[{\"comment\":\"\",\"display\":\"Index\",\"filter\":\"\",\"name\":\"index\",\"optional\":\"false\",\"type\":\"int\"},{\"comment\":\"\",\"display\":\"DNN\",\"filter\":\"\",\"name\":\"DNN\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (862, 'SMF', 'systemManagement', 'System Management', 'set', 'qos', 'Set Qos', 'General', '[{\"comment\":\"\",\"display\":\"Index\",\"filter\":\"\",\"name\":\"index\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"SD\",\"filter\":\"\",\"name\":\"5qi\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"5qipl\",\"filter\":\"\",\"name\":\"5qipl\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"arppl\",\"filter\":\"\",\"name\":\"arppl\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"arppci\",\"filter\":\"\",\"name\":\"arppci\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"arppvi\",\"filter\":\"\",\"name\":\"arppvi\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"mfbrul\",\"filter\":\"\",\"name\":\"mfbrul\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"mfbrdl\",\"filter\":\"\",\"name\":\"mfbrdl\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"gfbrul\",\"filter\":\"\",\"name\":\"gfbrul\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"gfbrdl\",\"filter\":\"\",\"name\":\"gfbrdl\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (863, 'SMF', 'systemManagement', 'System Management', 'set', 'snssai', 'Set Snssai', 'General', '[{\"comment\":\"\",\"display\":\"Index\",\"filter\":\"\",\"name\":\"index\",\"optional\":\"false\",\"type\":\"string\"},{\"display\":\"sst-sd\",\"filter\":\"\",\"name\":\"sst-sd\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (864, 'SMF', 'systemManagement', 'System Management', 'release', 'imsi', 'Release IMSI', 'General', '[{\"comment\":\"\",\"display\":\"IMSI\",\"filter\":\"\",\"name\":\"imsi\",\"optional\":\"false\",\"type\":\"string\"},{\"display\":\"PDU Session Id\",\"filter\":\"\",\"name\":\"pduSessId\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (865, 'SMF', 'systemManagement', 'System Management', 'set', 'urr', 'Set URR', 'General', '[{\"comment\":\"\",\"display\":\"Index\",\"filter\":\"\",\"name\":\"index\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Quota Volume Tatol\",\"filter\":\"\",\"name\":\"quotavolumetatol\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Quota Volume UL\",\"filter\":\"\",\"name\":\"quotavolumeul\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Quota Volume DL\",\"filter\":\"\",\"name\":\"quotavolumedl\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Quota Time\",\"filter\":\"\",\"name\":\"quotatime\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (866, 'SMF', 'systemManagement', 'System Management', 'set', 'dpi', 'Set DPI', 'General', '[{\"comment\":\"\",\"display\":\"Flag\",\"filter\":\"{\\\"0\\\":\\\"disable\\\", \\\"1\\\":\\\"enable\\\"}\",\"name\":\"flag\",\"optional\":\"false\",\"type\":\"enum\"},{\"comment\":\"\",\"display\":\"Max Detect Packet Number\",\"filter\":\"\",\"name\":\"max\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (867, 'SMF', 'systemManagement', 'System Management', 'exec', 'shell', 'Execute Shell Command', 'General', '[{\"comment\":\"\",\"display\":\"CMD\",\"filter\":\"\",\"name\":\"cmd\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (868, 'SMF', 'systemManagement', 'System Management', 'reload', '', 'Reload Config', 'General', 'null', 'Inactive');
INSERT INTO `mml_system` VALUES (870, 'IMS', 'imsManagement', 'IMS Management', 'help', '', 'List IMS MML CMD', 'General', 'null', 'Active');
INSERT INTO `mml_system` VALUES (871, 'N3IWF', 'n3iwfManagement', 'N3IWF Management', 'help', '', 'List N3IWF MML CMD', 'General', 'null', 'Active');
