/*
 Navicat Premium Data Transfer

 Source Server         : local_mariadb
 Source Server Type    : MariaDB
 Source Server Version : 100338 (10.3.38-MariaDB)
 Source Host           : localhost:33066
 Source Schema         : omc_db

 Target Server Type    : MariaDB
 Target Server Version : 100338 (10.3.38-MariaDB)
 File Encoding         : 65001

 Date: 25/10/2023 18:21:58
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for sys_menu
-- ----------------------------
CREATE TABLE IF NOT EXISTS `sys_menu`  (
  `menu_id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT '菜单ID',
  `menu_name` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL COMMENT '菜单名称',
  `parent_id` bigint(20) NULL DEFAULT 0 COMMENT '父菜单ID 默认0',
  `menu_sort` int(11) NULL DEFAULT 0 COMMENT '显示顺序',
  `path` varchar(200) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT '路由地址',
  `component` varchar(200) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT '组件路径',
  `is_frame` char(1) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '1' COMMENT '是否内部跳转（0否 1是）',
  `is_cache` char(1) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '0' COMMENT '是否缓存（0不缓存 1缓存）',
  `menu_type` char(1) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL COMMENT '菜单类型（D目录 M菜单 B按钮）',
  `visible` char(1) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '0' COMMENT '是否显示（0隐藏 1显示）',
  `status` char(1) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '0' COMMENT '菜单状态（0停用 1正常）',
  `perms` varchar(100) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '权限标识',
  `icon` varchar(100) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '#' COMMENT '菜单图标（#无图标）',
  `create_by` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT '创建者',
  `create_time` bigint(20) NULL DEFAULT 0 COMMENT '创建时间',
  `update_by` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT '更新者',
  `update_time` bigint(20) NULL DEFAULT 0 COMMENT '更新时间',
  `remark` varchar(500) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT '备注',
  PRIMARY KEY (`menu_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 2115 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci COMMENT = '菜单权限表' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of sys_menu
-- ----------------------------
INSERT IGNORE INTO  `sys_menu` VALUES (1, '系统', 0, 16, 'system', '', '1', '1', 'D', '1', '1', '', 'icon-wenjian', 'admin', 1694599799316, 'admin', 1697773549993, '系统管理目录');
INSERT IGNORE INTO  `sys_menu` VALUES (2, '监控', 0, 2, 'monitor', '', '1', '1', 'D', '0', '0', '', 'icon-wenjian', 'admin', 1694599799345, 'admin', 1698202507668, '系统监控目录');
INSERT IGNORE INTO  `sys_menu` VALUES (3, '工具', 0, 15, 'tool', '', '1', '1', 'D', '0', '0', '', 'icon-wenjian', 'admin', 1694599799372, 'admin', 1697773407370, '系统工具目录');
INSERT IGNORE INTO  `sys_menu` VALUES (4, '配置', 0, 3, 'configManage', '', '1', '0', 'D', '1', '1', '', 'icon-wenjian', 'admin', 1694599799396, 'admin', 1697773395274, '配置管理');
INSERT IGNORE INTO  `sys_menu` VALUES (5, '终端', 0, 7, 'neUser', '', '1', '0', 'D', '1', '1', '', 'icon-wenjian', 'admin', 1693031847898, 'admin', 1697774091487, '网元用户信息');
INSERT IGNORE INTO  `sys_menu` VALUES (6, '故障管理', 0, 50, 'page', '', '1', '0', 'D', '0', '1', 'page', 'fa fa-home', 'admin', 1693031847898, 'admin', 1694679965315, '故障管理');
INSERT IGNORE INTO  `sys_menu` VALUES (7, '配置管理', 0, 550, 'page', '', '1', '0', 'D', '0', '1', 'page', 'fa fa-home', 'admin', 1693031847898, 'admin', 0, '配置管理');
INSERT IGNORE INTO  `sys_menu` VALUES (8, '性能管理', 0, 551, 'page', '', '1', '0', 'D', '0', '1', 'page', 'fa fa-home', 'admin', 1693031847898, 'admin', 0, '性能管理');
INSERT IGNORE INTO  `sys_menu` VALUES (9, '操作维护', 0, 552, 'page', '', '1', '0', 'D', '0', '1', 'page', 'fa fa-home', 'admin', 1693031847898, 'admin', 0, '操作维护');
INSERT IGNORE INTO  `sys_menu` VALUES (10, '跟踪管理', 0, 553, 'page', '', '1', '0', 'D', '0', '1', 'page', 'fa fa-home', 'admin', 1693031847898, 'admin', 1694079481395, '跟踪管理');
INSERT IGNORE INTO  `sys_menu` VALUES (11, '日志管理', 0, 554, 'page', '', '1', '0', 'D', '0', '1', 'page', 'fa fa-home', 'admin', 1693031847898, 'admin', 0, '日志管理');
INSERT IGNORE INTO  `sys_menu` VALUES (12, '安全管理', 0, 555, 'page', '', '1', '0', 'D', '0', '1', 'page', 'fa fa-home', 'admin', 1693031847898, 'admin', 0, '安全管理');
INSERT IGNORE INTO  `sys_menu` VALUES (13, '北向管理', 0, 556, 'page', '', '1', '0', 'D', '0', '0', 'page', 'fa fa-home', 'admin', 1693031847898, 'admin', 1693538966603, '北向管理');
INSERT IGNORE INTO  `sys_menu` VALUES (14, '系统管理', 0, 557, 'page', '', '1', '0', 'D', '0', '1', 'page', 'fa fa-home', 'admin', 1693031847898, 'admin', 0, '系统管理');
INSERT IGNORE INTO  `sys_menu` VALUES (15, '拓扑管理', 0, 558, 'page', '', '1', '0', 'D', '0', '0', 'page', 'fa fa-home', 'admin', 1693031847898, 'admin', 0, '拓扑管理');
