PRAGMA foreign_keys = false;

UPDATE "ne_host" SET "host_type" = 'ssh', "group_id" = '1', "title" = 'OMC_001_27149', "addr" = '127.0.0.1', "port" = 27149, "user" = 'new_user', "auth_mode" = '0', "password" = 'gXwcbamRA5uMU2NGpYFXXmn7LMDG7zroZOt6T2lFVbM=', "private_key" = '', "pass_phrase" = '', "db_name" = '', "remark" = '', "create_by" = 'system', "create_time" = 1729063407329, "update_by" = '', "update_time" = 0 WHERE "id" = 1;

UPDATE "ne_host" SET "host_type" = 'ssh', "group_id" = '1', "title" = 'IMS_001_27149', "addr" = '127.0.0.1', "port" = 27149, "user" = 'new_user', "auth_mode" = '0', "password" = 'gXwcbamRA5uMU2NGpYFXXmn7LMDG7zroZOt6T2lFVbM=', "private_key" = '', "pass_phrase" = '', "db_name" = '', "remark" = '', "create_by" = 'system', "create_time" = 1729063407329, "update_by" = '', "update_time" = 0 WHERE "id" = 3;

UPDATE "ne_host" SET "host_type" = 'telnet', "group_id" = '1', "title" = 'IMS_001_4100', "addr" = '192.168.201.22', "port" = 4100, "user" = 'admin', "auth_mode" = '0', "password" = 'NUBonCin4GZgl7o12YjeClE8ToQmYp9KWdhMjSNxc2M=', "private_key" = '', "pass_phrase" = '', "db_name" = '', "remark" = '', "create_by" = 'system', "create_time" = 1729063407329, "update_by" = '', "update_time" = 0 WHERE "id" = 4;

UPDATE "ne_host" SET "host_type" = 'ssh', "group_id" = '1', "title" = 'AMF_001_27149', "addr" = '127.0.0.1', "port" = 27149, "user" = 'new_user', "auth_mode" = '0', "password" = 'gXwcbamRA5uMU2NGpYFXXmn7LMDG7zroZOt6T2lFVbM=', "private_key" = '', "pass_phrase" = '', "db_name" = '', "remark" = '', "create_by" = 'system', "create_time" = 1729063407329, "update_by" = '', "update_time" = 0 WHERE "id" = 5;

UPDATE "ne_host" SET "host_type" = 'telnet', "group_id" = '1', "title" = 'AMF_001_4100', "addr" = '127.0.0.9', "port" = 4100, "user" = 'admin', "auth_mode" = '0', "password" = 'NUBonCin4GZgl7o12YjeClE8ToQmYp9KWdhMjSNxc2M=', "private_key" = '', "pass_phrase" = '', "db_name" = '', "remark" = '', "create_by" = 'system', "create_time" = 1729063407329, "update_by" = '', "update_time" = 0 WHERE "id" = 6;

UPDATE "ne_host" SET "host_type" = 'ssh', "group_id" = '1', "title" = 'AUSF_001_27149', "addr" = '127.0.0.1', "port" = 27149, "user" = 'new_user', "auth_mode" = '0', "password" = 'gXwcbamRA5uMU2NGpYFXXmn7LMDG7zroZOt6T2lFVbM=', "private_key" = '', "pass_phrase" = '', "db_name" = '', "remark" = '', "create_by" = 'system', "create_time" = 1729063407329, "update_by" = '', "update_time" = 0 WHERE "id" = 7;

UPDATE "ne_host" SET "host_type" = 'telnet', "group_id" = '1', "title" = 'AUSF_001_4100', "addr" = '127.0.0.4', "port" = 4100, "user" = 'admin', "auth_mode" = '0', "password" = 'NUBonCin4GZgl7o12YjeClE8ToQmYp9KWdhMjSNxc2M=', "private_key" = '', "pass_phrase" = '', "db_name" = '', "remark" = '', "create_by" = 'system', "create_time" = 1729063407329, "update_by" = '', "update_time" = 0 WHERE "id" = 8;

UPDATE "ne_host" SET "host_type" = 'ssh', "group_id" = '1', "title" = 'UDM_001_27149', "addr" = '127.0.0.1', "port" = 27149, "user" = 'new_user', "auth_mode" = '0', "password" = 'gXwcbamRA5uMU2NGpYFXXmn7LMDG7zroZOt6T2lFVbM=', "private_key" = '', "pass_phrase" = '', "db_name" = '', "remark" = '', "create_by" = 'system', "create_time" = 1729063407329, "update_by" = '', "update_time" = 0 WHERE "id" = 9;