INSERT INTO `mml_system` VALUES (872, 'NSSF', 'nssfManagement', 'NSSF Management', 'help', '', 'List NSSF MML CMD', 'General', 'null', 'Active');
INSERT INTO `mml_system` VALUES (873, 'NRF', 'nrfManagement', 'NRF Management', 'help', '', 'List NRF MML CMD', 'General', 'null', 'Active');
INSERT INTO `mml_system` VALUES (874, 'PCF', 'pcfManagement', 'PCF Management', 'help', '', 'List PCF MML CMD', 'General', 'null', 'Active');
INSERT INTO `mml_system` VALUES (875, 'AMF', 'subsManagement', 'Subscriber Management', 'list', 'imsi', 'List Online IMSI', 'General', '[{\"comment\":\"\",\"display\":\"IMSI\",\"filter\":\"32\",\"name\":\"imsi\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (876, 'AMF', 'amfManagement', 'AMF Management', 'help', '', 'List AMF MML CMD', 'General', 'null', 'Active');
INSERT INTO `mml_system` VALUES (877, 'AMF', 'systemManagement', 'System Management', 'set', 'n8_ip', 'Set N8 IP Address', 'General', '[{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"0~64\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (878, 'AMF', 'systemManagement', 'System Management', 'set', 'n11_ip', 'Set N11 IP Address', 'General', '[{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"0~64\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (879, 'AMF', 'systemManagement', 'System Management', 'set', 'n12_ip', 'Set N12 IP Address', 'General', '[{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"0~64\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (880, 'AMF', 'systemManagement', 'System Management', 'set', 'n2_ip', 'Set N2 IP Address', 'General', '[{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (881, 'AMF', 'systemManagement', 'System Management', 'set', 'n2_port', 'Set N2 Port', 'General', '[{\"comment\":\"\",\"display\":\"Port\",\"filter\":\"0~65535\",\"name\":\"port\",\"optional\":\"false\",\"type\":\"int\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (882, 'AMF', 'systemManagement', 'System Management', 'set', 'ntpversion', 'Set NTP Version', 'General', '[{\"comment\":\"\",\"display\":\"Version\",\"filter\":\"\",\"name\":\"version\",\"optional\":\"false\",\"type\":\"int\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (883, 'AMF', 'systemManagement', 'System Management', 'set', 'ntpmaxdiff', 'Set NTP Max Diff', 'General', '[{\"comment\":\"\",\"display\":\"Max Value(ms)\",\"filter\":\"100~2000\",\"name\":\"value\",\"optional\":\"false\",\"type\":\"int\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (884, 'AMF', 'systemManagement', 'System Management', 'set', 'ntpsynctimer', 'Set NTP Sync Timer', 'General', '[{\"comment\":\"\",\"display\":\"Periods(second)\",\"filter\":\"\",\"name\":\"periods\",\"optional\":\"false\",\"type\":\"int\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (885, 'AMF', 'systemManagement', 'System Management', 'add', 'slice', 'Add Slice', 'General', '[{\"comment\":\"\",\"display\":\"SST\",\"filter\":\"\",\"name\":\"sst\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"SD\",\"filter\":\"\",\"name\":\"sd\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (886, 'AMF', 'systemManagement', 'System Management', 'deregister', 'imsi', 'Deregister IMSI', 'General', '[{\"comment\":\"\",\"display\":\"IMSI\",\"filter\":\"\",\"name\":\"IMSI\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (887, 'AMF', 'systemManagement', 'System Management', 'exec', 'shell', 'Execute Shell Command', 'General', '[{\"comment\":\"\",\"display\":\"CMD\",\"filter\":\"\",\"name\":\"cmd\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (888, 'AMF', 'systemManagement', 'System Management', 'reload', '', 'Reload Config', 'General', 'null', 'Inactive');
