-- MariaDB dump 10.19  Distrib 10.6.16-MariaDB, for debian-linux-gnu (x86_64)
--
-- Table structure for table `monitor_network`
--

DROP TABLE IF EXISTS `monitor_network`;
/*!40101 SET @saved_cs_client     = @@character_set_client */;
/*!40101 SET character_set_client = utf8 */;
CREATE TABLE `monitor_network` (
  `id` bigint NOT NULL AUTO_INCREMENT COMMENT 'id',
  `create_time` bigint DEFAULT '0' COMMENT '创建时间',
  `name` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL COMMENT '网卡名',
  `up` float DEFAULT '0' COMMENT '上行',
  `down` float DEFAULT '0' COMMENT '下行',
  `ne_type` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT NULL COMMENT '网元类型',
  `ne_id` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT NULL COMMENT '网元ID',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC COMMENT='监控_网络IO';

-- Dump completed on 2025-02-14 15:26:56