INSERT IGNORE INTO  `sys_menu` VALUES (100, '用户管理', 2113, 1, 'user', 'system/user/index', '1', '1', 'M', '1', '1', 'system:user:list', 'icon-wocanyu', 'admin', 1697419844499, 'admin', 1697800399343, '用户管理菜单');
INSERT IGNORE INTO  `sys_menu` VALUES (101, '角色管理', 2113, 3, 'role', 'system/role/index', '1', '1', 'M', '1', '1', 'system:role:list', 'icon-anzhuo', 'admin', 1697419844502, 'admin', 1698202643250, '角色管理菜单');
INSERT IGNORE INTO  `sys_menu` VALUES (102, '分配角色', 1, 3, 'role/inline/auth-user/:roleId', 'system/role/auth-user', '1', '1', 'M', '0', '1', 'system:role:auth', '#', 'admin', 1697419844503, 'admin', 0, '分配角色内嵌隐藏菜单');
INSERT IGNORE INTO  `sys_menu` VALUES (103, '菜单管理', 1, 4, 'menu', 'system/menu/index', '1', '1', 'M', '1', '1', 'system:menu:list', 'icon-wofaqi', 'admin', 1697419844505, 'admin', 1697800009405, '菜单管理菜单');
INSERT IGNORE INTO  `sys_menu` VALUES (104, '部门管理', 2113, 5, 'dept', 'system/dept/index', '1', '1', 'M', '1', '1', 'system:dept:list', 'icon-xiangmuchengyuan', 'admin', 1697419844506, 'admin', 1697800442490, '部门管理菜单');
INSERT IGNORE INTO  `sys_menu` VALUES (105, '岗位管理', 2113, 6, 'post', 'system/post/index', '1', '1', 'M', '1', '1', 'system:post:list', 'icon-gonggaodayi', 'admin', 1697419844507, 'admin', 1697800455915, '岗位管理菜单');
INSERT IGNORE INTO  `sys_menu` VALUES (106, '字典管理', 1, 7, 'dict', 'system/dict/index', '1', '1', 'M', '1', '1', 'system:dict:list', 'icon-tubiaoku', 'admin', 1697419844508, 'admin', 1697800035015, '字典管理菜单');
INSERT IGNORE INTO  `sys_menu` VALUES (107, '字典数据', 1, 8, 'dict/inline/data/:dictId', 'system/dict/data', '1', '1', 'M', '0', '1', 'system:dict:data', '#', 'admin', 1697419844510, 'admin', 0, '字典数据内嵌隐藏菜单');
INSERT IGNORE INTO  `sys_menu` VALUES (108, '参数设置', 1, 9, 'config', 'system/config/index', '1', '1', 'M', '1', '1', 'system:config:list', 'icon-gongnengjieshao', 'admin', 1697419844516, 'admin', 1697800054945, '参数设置菜单');
INSERT IGNORE INTO  `sys_menu` VALUES (109, '通知公告', 1, 10, 'notice', 'system/notice/index', '1', '1', 'M', '0', '0', 'system:notice:list', '#', 'admin', 1697419844517, 'admin', 0, '通知公告菜单');
INSERT IGNORE INTO  `sys_menu` VALUES (111, '系统日志', 1, 11, 'log', '', '1', '1', 'D', '0', '0', '', '#', 'admin', 1697419844518, 'admin', 1697799363715, '日志管理菜单');
INSERT IGNORE INTO  `sys_menu` VALUES (112, '系统信息', 1, 3, 'system-info', 'monitor/system/info', '1', '1', 'M', '1', '1', 'monitor:system:info', 'icon-fuzhidaima', 'admin', 1697419844520, 'admin', 1698202844628, '系统信息菜单');
INSERT IGNORE INTO  `sys_menu` VALUES (113, '缓存信息', 1, 2, 'cache-info', 'monitor/cache/info', '1', '1', 'M', '0', '1', 'monitor:cache:info', 'icon-gongnengjieshao', 'admin', 1697419844521, 'admin', 1698203051097, '缓存信息菜单');
INSERT IGNORE INTO  `sys_menu` VALUES (114, '缓存管理', 1, 3, 'cache', 'monitor/cache/index', '1', '1', 'M', '0', '1', 'monitor:cache:list', 'icon-tubiaoku', 'admin', 1697419844522, 'admin', 1698202376923, '缓存列表菜单');
INSERT IGNORE INTO  `sys_menu` VALUES (115, '在线用户', 2113, 2, 'online', 'monitor/online/index', '1', '1', 'M', '1', '1', 'monitor:online:list', 'icon-xiangmuchengyuan', 'admin', 1697419844524, 'admin', 1698202655331, '在线用户菜单');
INSERT IGNORE INTO  `sys_menu` VALUES (116, '调度任务', 1, 1, 'job', 'monitor/job/index', '1', '1', 'M', '1', '1', 'monitor:job:list', 'icon-lishi', 'admin', 1697419844525, 'admin', 1698202787904, '调度任务菜单');
INSERT IGNORE INTO  `sys_menu` VALUES (117, '调度日志', 1, 2, '/system/job/inline/log/:jobId', 'monitor/job/log', '1', '1', 'M', '0', '1', 'monitor:job:log', '#', 'admin', 1697419844527, 'admin', 1698223385786, '调度日志内嵌隐藏菜单');
INSERT IGNORE INTO  `sys_menu` VALUES (118, '帮助文档', 3, 1, 'help', 'tool/help/index', '1', '1', 'M', '0', '0', 'monitor:help:list', '#', 'admin', 1697419844528, 'admin', 0, '系统接口菜单');
INSERT IGNORE INTO  `sys_menu` VALUES (500, '操作日志', 2089, 1, 'operate', 'system/log/operate/index', '1', '1', 'M', '1', '1', 'system:log:operate:list', 'icon-fuzhidaima', 'admin', 1697419793720, 'admin', 1697799388339, '操作日志菜单');
INSERT IGNORE INTO  `sys_menu` VALUES (501, '安全日志', 2089, 2, 'login', 'system/log/login/index', '1', '1', 'M', '1', '1', 'system:log:login:list', 'icon-fuzhidaima', 'admin', 1697419793722, 'admin', 1697799416758, '登录日志菜单');