INSERT INTO `mml_system` VALUES (889, 'UDM', 'udmManagement', 'UDM Management', 'help', '', 'List UDM MML CMD', 'General', 'null', 'Active');
INSERT INTO `mml_system` VALUES (890, 'UDM', 'systemManagement', 'System Management', 'set', 'n8ip', 'Set N8 IP Address', 'General', '[{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"ipv4\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (891, 'UDM', 'systemManagement', 'System Management', 'set', 'n8port', 'Set N8 Port', 'General', '[{\"comment\":\"\",\"display\":\"Port\",\"filter\":\"1~65535\",\"name\":\"port\",\"optional\":\"false\",\"type\":\"int\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (892, 'UDM', 'systemManagement', 'System Management', 'set', 'n8scheme', 'Set N8 Scheme', 'General', '[{\"comment\":\"\",\"display\":\"Scheme\",\"filter\":\"{\\\"0\\\":\\\"http\\\", \\\"1\\\":\\\"https\\\"}\",\"name\":\"scheme\",\"optional\":\"false\",\"type\":\"enum\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (893, 'UDM', 'systemManagement', 'System Management', 'set', 'n10ip', 'Set N10 IP Address', 'General', '[{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (894, 'UDM', 'systemManagement', 'System Management', 'set', 'n10port', 'Set N10 Port', 'General', '[{\"comment\":\"\",\"display\":\"Port\",\"filter\":\"1~65535\",\"name\":\"port\",\"optional\":\"false\",\"type\":\"int\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (895, 'UDM', 'systemManagement', 'System Management', 'set', 'n10scheme', 'Set N10 Scheme', 'General', '[{\"comment\":\"\",\"display\":\"Scheme\",\"filter\":\"{\\\"0\\\":\\\"http\\\", \\\"1\\\":\\\"https\\\"}\",\"name\":\"scheme\",\"optional\":\"false\",\"type\":\"enum\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (896, 'UDM', 'systemManagement', 'System Management', 'exec', 'shell', 'Execute Shell Command', 'General', '[{\"comment\":\"\",\"display\":\"CMD\",\"filter\":\"\",\"name\":\"cmd\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (897, 'UDM', 'systemManagement', 'System Management', 'reload', '', 'Reload Config', 'General', 'null', 'Inactive');
INSERT INTO `mml_system` VALUES (898, 'AUSF', 'ausfManagement', 'AUSF Management', 'help', '', 'List AUSF MML CMD', 'General', 'null', 'Active');
INSERT INTO `mml_system` VALUES (899, 'AUSF', 'systemManagement', 'System Management', 'set', 'n12ip', 'Set N12 IP Address', 'General', '[{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (900, 'AUSF', 'systemManagement', 'System Management', 'set', 'n12port', 'Set N12 Port', 'General', '[{\"comment\":\"\",\"display\":\"Port\",\"filter\":\"1~65535\",\"name\":\"port\",\"optional\":\"false\",\"type\":\"int\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (901, 'AUSF', 'systemManagement', 'System Management', 'set', 'n12scheme', 'Set N12 Scheme', 'General', '[{\"comment\":\"\",\"display\":\"Scheme\",\"filter\":\"{\\\"0\\\":\\\"http\\\", \\\"1\\\":\\\"https\\\"}\",\"name\":\"scheme\",\"optional\":\"false\",\"type\":\"enum\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (902, 'AUSF', 'systemManagement', 'System Management', 'set', 'supirange', 'Set SUPI Range', 'General', '[{\"comment\":\"\",\"display\":\"SUPI Range\",\"filter\":\"\",\"name\":\"supirange\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_system` VALUES (903, 'AUSF', 'systemManagement', 'System Management', 'reload', '', 'Reload Config', 'General', 'null', 'Inactive');
INSERT INTO `mml_system` VALUES (904, 'MME', 'mmeManagement', 'MME Management', 'help', '', 'List MME MML CMD', 'General', 'null', 'Active');

SET FOREIGN_KEY_CHECKS = 1;
