--
-- Table structure for table `udm_volte_ims`
--
CREATE TABLE IF NOT EXISTS `udm_volte_ims` (
  `id` int NOT NULL AUTO_INCREMENT COMMENT '主键',
  `imsi` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL COMMENT 'SIM卡/USIM卡ID',
  `msisdn` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '用户电话号码',
  `ne_id` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'UDM网元标识',
  `tag` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '0=VoIP, 1=VoLTE',
  `vni` varchar(128) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'VNI',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE KEY `uk_volte_imsi_ne` (`imsi`,`msisdn`,`ne_id`) USING BTREE COMMENT 'imsi_msisdn_neid唯一主键',
  KEY `idx_volte_tag` (`tag`) USING BTREE COMMENT 'tag索引'
) ENGINE=InnoDB AUTO_INCREMENT=1 DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci COMMENT='UDM用户数据_VolteIMS用户';

-- Dump completed on 2025-04-22 15:26:56