INSERT IGNORE INTO  `sys_menu` VALUES (1000, '用户查询', 100, 1, '', '', '1', '1', 'B', '1', '1', 'system:user:query', '#', 'admin', 1694599800500, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1001, '用户新增', 100, 2, '', '', '1', '1', 'B', '1', '1', 'system:user:add', '#', 'admin', 1694599800538, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1002, '用户修改', 100, 3, '', '', '1', '1', 'B', '1', '1', 'system:user:edit', '#', 'admin', 1694599800587, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1003, '用户删除', 100, 4, '', '', '1', '1', 'B', '1', '1', 'system:user:remove', '#', 'admin', 1694599800616, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1004, '用户导出', 100, 5, '', '', '1', '1', 'B', '1', '1', 'system:user:export', '#', 'admin', 1694599800642, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1005, '用户导入', 100, 6, '', '', '1', '1', 'B', '1', '1', 'system:user:import', '#', 'admin', 1694599800677, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1006, '重置密码', 100, 7, '', '', '1', '1', 'B', '1', '1', 'system:user:resetPwd', '#', 'admin', 1694599800766, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1007, '角色查询', 101, 1, '', '', '1', '1', 'B', '1', '1', 'system:role:query', '#', 'admin', 1694599800806, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1008, '角色新增', 101, 2, '', '', '1', '1', 'B', '1', '1', 'system:role:add', '#', 'admin', 1694599800845, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1009, '角色修改', 101, 3, '', '', '1', '1', 'B', '1', '1', 'system:role:edit', '#', 'admin', 1694599800880, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1010, '角色删除', 101, 4, '', '', '1', '1', 'B', '1', '1', 'system:role:remove', '#', 'admin', 1694599800976, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1011, '角色导出', 101, 5, '', '', '1', '1', 'B', '1', '1', 'system:role:export', '#', 'admin', 1694599801089, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1012, '菜单查询', 103, 1, '', '', '1', '1', 'B', '1', '1', 'system:menu:query', '#', 'admin', 1694599801135, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1013, '菜单新增', 103, 2, '', '', '1', '1', 'B', '1', '1', 'system:menu:add', '#', 'admin', 1694599801165, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1014, '菜单修改', 103, 3, '', '', '1', '1', 'B', '1', '1', 'system:menu:edit', '#', 'admin', 1694599801192, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1015, '菜单删除', 103, 4, '', '', '1', '1', 'B', '1', '1', 'system:menu:remove', '#', 'admin', 1694599801246, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1016, '部门查询', 104, 1, '', '', '1', '1', 'B', '1', '1', 'system:dept:query', '#', 'admin', 1694599801305, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1017, '部门新增', 104, 2, '', '', '1', '1', 'B', '1', '1', 'system:dept:add', '#', 'admin', 1694599801342, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1018, '部门修改', 104, 3, '', '', '1', '1', 'B', '1', '1', 'system:dept:edit', '#', 'admin', 1694599801432, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1019, '部门删除', 104, 4, '', '', '1', '1', 'B', '1', '1', 'system:dept:remove', '#', 'admin', 1694599801463, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1020, '岗位查询', 105, 1, '', '', '1', '1', 'B', '1', '1', 'system:post:query', '#', 'admin', 1694599801496, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1021, '岗位新增', 105, 2, '', '', '1', '1', 'B', '1', '1', 'system:post:add', '#', 'admin', 1694599801532, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1022, '岗位修改', 105, 3, '', '', '1', '1', 'B', '1', '1', 'system:post:edit', '#', 'admin', 1694599801581, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1023, '岗位删除', 105, 4, '', '', '1', '1', 'B', '1', '1', 'system:post:remove', '#', 'admin', 1694599801619, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1024, '岗位导出', 105, 5, '', '', '1', '1', 'B', '1', '1', 'system:post:export', '#', 'admin', 1694599801648, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1025, '字典查询', 106, 1, '#', '', '1', '1', 'B', '1', '1', 'system:dict:query', '#', 'admin', 1694599801673, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1026, '字典新增', 106, 2, '#', '', '1', '1', 'B', '1', '1', 'system:dict:add', '#', 'admin', 1694599801711, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1027, '字典修改', 106, 3, '#', '', '1', '1', 'B', '1', '1', 'system:dict:edit', '#', 'admin', 1694599801741, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1028, '字典删除', 106, 4, '#', '', '1', '1', 'B', '1', '1', 'system:dict:remove', '#', 'admin', 1694599801772, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1029, '字典导出', 106, 5, '#', '', '1', '1', 'B', '1', '1', 'system:dict:export', '#', 'admin', 1694599801801, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1030, '参数查询', 108, 1, '#', '', '1', '1', 'B', '1', '1', 'system:config:query', '#', 'admin', 1694599801828, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1031, '参数新增', 108, 2, '#', '', '1', '1', 'B', '1', '1', 'system:config:add', '#', 'admin', 1694599801855, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1032, '参数修改', 108, 3, '#', '', '1', '1', 'B', '1', '1', 'system:config:edit', '#', 'admin', 1694599801888, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1033, '参数删除', 108, 4, '#', '', '1', '1', 'B', '1', '1', 'system:config:remove', '#', 'admin', 