PRAGMA foreign_keys = false;


INSERT INTO "sys_dict_data" VALUES (139, 'cdr_sip_code', 'dictData.cdr_sip_code.302', '302', 3, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (140, 'cdr_sip_code', 'dictData.cdr_sip_code.402', '402', 4, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (141, 'cdr_sip_code', 'dictData.cdr_sip_code.480', '480', 7, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (142, 'cdr_sip_code', 'dictData.cdr_sip_code.481', '481', 8, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (143, 'cdr_sip_code', 'dictData.cdr_sip_code.482', '482', 9, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (144, 'cdr_sip_code', 'dictData.cdr_sip_code.486', '486', 11, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (145, 'cdr_sip_code', 'dictData.cdr_sip_code.489', '489', 15, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (146, 'cdr_sip_code', 'dictData.cdr_sip_code.580', '580', 19, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (147, 'cdr_sip_code_cause', 'dictData.cdr_sip_code_cause.0', '0', 99, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (148, 'cdr_sip_code_cause', 'dictData.cdr_sip_code_cause.200', '200', 1, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (149, 'cdr_sip_code_cause', 'dictData.cdr_sip_code_cause.202', '202', 2, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (150, 'cdr_sip_code_cause', 'dictData.cdr_sip_code_cause.302', '302', 3, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (151, 'cdr_sip_code_cause', 'dictData.cdr_sip_code_cause.402', '402', 4, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (152, 'cdr_sip_code_cause', 'dictData.cdr_sip_code_cause.403', '403', 5, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (153, 'cdr_sip_code_cause', 'dictData.cdr_sip_code_cause.404', '404', 6, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (154, 'cdr_sip_code_cause', 'dictData.cdr_sip_code_cause.480', '480', 7, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (155, 'cdr_sip_code_cause', 'dictData.cdr_sip_code_cause.481', '481', 8, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (156, 'cdr_sip_code_cause', 'dictData.cdr_sip_code_cause.482', '482', 9, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (157, 'cdr_sip_code_cause', 'dictData.cdr_sip_code_cause.486', '486', 11, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (158, 'cdr_sip_code_cause', 'dictData.cdr_sip_code_cause.487', '487', 12, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (159, 'cdr_sip_code_cause', 'dictData.cdr_sip_code_cause.408', '408', 13, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (160, 'cdr_sip_code_cause', 'dictData.cdr_sip_code_cause.488', '488', 14, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (161, 'cdr_sip_code_cause', 'dictData.cdr_sip_code_cause.489', '489', 15, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (162, 'cdr_sip_code_cause', 'dictData.cdr_sip_code_cause.500', '500', 16, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (163, 'cdr_sip_code_cause', 'dictData.cdr_sip_code_cause.503', '503', 17, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (164, 'cdr_sip_code_cause', 'dictData.cdr_sip_code_cause.504', '504', 18, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (165, 'cdr_sip_code_cause', 'dictData.cdr_sip_code_cause.580', '580', 19, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (166, 'cdr_sip_code_cause', 'dictData.cdr_sip_code_cause.603', '603', 21, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_dict_data" VALUES (167, 'cdr_sip_code_cause', 'dictData.cdr_sip_code_cause.606', '606', 22, '', '', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

UPDATE "sys_dict_data" SET "dict_type" = 'cdr_sip_code', "data_label" = 'dictData.cdr_sip_code.403', "data_value" = '403', "data_sort" = 5, "tag_class" = '', "tag_type" = '', "status_flag" = '1', "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "remark" = '' WHERE "data_id" = 56;

UPDATE "sys_dict_data" SET "dict_type" = 'cdr_sip_code', "data_label" = 'dictData.cdr_sip_code.408', "data_value" = '408', "data_sort" = 13, "tag_class" = '', "tag_type" = '', "status_flag" = '1', "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "remark" = '' WHERE "data_id" = 57;