UPDATE "ne_host" SET "host_type" = 'telnet', "group_id" = '1', "title" = 'UDM_001_4100', "addr" = '127.0.0.5', "port" = 4100, "user" = 'admin', "auth_mode" = '0', "password" = 'NUBonCin4GZgl7o12YjeClE8ToQmYp9KWdhMjSNxc2M=', "private_key" = '', "pass_phrase" = '', "db_name" = '', "remark" = '', "create_by" = 'system', "create_time" = 1729063407329, "update_by" = '', "update_time" = 0 WHERE "id" = 10;

UPDATE "ne_host" SET "host_type" = 'redis', "group_id" = '1', "title" = 'UDM_001_6379', "addr" = '127.0.0.1', "port" = 6379, "user" = 'udmdb', "auth_mode" = '0', "password" = 'nO3fEhtuKuBkQE5ozsUhNfzn02vhnyxYTEiPn2CIlr4=', "private_key" = '', "pass_phrase" = '', "db_name" = '0', "remark" = '', "create_by" = 'system', "create_time" = 1729063407329, "update_by" = '', "update_time" = 0 WHERE "id" = 11;

UPDATE "ne_host" SET "host_type" = 'ssh', "group_id" = '1', "title" = 'SMF_001_27149', "addr" = '127.0.0.1', "port" = 27149, "user" = 'new_user', "auth_mode" = '0', "password" = 'gXwcbamRA5uMU2NGpYFXXmn7LMDG7zroZOt6T2lFVbM=', "private_key" = '', "pass_phrase" = '', "db_name" = '', "remark" = '', "create_by" = 'system', "create_time" = 1729063407329, "update_by" = '', "update_time" = 0 WHERE "id" = 12;

UPDATE "ne_host" SET "host_type" = 'telnet', "group_id" = '1', "title" = 'SMF_001_4100', "addr" = '127.0.0.6', "port" = 4100, "user" = 'admin', "auth_mode" = '0', "password" = 'NUBonCin4GZgl7o12YjeClE8ToQmYp9KWdhMjSNxc2M=', "private_key" = '', "pass_phrase" = '', "db_name" = '', "remark" = '', "create_by" = 'system', "create_time" = 1729063407329, "update_by" = '', "update_time" = 0 WHERE "id" = 13;

UPDATE "ne_host" SET "host_type" = 'ssh', "group_id" = '1', "title" = 'PCF_001_27149', "addr" = '127.0.0.1', "port" = 27149, "user" = 'new_user', "auth_mode" = '0', "password" = 'gXwcbamRA5uMU2NGpYFXXmn7LMDG7zroZOt6T2lFVbM=', "private_key" = '', "pass_phrase" = '', "db_name" = '', "remark" = '', "create_by" = 'system', "create_time" = 1729063407329, "update_by" = '', "update_time" = 0 WHERE "id" = 14;

UPDATE "ne_host" SET "host_type" = 'telnet', "group_id" = '1', "title" = 'PCF_001_4100', "addr" = '127.0.0.7', "port" = 4100, "user" = 'admin', "auth_mode" = '0', "password" = 'NUBonCin4GZgl7o12YjeClE8ToQmYp9KWdhMjSNxc2M=', "private_key" = '', "pass_phrase" = '', "db_name" = '', "remark" = '', "create_by" = 'system', "create_time" = 1729063407329, "update_by" = '', "update_time" = 0 WHERE "id" = 15;

UPDATE "ne_host" SET "host_type" = 'ssh', "group_id" = '1', "title" = 'UPF_001_27149', "addr" = '127.0.0.1', "port" = 27149, "user" = 'new_user', "auth_mode" = '0', "password" = 'gXwcbamRA5uMU2NGpYFXXmn7LMDG7zroZOt6T2lFVbM=', "private_key" = '', "pass_phrase" = '', "db_name" = '', "remark" = '', "create_by" = 'system', "create_time" = 1729063407329, "update_by" = '', "update_time" = 0 WHERE "id" = 20;

UPDATE "ne_host" SET "host_type" = 'telnet', "group_id" = '1', "title" = 'UPF_001_4100', "addr" = '127.0.0.8', "port" = 4100, "user" = 'admin', "auth_mode" = '0', "password" = 'NUBonCin4GZgl7o12YjeClE8ToQmYp9KWdhMjSNxc2M=', "private_key" = '', "pass_phrase" = '', "db_name" = '', "remark" = '', "create_by" = 'system', "create_time" = 1729063407329, "update_by" = '', "update_time" = 0 WHERE "id" = 21;

UPDATE "ne_host" SET "host_type" = 'telnet', "group_id" = '1', "title" = 'UPF_001_5002', "addr" = '127.0.0.8', "port" = 5002, "user" = 'admin', "auth_mode" = '0', "password" = '', "private_key" = '', "pass_phrase" = '', "db_name" = '', "remark" = '', "create_by" = 'system', "create_time" = 1729063407329, "update_by" = '', "update_time" = 0 WHERE "id" = 22;