1694599801920, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1034, '参数导出', 108, 5, '#', '', '1', '1', 'B', '1', '1', 'system:config:export', '#', 'admin', 1694599801963, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1035, '公告查询', 109, 1, '#', '', '1', '1', 'B', '1', '1', 'system:notice:query', '#', 'admin', 1694599801991, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1036, '公告新增', 109, 2, '#', '', '1', '1', 'B', '1', '1', 'system:notice:add', '#', 'admin', 1694599802024, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1037, '公告修改', 109, 3, '#', '', '1', '1', 'B', '1', '1', 'system:notice:edit', '#', 'admin', 1694599802055, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1038, '公告删除', 109, 4, '#', '', '1', '1', 'B', '1', '1', 'system:notice:remove', '#', 'admin', 1694599802079, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1039, '操作查询', 500, 1, '#', '', '1', '1', 'B', '1', '1', 'system:log:operate:query', '#', 'admin', 1697419763809, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1040, '操作删除', 500, 2, '#', '', '1', '1', 'B', '1', '1', 'system:log:operate:remove', '#', 'admin', 1697419763812, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1041, '日志导出', 500, 3, '#', '', '1', '1', 'B', '1', '1', 'system:log:operate:export', '#', 'admin', 1697419763813, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1042, '登录查询', 501, 1, '#', '', '1', '1', 'B', '1', '1', 'system:log:login:query', '#', 'admin', 1697419763815, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1043, '登录删除', 501, 2, '#', '', '1', '1', 'B', '1', '1', 'system:log:login:remove', '#', 'admin', 1697419763816, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1044, '日志导出', 501, 3, '#', '', '1', '1', 'B', '1', '1', 'system:log:login:export', '#', 'admin', 1697419763817, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1045, '账户解锁', 501, 4, '#', '', '1', '1', 'B', '1', '1', 'system:log:login:unlock', '#', 'admin', 1697419763818, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1046, '缓存查询', 114, 1, '#', '', '1', '1', 'B', '1', '1', 'monitor:cache:query', '#', 'admin', 1694599802363, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1047, '缓存删除', 114, 2, '#', '', '1', '1', 'B', '1', '1', 'monitor:cache:remove', '#', 'admin', 1694599802393, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1048, '在线查询', 115, 1, '#', '', '1', '1', 'B', '1', '1', 'monitor:online:query', '#', 'admin', 1694599802422, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1049, '批量强退', 115, 2, '#', '', '1', '1', 'B', '1', '1', 'monitor:online:batchLogout', '#', 'admin', 1694599802453, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1050, '单条强退', 115, 3, '#', '', '1', '1', 'B', '1', '1', 'monitor:online:forceLogout', '#', 'admin', 1694599802483, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1051, '任务查询', 116, 1, '#', '', '1', '1', 'B', '1', '1', 'monitor:job:query', '#', 'admin', 1694599802551, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1052, '任务新增', 116, 2, '#', '', '1', '1', 'B', '1', '1', 'monitor:job:add', '#', 'admin', 1694599802581, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1053, '任务修改', 116, 3, '#', '', '1', '1', 'B', '1', '1', 'monitor:job:edit', '#', 'admin', 1694599802605, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1054, '任务删除', 116, 4, '#', '', '1', '1', 'B', '1', '1', 'monitor:job:remove', '#', 'admin', 1694599802641, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1055, '状态修改', 116, 5, '#', '', '1', '1', 'B', '1', '1', 'monitor:job:changeStatus', '#', 'admin', 1694599802675, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (1056, '任务导出', 116, 6, '#', '', '1', '1', 'B', '1', '1', 'monitor:job:export', '#', 'admin', 1694599802706, 'admin', 0, '');
INSERT IGNORE INTO  `sys_menu` VALUES (2009, 'UDM鉴权用户', 5, 1, 'auth', 'neUser/auth/index', '1', '0', 'M', '1', '1', 'neUser:auth:index', 'icon-xiangmuchengyuan', 'admin', 1693452185987, 'admin', 1695089843923, 'UDM鉴权用户');
INSERT IGNORE INTO  `sys_menu` VALUES (2010, 'UDM签约用户', 5, 2, 'sub', 'neUser/sub/index', '1', '0', 'M', '1', '1', 'neUser:sub:index', 'icon-xiangmuchengyuan', 'admin', 1693452241733, 'admin', 1695365399746, 'UDM签约用户');
INSERT IGNORE INTO  `sys_menu` VALUES (2011, '活动告警', 6, 1, '', 'page/alarm/alarmListDown.html', '1', '0', 'M', '1', '1', 'page', '#', 'admin', 1693452882261, 'admin', 1694679879968, '活动告警');
INSERT IGNORE INTO  `sys_menu` VALUES (2012, '历史告警', 6, 2, '', 'page/alarm/AlarmListHistory.html', '1', '0', 'M', '1', '1', 'page', '#', 'admin', 1693452917746, 'admin', 0, '历史告警');
INSERT IGNORE INTO  `sys_menu` VALUES (2013, '故障通用设置', 6, 3, '', 'page/alarm/alarmInfoConfig.html', '1', '0', 'M', '1', '1', 'page', '#', 'admin', 1693452963347, 'admin', 0, '故障通用设置');