UPDATE "sys_dict_data" SET "dict_type" = 'cdr_sip_code', "data_label" = 'dictData.cdr_sip_code.500', "data_value" = '500', "data_sort" = 16, "tag_class" = '', "tag_type" = '', "status_flag" = '1', "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "remark" = '' WHERE "data_id" = 58;

UPDATE "sys_dict_data" SET "dict_type" = 'cdr_sip_code', "data_label" = 'dictData.cdr_sip_code.404', "data_value" = '404', "data_sort" = 6, "tag_class" = '', "tag_type" = '', "status_flag" = '1', "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "remark" = '' WHERE "data_id" = 75;

UPDATE "sys_dict_data" SET "dict_type" = 'cdr_sip_code', "data_label" = 'dictData.cdr_sip_code.487', "data_value" = '487', "data_sort" = 12, "tag_class" = '', "tag_type" = '', "status_flag" = '1', "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "remark" = '' WHERE "data_id" = 76;

UPDATE "sys_dict_data" SET "dict_type" = 'cdr_sip_code', "data_label" = 'dictData.cdr_sip_code.503', "data_value" = '503', "data_sort" = 17, "tag_class" = '', "tag_type" = '', "status_flag" = '1', "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "remark" = '' WHERE "data_id" = 77;

UPDATE "sys_dict_data" SET "dict_type" = 'cdr_sip_code', "data_label" = 'dictData.cdr_sip_code.504', "data_value" = '504', "data_sort" = 18, "tag_class" = '', "tag_type" = '', "status_flag" = '1', "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "remark" = '' WHERE "data_id" = 78;

UPDATE "sys_dict_data" SET "dict_type" = 'cdr_sip_code', "data_label" = 'dictData.cdr_sip_code.603', "data_value" = '603', "data_sort" = 21, "tag_class" = '', "tag_type" = '', "status_flag" = '1', "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "remark" = '' WHERE "data_id" = 79;

UPDATE "sys_dict_data" SET "dict_type" = 'cdr_sip_code', "data_label" = 'dictData.cdr_sip_code.606', "data_value" = '606', "data_sort" = 22, "tag_class" = '', "tag_type" = '', "status_flag" = '1', "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "remark" = '' WHERE "data_id" = 80;

UPDATE "sys_dict_data" SET "dict_type" = 'cdr_sip_code', "data_label" = 'dictData.cdr_sip_code.202', "data_value" = '202', "data_sort" = 2, "tag_class" = '', "tag_type" = '', "status_flag" = '1', "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "remark" = '' WHERE "data_id" = 81;

UPDATE "sys_dict_data" SET "dict_type" = 'cdr_sip_code', "data_label" = 'dictData.cdr_sip_code.488', "data_value" = '488', "data_sort" = 14, "tag_class" = '', "tag_type" = '', "status_flag" = '1', "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "remark" = '' WHERE "data_id" = 83;

UPDATE "sys_dict_data" SET "dict_type" = 'cdr_sip_code', "data_label" = 'dictData.cdr_sip_code.0', "data_value" = '0', "data_sort" = 99, "tag_class" = '', "tag_type" = '', "status_flag" = '1', "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "remark" = '' WHERE "data_id" = 84;

INSERT INTO "sys_dict_type" VALUES (71, 'dictType.cdr_sip_code_cause', 'cdr_sip_code_cause', '1', '0', 'system', 1699348237468, 'system', 1699348237468, '');

INSERT INTO "sys_i18n" VALUES (672, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code.302', '302 原因不明', '302 Unknown Reason');

INSERT INTO "sys_i18n" VALUES (673, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code.402', '402 原因不明', '402 Unknown Reason');

INSERT INTO "sys_i18n" VALUES (674, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code.480', '480 被叫挂断/拒接', '480 Temporarily Unavailable');

INSERT INTO "sys_i18n" VALUES (675, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code.481', '481 原因不明', '481 Unknown Reason');

