--
-- Table structure for table `sys_log_user_password`
--

DROP TABLE IF EXISTS `sys_log_user_password`;
CREATE TABLE `sys_log_user_password` (
  `id` bigint NOT NULL AUTO_INCREMENT COMMENT 'ID',
  `user_id` bigint DEFAULT '0' COMMENT '用户ID',
  `user_name` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '用户账号',
  `password` varchar(128) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '密码',
  `create_by` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '创建者',
  `create_time` bigint DEFAULT '0' COMMENT '创建时间',
  PRIMARY KEY (`id`) USING BTREE,
  KEY `idx_id_name_time` (`user_id`,`user_name`,`create_time`) USING BTREE COMMENT '用户ID_用户名_创建时间'
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC COMMENT='系统_用户密码变更日志表';

-- Dump completed on 2025-03-31 17:24:56