INSERT IGNORE INTO  `sys_menu` VALUES (2014, '定时同步设置', 6, 4, '', 'page/alarm/synchronous.html', '1', '0', 'M', '1', '0', 'page', '#', 'admin', 1693452983027, 'admin', 1693544689303, '定时同步设置');
INSERT IGNORE INTO  `sys_menu` VALUES (2015, '健康状态检查', 6, 5, '', 'page/alarm/healthCheck.html', '1', '0', 'M', '1', '0', 'page', '#', 'admin', 1693453161355, 'admin', 1693544697864, '健康状态检查');
INSERT IGNORE INTO  `sys_menu` VALUES (2016, '告警前转', 6, 6, '', 'page/alarm/alarmForwarding.html', '1', '0', 'M', '1', '1', 'page', '#', 'admin', 1693453182346, 'admin', 0, '告警前转');
INSERT IGNORE INTO  `sys_menu` VALUES (2017, '网元管理', 7, 1, '', 'page/nfManage/list.html', '1', '0', 'M', '1', '1', 'page', '#', 'admin', 1693453229420, 'admin', 0, '网元管理');
INSERT IGNORE INTO  `sys_menu` VALUES (2018, '参数配置', 7, 2, '', 'page/configParam/list.html', '1', '0', 'M', '1', '1', 'page', '#', 'admin', 1693453250426, 'admin', 0, '参数配置');
INSERT IGNORE INTO  `sys_menu` VALUES (2019, '软件管理', 7, 3, '', 'page/softwareManage/softwareManage.html', '1', '0', 'M', '1', '1', 'page', '#', 'admin', 1693453272021, 'admin', 0, '软件管理');
INSERT IGNORE INTO  `sys_menu` VALUES (2020, '备份管理', 7, 5, '', 'page/softwareManage/backupManage.html', '1', '0', 'M', '1', '1', 'page', '#', 'admin', 1693453295606, 'admin', 0, '备份管理');
INSERT IGNORE INTO  `sys_menu` VALUES (2021, '配置参数设置', 7, 6, '', 'page/configParam/configParamSet.html', '1', '0', 'M', '1', '1', 'page', '#', 'admin', 1693453313510, 'admin', 0, '配置参数设置');
INSERT IGNORE INTO  `sys_menu` VALUES (2022, '任务管理', 8, 1, '', 'page/task/list.html', '1', '0', 'M', '1', '1', 'page', '#', 'admin', 1693453371550, 'admin', 0, '任务管理');
INSERT IGNORE INTO  `sys_menu` VALUES (2023, '性能数据', 8, 2, '', 'page/repair/list.html', '1', '0', 'M', '1', '1', 'page', '#', 'admin', 1693453391983, 'admin', 0, '性能数据');
INSERT IGNORE INTO  `sys_menu` VALUES (2024, '性能报表', 8, 3, '', 'page/task/perfReport.html', '1', '0', 'M', '1', '1', 'page', '#', 'admin', 1693453414547, 'admin', 0, '性能报表');
INSERT IGNORE INTO  `sys_menu` VALUES (2025, '性能门限', 8, 4, '', 'page/task/threshold.html', '1', '0', 'M', '1', '1', 'page', '#', 'admin', 1693453436131, 'admin', 0, '性能门限');
INSERT IGNORE INTO  `sys_menu` VALUES (2026, '黄金指标', 8, 5, '', 'page/gold/list.html', '1', '0', 'M', '1', '1', 'page', '#', 'admin', 1693453458286, 'admin', 0, '黄金指标');
INSERT IGNORE INTO  `sys_menu` VALUES (2027, '性能通用设置', 8, 7, '', 'page/task/perfReportSet.html', '1', '0', 'M', '0', '0', 'page', '#', 'admin', 1693453477609, 'admin', 0, '性能通用设置');
INSERT IGNORE INTO  `sys_menu` VALUES (2028, '自定义指标', 8, 8, '', 'page/indicators/list.html', '1', '0', 'M', '1', '1', 'page', '#', 'admin', 1693453497532, 'admin', 0, '自定义指标');
INSERT IGNORE INTO  `sys_menu` VALUES (2029, '对象模板', 8, 8, '', 'page/objectTemplate/list.html', '1', '0', 'M', '1', '0', 'page', '#', 'admin', 1693453519007, 'admin', 1693544534649, '对象模板');
INSERT IGNORE INTO  `sys_menu` VALUES (2030, '自定义测量数据', 8, 9, '', 'page/indicators/measuringData.html', '1', '0', 'M', '1', '0', 'page', '#', 'admin', 1693453547977, 'admin', 1693544544479, '自定义测量数据');
INSERT IGNORE INTO  `sys_menu` VALUES (2031, '拓扑视图', 15, 1, '', 'page/topology/topologyList.html', '1', '0', 'M', '1', '0', 'page', '#', 'admin', 1693453593545, 'admin', 0, '拓扑视图');
INSERT IGNORE INTO  `sys_menu` VALUES (2032, '系统维护', 14, 1, '', 'page/systemManage/systemOperation.html', '1', '0', 'M', '1', '1', 'page', '#', 'admin', 1693453620554, 'admin', 0, '系统维护');
INSERT IGNORE INTO  `sys_menu` VALUES (2033, '稳定性事件列表', 14, 2, '', 'page/systemManage/stabilityEvents.html', '1', '0', 'M', '1', '0', 'page', '#', 'admin', 1693453643025, 'admin', 1693544384309, '稳定性事件列表');
INSERT IGNORE INTO  `sys_menu` VALUES (2034, '稳定性统计报告', 14, 3, '', 'page/systemManage/stabilityReports.html', '1', '0', 'M', '1', '0', 'page', '#', 'admin', 1693453662988, 'admin', 1693544429662, '稳定性统计报告');
INSERT IGNORE INTO  `sys_menu` VALUES (2035, '系统备份', 14, 4, '', 'page/systemManage/systemBackup.html', '1', '0', 'M', '1', '0', 'page', '#', 'admin', 1693453682872, 'admin', 1693544442726, '系统备份');
INSERT IGNORE INTO  `sys_menu` VALUES (2036, '系统可扩展', 14, 5, '', 'page/systemManage/systemExtended.html', '1', '0', 'M', '1', '0', 'page', '#', 'admin', 1693453705157, 'admin', 1693544457342, '\"系统可扩展');
INSERT IGNORE INTO  `sys_menu` VALUES (2037, '证书管理', 14, 6, '', 'page/systemManage/certificateManage.html', '1', '0', 'M', '1', '0', 'page', '#', 'admin', 1693453726181, 'admin', 1693544468109, '证书管理');
INSERT IGNORE INTO  `sys_menu` VALUES (2038, '北向操作日志', 13, 0, '', 'page/log/nbiOperLogList.html', '1', '0', 'M', '0', '0', 'page', '#', 'admin', 1693453756619, 'admin', 0, '北向操作日志');
INSERT IGNORE INTO  `sys_menu` VALUES (2039, '北向告警日志', 13, 2, '', 'page/log/nbiAlarmLog.html', '1', '0', 'M', '0', '0', 'page', '#', 'admin', 1693453776700, 'admin', 1693539031280, '北向告警日志');