INSERT INTO "sys_i18n" VALUES (676, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code.482', '482 发现环路', '482 Loop Detected');

INSERT INTO "sys_i18n" VALUES (677, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code.486', '486 这里很忙', '486 Busy Here');

INSERT INTO "sys_i18n" VALUES (678, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code.489', '489 原因不明', '489 Unknown Reason');

INSERT INTO "sys_i18n" VALUES (679, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code.580', '580 原因不明', '580 Unknown Reason');

INSERT INTO "sys_i18n" VALUES (700, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code_cause.0', '因其他原因呼叫失败', 'Call failure for other reason');

INSERT INTO "sys_i18n" VALUES (701, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code_cause.200', '正常通话清除', 'Normal Call Clearing');

INSERT INTO "sys_i18n" VALUES (702, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code_cause.202', '申请已被接受处理，但尚未完成 ', 'The request has been accepted for processing, but it hasn it completed yet');

INSERT INTO "sys_i18n" VALUES (703, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code_cause.302', '因其他原因呼叫失败', 'Call failure for other reason');

INSERT INTO "sys_i18n" VALUES (704, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code_cause.402', '因其他原因呼叫失败', 'Call failure for other reason');

INSERT INTO "sys_i18n" VALUES (705, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code_cause.403', '拒绝 MO 用户', 'MO User Rejected');

INSERT INTO "sys_i18n" VALUES (706, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code_cause.404', 'MT 用户离线', 'MT User Offline');

INSERT INTO "sys_i18n" VALUES (707, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code_cause.480', '因其他原因呼叫失败', 'Call failure for other reason');

INSERT INTO "sys_i18n" VALUES (708, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code_cause.481', '电话无法拨出', 'Call cannot be dialed');

INSERT INTO "sys_i18n" VALUES (709, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code_cause.482', '闪断', 'Flashback');

INSERT INTO "sys_i18n" VALUES (710, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code_cause.486', 'MT 用户忙', 'MT User Busy');

INSERT INTO "sys_i18n" VALUES (711, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code_cause.487', 'MO 用户断线', 'MO User Disconnected');

INSERT INTO "sys_i18n" VALUES (712, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code_cause.408', '服务器等待响应的时间过长', 'The server waits too long for a response');

INSERT INTO "sys_i18n" VALUES (713, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code_cause.488', '媒体详细信息与服务器支持的内容不匹配', 'Media details didn’t match what the server supports');

INSERT INTO "sys_i18n" VALUES (714, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code_cause.489', '因其他原因呼叫失败', 'Call failure for other reason');

INSERT INTO "sys_i18n" VALUES (715, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code_cause.500', '服务器本身出了问题', 'Something went wrong inside the server itself');

INSERT INTO "sys_i18n" VALUES (716, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code_cause.503', '服务器超载或因维护而停机，无法处理呼叫', 'The server is overloaded or down for maintenance and can it process the call');

INSERT INTO "sys_i18n" VALUES (717, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code_cause.504', '服务器尝试以您的名义与另一台服务器通信，但未及时收到回复，并超时了', 'The server tried to talk to another server on your behalf, didn’t get a reply in time, and timed out');

INSERT INTO "sys_i18n" VALUES (718, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code_cause.580', '因其他原因呼叫失败', 'Call failure for other reason');

INSERT INTO "sys_i18n" VALUES (719, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code_cause.603', 'MT 明确拒绝通话', 'MT explicitly rejected the call');

INSERT INTO "sys_i18n" VALUES (720, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictData.cdr_sip_code_cause.606', '呼叫已到达用户设备，但会话设置的某些部分不可接受', 'The call reached the user’s device, but some parts of the session setup weren it acceptable');

INSERT INTO "sys_i18n" VALUES (721, '0', 'system', 1699348237468, 'system', 1699348237468, 'dictType.cdr_sip_code_cause', 'IMS-Voice-SIP响应代码类别类型原因', 'IMS-Voice-SIP Response Code Category Type Cause');