UPDATE "ne_info" SET "ne_type" = 'OMC', "ne_id" = '001', "rm_uid" = '4400HXOMC001', "ne_name" = 'OMC_001', "ip" = '172.19.9.132', "port" = 33030, "pv_flag" = 'PNF', "province" = 'AreaNet', "vendor_name" = '-', "dn" = '-', "ne_address" = '-', "host_ids" = '1,2', "status" = 0, "remark" = '', "create_by" = 'system', "create_time" = 1713928436971, "update_by" = '', "update_time" = 0 WHERE "id" = 1;

UPDATE "ne_info" SET "ne_type" = 'IMS', "ne_id" = '001', "rm_uid" = '4400HXIMS001', "ne_name" = 'IMS_001', "ip" = '192.168.201.22', "port" = 33030, "pv_flag" = 'PNF', "province" = 'AreaNet', "vendor_name" = '-', "dn" = '-', "ne_address" = '-', "host_ids" = '3,4', "status" = 0, "remark" = '', "create_by" = 'system', "create_time" = 1713928436971, "update_by" = '', "update_time" = 0 WHERE "id" = 2;

UPDATE "ne_info" SET "ne_type" = 'AMF', "ne_id" = '001', "rm_uid" = '4400HXAMF001', "ne_name" = 'AMF_001', "ip" = '127.0.0.9', "port" = 33030, "pv_flag" = 'PNF', "province" = 'AreaNet', "vendor_name" = '-', "dn" = '-', "ne_address" = '', "host_ids" = '5,6', "status" = 0, "remark" = '', "create_by" = 'system', "create_time" = 1713928436971, "update_by" = '', "update_time" = 0 WHERE "id" = 3;

UPDATE "ne_info" SET "ne_type" = 'AUSF', "ne_id" = '001', "rm_uid" = '4400HXAUSF001', "ne_name" = 'AUSF_001', "ip" = '127.0.0.4', "port" = 33030, "pv_flag" = 'PNF', "province" = 'AreaNet', "vendor_name" = '-', "dn" = '-', "ne_address" = '', "host_ids" = '7,8', "status" = 0, "remark" = '', "create_by" = 'system', "create_time" = 1713928436971, "update_by" = '', "update_time" = 0 WHERE "id" = 4;

UPDATE "ne_info" SET "ne_type" = 'UDM', "ne_id" = '001', "rm_uid" = '4400HXUDM001', "ne_name" = 'UDM_001', "ip" = '127.0.0.5', "port" = 33030, "pv_flag" = 'PNF', "province" = 'AreaNet', "vendor_name" = '-', "dn" = '-', "ne_address" = '-', "host_ids" = '9,10,11', "status" = 0, "remark" = '', "create_by" = 'system', "create_time" = 1713928436971, "update_by" = '', "update_time" = 0 WHERE "id" = 5;

UPDATE "ne_info" SET "ne_type" = 'SMF', "ne_id" = '001', "rm_uid" = '4400HXSMF001', "ne_name" = 'SMF_001', "ip" = '127.0.0.6', "port" = 33030, "pv_flag" = 'PNF', "province" = 'AreaNet', "vendor_name" = '-', "dn" = '-', "ne_address" = '-', "host_ids" = '12,13', "status" = 0, "remark" = '', "create_by" = 'system', "create_time" = 1713928436971, "update_by" = '', "update_time" = 0 WHERE "id" = 6;

UPDATE "ne_info" SET "ne_type" = 'PCF', "ne_id" = '001', "rm_uid" = '4400HXPCF001', "ne_name" = 'PCF_001', "ip" = '127.0.0.7', "port" = 33030, "pv_flag" = 'PNF', "province" = 'AreaNet', "vendor_name" = '-', "dn" = '-', "ne_address" = '-', "host_ids" = '14,15', "status" = 0, "remark" = '', "create_by" = 'system', "create_time" = 1713928436971, "update_by" = '', "update_time" = 0 WHERE "id" = 7;

UPDATE "ne_info" SET "ne_type" = 'UPF', "ne_id" = '001', "rm_uid" = '4400HXUPF001', "ne_name" = 'UPF_001', "ip" = '127.0.0.8', "port" = 33030, "pv_flag" = 'PNF', "province" = 'AreaNet', "vendor_name" = '-', "dn" = '-', "ne_address" = '', "host_ids" = '20,21,22', "status" = 0, "remark" = '', "create_by" = 'system', "create_time" = 1713928436971, "update_by" = '', "update_time" = 0 WHERE "id" = 10;

PRAGMA foreign_keys = true;