INSERT IGNORE INTO  `sys_menu` VALUES (2040, '北向通用设置', 13, 3, '', 'page/log/nbiSet.html', '1', '0', 'M', '0', '0', 'page', '#', 'admin', 1693453799234, 'admin', 0, '北向通用设置');
INSERT IGNORE INTO  `sys_menu` VALUES (2041, '用户管理', 12, 1, '', 'page/user/list.html', '1', '0', 'M', '0', '1', 'page', '#', 'admin', 1693453827502, 'admin', 0, '用户管理');
INSERT IGNORE INTO  `sys_menu` VALUES (2042, '在线状态', 12, 2, '', 'page/user/online.html', '1', '0', 'M', '0', '1', 'page', '#', 'admin', 1693453847338, 'admin', 0, '在线状态');
INSERT IGNORE INTO  `sys_menu` VALUES (2043, '用户组管理', 12, 2, '', 'page/group/list.html', '1', '0', 'M', '0', '0', 'page', '#', 'admin', 1693453875705, 'admin', 1693544575599, '用户组管理');
INSERT IGNORE INTO  `sys_menu` VALUES (2044, '安全策略', 12, 3, '', 'page/user/securityPolicy.html', '1', '0', 'M', '0', '0', 'page', '#', 'admin', 1693453892806, 'admin', 1693544590261, '安全策略');
INSERT IGNORE INTO  `sys_menu` VALUES (2045, '操作日志', 11, 1, '', 'page/log/operLogList.html', '1', '0', 'M', '0', '1', 'page', '#', 'admin', 1693453925729, 'admin', 0, '操作日志');
INSERT IGNORE INTO  `sys_menu` VALUES (2046, 'mml操作日志', 11, 2, '', 'page/log/mmlOperLogList.html', '1', '0', 'M', '0', '1', 'page', '#', 'admin', 1693453944710, 'admin', 0, 'mml操作日志');
INSERT IGNORE INTO  `sys_menu` VALUES (2047, '告警日志', 11, 3, '', 'page/log/alarmLogList.html', '1', '0', 'M', '0', '1', 'page', '#', 'admin', 1693453970200, 'admin', 0, '告警日志');
INSERT IGNORE INTO  `sys_menu` VALUES (2048, '安全日志', 11, 4, '', 'page/log/securityLogList.html', '1', '0', 'M', '0', '1', 'page', '#', 'admin', 1693453993525, 'admin', 0, '安全日志');
INSERT IGNORE INTO  `sys_menu` VALUES (2049, '告警前转日志', 11, 7, '', 'page/log/forwardingLog.html', '1', '0', 'M', '0', '1', 'page', '#', 'admin', 1693454015722, 'admin', 0, '告警前转日志');
INSERT IGNORE INTO  `sys_menu` VALUES (2050, '日志通用管理', 11, 8, '', 'page/log/logSet.html', '1', '0', 'M', '0', '1', 'page', '#', 'admin', 1693454038045, 'admin', 0, '日志通用管理');
INSERT IGNORE INTO  `sys_menu` VALUES (2051, '系统日志', 11, 9, '', 'page/log/systemLog.html', '1', '0', 'M', '0', '1', 'page', '#', 'admin', 1693454059224, 'admin', 0, '系统日志');
INSERT IGNORE INTO  `sys_menu` VALUES (2052, '跟踪任务', 10, 1, '', 'page/trace/taskList.html', '1', '0', 'M', '0', '1', 'page', '#', 'admin', 1693454085034, 'admin', 1694079489394, '跟踪任务');
INSERT IGNORE INTO  `sys_menu` VALUES (2053, '信令分析', 10, 2, '', 'page/trace/traceShow.html', '1', '0', 'M', '0', '1', 'page', '#', 'admin', 1693454104730, 'admin', 1694080368852, '信令分析');
INSERT IGNORE INTO  `sys_menu` VALUES (2054, '核心网池', 9, 0, '', 'page/mml/poolList.html', '1', '0', 'M', '0', '0', 'page', '#', 'admin', 1693454139150, 'admin', 1693544615419, '核心网池');
INSERT IGNORE INTO  `sys_menu` VALUES (2055, '操作维护MML', 9, 1, '', 'page/mml/omcList.html', '1', '0', 'M', '0', '1', 'page', '#', 'admin', 1693454188732, 'admin', 0, '操作维护MML');
INSERT IGNORE INTO  `sys_menu` VALUES (2056, '网元操作MML', 9, 3, '', 'page/mml/list.html', '1', '0', 'M', '0', '1', 'page', '#', 'admin', 1693454410796, 'admin', 0, '网元操作MML');
INSERT IGNORE INTO  `sys_menu` VALUES (2057, '用户数据MML', 9, 4, '', 'page/mml/udmList.html', '1', '0', 'M', '0', '1', 'page', '#', 'admin', 1693454436837, 'admin', 0, '用户数据MML');
INSERT IGNORE INTO  `sys_menu` VALUES (2058, '操作维护设置', 9, 5, '', 'page/mml/mmlSet.html', '1', '0', 'M', '0', '1', 'page', '#', 'admin', 1693454454951, 'admin', 0, '操作维护设置');
INSERT IGNORE INTO  `sys_menu` VALUES (2059, '角色管理', 12, 6, '', 'page/role/list.html', '1', '0', 'M', '0', '1', 'page', '#', 'admin', 1693454568739, 'admin', 0, '角色管理');
INSERT IGNORE INTO  `sys_menu` VALUES (2060, '菜单管理', 12, 7, '', 'page/menu/list.html', '1', '0', 'M', '0', '1', 'page', '#', 'admin', 1693454603776, 'admin', 0, '菜单管理');
INSERT IGNORE INTO  `sys_menu` VALUES (2065, '数据库URL查询', 0, 10011, '', '', '1', '1', 'B', '0', '0', 'page', '#', 'admin', 1693809550257, 'admin', 0, '数据库查询操作');
INSERT IGNORE INTO  `sys_menu` VALUES (2066, '数据库URL新增', 0, 10012, '', '', '1', '1', 'B', '0', '0', 'page', '#', 'admin', 1693809619984, 'admin', 0, '数据库URL新增');
INSERT IGNORE INTO  `sys_menu` VALUES (2067, '数据库URL更新', 0, 10013, '', '', '1', '1', 'B', '0', '0', 'page', '#', 'admin', 1693809717502, 'admin', 0, '数据库URL更新');
INSERT IGNORE INTO  `sys_menu` VALUES (2068, '数据库URL删除', 0, 10014, '', '', '1', '1', 'B', '0', '0', 'page', '#', 'admin', 1693809752149, 'admin', 0, '数据库URL删除');
INSERT IGNORE INTO  `sys_menu` VALUES (2069, '用户信息', 0, 559, 'page', '', '1', '0', 'D', '0', '1', 'page', 'fa fa-home', 'admin', 1694086316660, 'admin', 1694172973622, '');
INSERT IGNORE INTO  `sys_menu` VALUES (2070, 'UDM鉴权用户', 2069, 1, '', 'page/nfUserInfo/authList.html', '1', '0', 'M', '1', '1', 'page', '#', 'admin', 1694086376417, 'admin', 1694501279203, '');