UPDATE "sys_i18n" SET "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1745898491745, "key_lable" = 'config.sys.titleValue', "value_zh" = 'BlueArcus EMS', "value_en" = 'BlueArcus EMS' WHERE "id" = 281;

UPDATE "sys_i18n" SET "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "key_lable" = 'dictType.cdr_sip_code', "value_zh" = 'IMS-Voice-SIP响应代码类别类型', "value_en" = 'IMS-Voice-SIP Response Code Category Type' WHERE "id" = 516;

UPDATE "sys_i18n" SET "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "key_lable" = 'dictType.cdr_call_type', "value_zh" = 'IMS-呼叫类型', "value_en" = 'IMS-Call Type' WHERE "id" = 517;

UPDATE "sys_i18n" SET "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "key_lable" = 'dictData.cdr_sip_code.200', "value_zh" = '200 正常通话', "value_en" = '200 OK' WHERE "id" = 520;

UPDATE "sys_i18n" SET "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "key_lable" = 'dictData.cdr_sip_code.403', "value_zh" = '403 禁止访问', "value_en" = '403 Forbidden' WHERE "id" = 521;

UPDATE "sys_i18n" SET "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "key_lable" = 'dictData.cdr_sip_code.408', "value_zh" = '408 请求超时', "value_en" = '408 Request Timeout' WHERE "id" = 522;

UPDATE "sys_i18n" SET "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "key_lable" = 'dictData.cdr_sip_code.500', "value_zh" = '500 内部服务器错误', "value_en" = '500 Internal Server Error' WHERE "id" = 523;

UPDATE "sys_i18n" SET "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "key_lable" = 'dictData.cdr_sip_code.404', "value_zh" = '404 找不到', "value_en" = '404 Not Found' WHERE "id" = 541;

UPDATE "sys_i18n" SET "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "key_lable" = 'dictData.cdr_sip_code.487', "value_zh" = '487 请求已终止', "value_en" = '487 Request Terminated' WHERE "id" = 542;

UPDATE "sys_i18n" SET "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "key_lable" = 'dictData.cdr_sip_code.503', "value_zh" = '503 服务不可用', "value_en" = '503 Service Unavailable' WHERE "id" = 543;

UPDATE "sys_i18n" SET "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "key_lable" = 'dictData.cdr_sip_code.504', "value_zh" = '504 服务器超时', "value_en" = '504 Server Timeout' WHERE "id" = 544;

UPDATE "sys_i18n" SET "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "key_lable" = 'dictData.cdr_sip_code.603', "value_zh" = '603 下降', "value_en" = '603 Decline' WHERE "id" = 545;

UPDATE "sys_i18n" SET "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "key_lable" = 'dictData.cdr_sip_code.606', "value_zh" = '606 不可接受', "value_en" = '606 Not Acceptable' WHERE "id" = 546;

UPDATE "sys_i18n" SET "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "key_lable" = 'dictData.cdr_sip_code.202', "value_zh" = '202 已接受', "value_en" = '202 Accepted' WHERE "id" = 557;

UPDATE "sys_i18n" SET "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "key_lable" = 'dictData.cdr_sip_code.488', "value_zh" = '488 这里不接受', "value_en" = '488 Not Acceptable Here' WHERE "id" = 558;

UPDATE "sys_i18n" SET "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "key_lable" = 'dictData.cdr_sip_code.0', "value_zh" = '0 原因不明', "value_en" = '0 Unknown Reason' WHERE "id" = 559;

UPDATE "sys_i18n" SET "del_flag" = '0', "create_by" = 'system', "create_time" = 1699348237468, "update_by" = 'system', "update_time" = 1699348237468, "key_lable" = 'menu.ne.neVersion', "value_zh" = '网元版本', "value_en" = 'NE Version' WHERE "id" = 603;

PRAGMA foreign_keys = true;