--
-- Table structure for table `udm_sub`
--

DROP TABLE IF EXISTS `udm_sub`; 
CREATE TABLE `udm_sub` (
  `id` int NOT NULL AUTO_INCREMENT COMMENT '主键',
  `imsi` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL COMMENT 'SIM卡/USIM卡ID',
  `msisdn` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '用户电话号码',
  `ne_id` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'UDM网元标识',
  `am_dat` varchar(1500) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'AmData',
  `ambr` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'AmData SubUeAMBRTemp',
  `nssai` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'AmData SubSNSSAITemp',
  `rat` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'AmData RAT 0x00:VIRTUAL 0x01:WLAN 0x02:EUTRA 0x03:NR',
  `arfb` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'AmData AreaForbidden',
  `sar` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'AmData serviceAreaRestrictTemp',
  `cn_type` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'AmData CNType 0x00:EPC和5GC 0x01:5GC 0x02:EPC 0x03:EPC+5GC',
  `rfsp_index` varchar(50) COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'AmData RfspIndex',
  `reg_timer` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'AmData RegTimer',
  `ue_usage_type` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'AmData UEUsageType',
  `active_time` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'AmData ActiveTime',
  `mico` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'AmData MICO',
  `odb_ps` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'AmData ODB_PS 0-all,1-hplmn,2-vplmn',
  `group_id` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'AmData GroupId',
  `eps_dat` varchar(1500) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'EpsDat',
  `eps_flag` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'EpsDat epsFlag',
  `eps_odb` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'EpsDat epsOdb',
  `hplmn_odb` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'EpsDat hplmnOdb',
  `ard` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'EpsDat Ard',
  `epstpl` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'EpsDat Epstpl',
  `context_id` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'EpsDat ContextId',
  `apn_mum` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'EpsDat apnNum',
  `apn_context` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'EpsDat apnContext',
  `static_ip` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'EpsDat staticIp 指给4G UE分配的静态IP，没有可不带此字段名',
  `sm_data` varchar(1500) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'smData',
  `smf_sel` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'smfSel',
  `cag` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'CAG',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE KEY `uk_sub_imsi_ne` (`imsi`,`ne_id`) USING BTREE COMMENT 'imsi_neid唯一主键'
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci COMMENT='UDM用户数据_签约';

-- Dump completed on 2025-02-14 15:26:56