INSERT IGNORE INTO  `sys_menu` VALUES (2071, '5G基站信息', 2069, 4, '', 'page/nfUserInfo/5gBase.html', '1', '0', 'M', '1', '1', 'page', '#', 'admin', 1694141926419, 'admin', 1694501340788, '');
INSERT IGNORE INTO  `sys_menu` VALUES (2072, 'IMS在线用户', 2069, 3, '', 'page/baseInfo/imsOnline.html', '1', '0', 'M', '1', '1', 'page', '#', 'admin', 1694425197596, 'admin', 1694575034285, '');
INSERT IGNORE INTO  `sys_menu` VALUES (2073, 'UDM签约用户', 2069, 2, '', 'page/nfUserInfo/subsList.html', '1', '0', 'M', '1', '1', 'page', '#', 'admin', 1694501260782, 'admin', 1694501323769, '');
INSERT IGNORE INTO  `sys_menu` VALUES (2074, 'UE在线信息', 2069, 4, '', 'page/baseInfo/ueInfoList.html', '1', '0', 'M', '1', '1', 'page', '#', 'admin', 1694595147722, 'admin', 1694595166749, '');
INSERT IGNORE INTO  `sys_menu` VALUES (2075, '网元管理', 4, 1, 'neManage', 'configManage/neManage/index', '1', '0', 'M', '1', '1', 'configManage:neManage:index', 'icon-biaoqing', 'admin', 1694600408970, 'admin', 0, '网元管理');
INSERT IGNORE INTO  `sys_menu` VALUES (2076, '参数配置', 4, 2, 'configParam', 'configManage/configParam/index', '1', '0', 'M', '1', '1', 'configManage:configParam:index', 'icon-piliang', 'admin', 1694656727697, 'admin', 1694664268131, '参数配置');
INSERT IGNORE INTO  `sys_menu` VALUES (2077, '信令抓包', 10, 3, '', 'page/trace/pcap.html', '1', '0', 'M', '1', '1', 'page', '#', 'admin', 1694834069721, 'admin', 0, 'tcpdump抓包pcap文件');
INSERT IGNORE INTO  `sys_menu` VALUES (2078, '备份管理', 4, 3, 'backupManage', 'configManage/backupManage/index', '1', '0', 'M', '1', '1', 'configManage:backupManage:index', 'icon-soutubiao', 'admin', 1695017673281, 'admin', 0, '备份管理');
INSERT IGNORE INTO  `sys_menu` VALUES (2079, '软件管理', 4, 4, 'softwareManage', 'configManage/softwareManage/index', '1', '0', 'M', '1', '1', 'configManage:softwareManage:index', 'icon-huidingbu', 'admin', 1695024225185, 'admin', 0, '软件管理');
INSERT IGNORE INTO  `sys_menu` VALUES (2080, 'IMS在线用户', 5, 4, 'ims', 'neUser/ims/index', '1', '0', 'M', '1', '1', 'neUser:ims:index', 'icon-xiangmuchengyuan', 'admin', 1695090024184, 'admin', 0, 'IMS在线用户');
INSERT IGNORE INTO  `sys_menu` VALUES (2081, 'UE在线信息', 5, 6, 'ue', 'neUser/ue/index', '1', '0', 'M', '1', '1', 'neUser:ue:index', 'icon-xiangmuchengyuan', 'admin', 1695090083747, 'admin', 0, 'UE在线信息');
INSERT IGNORE INTO  `sys_menu` VALUES (2082, '5G基站信息', 5, 7, 'base5G', 'neUser/base5G/index', '1', '0', 'M', '1', '1', 'neUser:base5G:index', 'icon-paixu', 'admin', 1695090192856, 'admin', 1695349622025, '5G基站信息');
INSERT IGNORE INTO  `sys_menu` VALUES (2083, '跟踪', 0, 6, 'traceManage', '', '1', '0', 'D', '1', '1', '', 'icon-wenjian', 'admin', 1695379608530, 'admin', 1697772701241, '跟踪管理');
INSERT IGNORE INTO  `sys_menu` VALUES (2084, '跟踪任务', 2083, 1, 'task', 'traceManage/task/index', '1', '0', 'M', '1', '1', 'traceManage:task:index', 'icon-chexiao', 'admin', 1695379860503, 'admin', 1695696631196, '跟踪任务');
INSERT IGNORE INTO  `sys_menu` VALUES (2085, '信令分析', 2083, 1, 'analysis', 'traceManage/analysis/index', '1', '0', 'M', '1', '1', 'traceManage:analysis:index', 'icon-gongnengjieshao', 'admin', 1695379915764, 'admin', 1695696640147, '信令分析');
INSERT IGNORE INTO  `sys_menu` VALUES (2086, '信令抓包', 2083, 3, 'pcap', 'traceManage/pcap/index', '1', '0', 'M', '1', '1', 'traceManage:pcap:index', 'icon-soutubiao', 'admin', 1695380002462, 'admin', 1695696648928, '信令抓包');
INSERT IGNORE INTO  `sys_menu` VALUES (2087, '故障', 0, 2, 'faultManage', '', '1', '0', 'D', '1', '1', '', 'icon-wenjian', 'admin', 1695638038379, 'admin', 1697773375553, '故障管理');
INSERT IGNORE INTO  `sys_menu` VALUES (2088, '活动告警', 2087, 1, 'active-alarm', 'faultManage/active-alarm/index', '1', '0', 'M', '1', '1', 'faultManage:active-alarm:index', 'icon-wenjian', 'admin', 1695639086834, 'admin', 1695639108038, '活动告警');
INSERT IGNORE INTO  `sys_menu` VALUES (2089, '日志', 0, 9, 'logManage', '', '1', '0', 'D', '1', '1', '', 'icon-wenjian', 'admin', 1695697146107, 'admin', 1697774117401, '日志管理');
INSERT IGNORE INTO  `sys_menu` VALUES (2090, '操作日志(旧)', 2089, 1, 'operation', 'logManage/operation/index', '1', '0', 'M', '0', '0', 'logManage:operation:index', 'icon-fuzhidaima', 'admin', 1695697237355, 'admin', 1697799271787, '操作日志');
INSERT IGNORE INTO  `sys_menu` VALUES (2091, 'MML日志', 2089, 2, 'mml', 'logManage/mml/index', '1', '0', 'M', '1', '1', 'logManage:mml:index', 'icon-wocanyu', 'admin', 1695697317483, 'admin', 1697772801649, '操作MML日志');
INSERT IGNORE INTO  `sys_menu` VALUES (2092, '告警日志', 2089, 3, 'alarm-log', 'logManage/alarm/index', '1', '0', 'M', '1', '1', 'logManage:alarm:index', 'icon-fuzhidaima', 'admin', 1695697384204, 'admin', 0, '告警日志');
INSERT IGNORE INTO  `sys_menu` VALUES (2093, '安全日志(旧)', 2089, 6, 'security-log', 'logManage/security/index', '1', '0', 'M', '0', '0', 'logManage/security/index', 'icon-gongnengjieshao', 'admin', 1695697433544, 'admin', 1697796820151, '安全日志');
INSERT IGNORE INTO  `sys_menu` VALUES (2094, '告警前转日志', 2089, 7, 'forwarding', 'logManage/forwarding/index', '1', '0', 'M', '1', '1', 'logManage:forwarding:index', 'icon-huizhiguize', 'admin', 1695697548801, 'admin', 0, '告警前转日志');
INSERT IGNORE INTO  `sys_menu` VALUES (2095, '日志设置', 2089, 15, 'logSet', 'logManage/logSet/index', '1', '0', 'M', '1', '1', 'logManage:logSet:index', 'icon-you', 'admin', 1695697636698, 'admin', 0, '日志设置');
INSERT IGNORE INTO  `sys_menu` VALUES (2096, '用户会话', 2, 10, 'session', 'monitor/session/index', '1', '0', 'M', '0', '0', 'monitor:session:index', 'icon-gerenzhanghu', 'admin', 1695698108049, 'admin', 1697796757608, '在线用户-旧用户在线');
INSERT IGNORE INTO  `sys_menu` VALUES (2097, '历史告警', 2087, 2, 'history-alarm', 'faultManage/history-alarm/index', '1', '0', 'M', '1', '1', 'faultManage/history-alarm/index', 'icon-huizhiguize', 'admin', 1696665696950, 'admin', 1697773947314, '');
INSERT IGNORE INTO  `sys_menu` VALUES (2098, '故障通用设置', 2087, 3, 'fault-setting', 'faultManage/fault-setting/index', '1', '0', 'M', '1', '1', 'faultManage/fault-setting/index', 'icon-gonggaodayi', 'admin', 1696668601941, 'admin', 1697773954925, '');
INSERT IGNORE INTO  `sys_menu` VALUES (2099, '性能', 0, 5, 'perfManage', '', '1', '0', 'D', '1', '1', '', 'icon-soutubiao', 'admin', 1696923032637, 'admin', 1697774020192, '性能管理');
INSERT IGNORE INTO  `sys_menu` VALUES (2100, '任务管理', 2099, 1, 'taskManage', 'perfManage/taskManage/index', '1', '0', 'M', '1', '1', 'perfManage:taskManage:index', 'icon-wofaqi', 'admin', 1696923215654, 'admin', 0, '任务管理');
INSERT IGNORE INTO  `sys_menu` VALUES (2101, '性能数据', 2099, 2, 'perfData', 'perfManage/perfData/index', '1', '0', 'M', '1', '1', 'perfManage:perfData:index', 'icon-soutubiao', 'admin', 1696923311093, 'admin', 0, '性能数据');
INSERT IGNORE INTO  `sys_menu` VALUES (2102, '性能报表', 2099, 3, 'perfReport', 'perfManage/perfReport/index', '1', '0', 'M', '0', '0', 'perfManage:perfReport:index', 'icon-gonggaodayi', 'admin', 1696923390542, 'admin', 1698227036422, '性能报表');
INSERT IGNORE INTO  `sys_menu` VALUES (2103, '性能门限', 2099, 4, 'perfThreshold', 'perfManage/perfThreshold/index', '1', '0', 'M', '1', '1', 'perfManage:perfThreshold:index', 'icon-zhuanrang', 'admin', 1696923461901, 'admin', 0, '性能门限');
INSERT IGNORE INTO  `sys_menu` VALUES (2104, '黄金指标', 2099, 5, 'goldTarget', 'perfManage/goldTarget/index', '1', '0', 'M', '1', '1', 'perfManage:goldTarget:index', 'icon-soutubiao', 'admin', 1696923551120, 'admin', 0, '黄金指标');
INSERT IGNORE INTO  `sys_menu` VALUES (2105, '自定义指标', 2099, 6, 'customTarget', 'perfManage/customTarget/index', '1', '0', 'M', '0', '0', 'perfManage:customTarget:index', 'icon-fanhui1', 'admin', 1696923639489, 'admin', 1697077437451, '自定义指标');
INSERT IGNORE INTO  `sys_menu` VALUES (2106, '性能通用设置', 2099, 7, 'perfSet', 'perfManage/perfSet/index', '1', '0', 'M', '0', '0', 'perfManage:perfSet:index', 'icon-gonggao', 'admin', 1696923787076, 'admin', 0, '性能通用设置');
INSERT IGNORE INTO  `sys_menu` VALUES (2107, 'MML', 0, 8, 'mmlManage', '', '1', '0', 'D', '1', '1', '', 'icon-wenjian', 'admin', 1696924634152, 'admin', 1697774123662, 'MML管理');
INSERT IGNORE INTO  `sys_menu` VALUES (2108, '网元操作', 2107, 1, 'neOperate', 'mmlManage/neOperate/index', '1', '0', 'M', '1', '1', 'mmlManage:neOperate:index', 'icon-huizhiguize', 'admin', 1696924784723, 'admin', 0, '网元操作');
INSERT IGNORE INTO  `sys_menu` VALUES (2109, 'UDM操作', 2107, 2, 'udmOperate', 'mmlManage/udmOperate/index', '1', '0', 'M', '1', '1', 'mmlManage:udmOperate:index', 'icon-gonggaodayi', 'admin', 1696924889906, 'admin', 1697005003783, '用户数据指定网元UDM');
INSERT IGNORE INTO  `sys_menu` VALUES (2110, 'MML设置', 2107, 4, 'mmlSet', 'mmlManage/mmlSet/index', '1', '0', 'M', '1', '1', 'mmlManage:mmlSet:index', 'icon-wofaqi', 'admin', 1696924994794, 'admin', 0, 'MML设置');
INSERT IGNORE INTO  `sys_menu` VALUES (2111, 'OMC操作', 2107, 3, 'omcOperate', 'mmlManage/omcOperate/index', '1', '0', 'M', '1', '1', 'mmlManage:omcOperate:index', 'icon-huizhiguize', 'admin', 1696925543196, 'admin', 0, 'OMC操作');
INSERT IGNORE INTO  `sys_menu` VALUES (2112, '许可证管理', 4, 5, 'license', 'configManage/license/index', '1', '0', 'M', '1', '1', 'configManage/license/index', 'icon-shang', 'admin', 1696989886481, 'admin', 1697013380449, 'License管理');
INSERT IGNORE INTO  `sys_menu` VALUES (2113, '安全', 0, 14, 'security', '', '1', '0', 'D', '1', '1', '', 'icon-huizhiguize', 'admin', 1697773235117, 'admin', 1697773340890, '');
INSERT IGNORE INTO  `sys_menu` VALUES (2114, '系统设置', 1, 12, 'setting', 'system/setting/index', '1', '0', 'M', '1', '1', 'system:setting:index', 'icon-piliang', 'admin', 1698060561910, '', 0, '系统设置');

SET FOREIGN_KEY_CHECKS = 1;
