-- MariaDB dump 10.19  Distrib 10.6.16-MariaDB, for debian-linux-gnu (x86_64)
--
-- Table structure for table `monitor_base`
--

DROP TABLE IF EXISTS `monitor_base`;
CREATE TABLE `monitor_base` (
  `id` bigint NOT NULL AUTO_INCREMENT COMMENT 'id',
  `create_time` bigint DEFAULT '0' COMMENT '创建时间',
  `cpu` float DEFAULT '0' COMMENT 'cpu使用率',
  `load_usage` float DEFAULT '0' COMMENT 'cpu平均使用率',
  `cpu_load1` float DEFAULT '0' COMMENT 'cpu使用1分钟',
  `cpu_load5` float DEFAULT '0' COMMENT 'cpu使用5分钟',
  `cpu_load15` float DEFAULT '0' COMMENT 'cpu使用15分钟',
  `memory` float DEFAULT '0' COMMENT '内存使用率',
  `ne_type` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT NULL COMMENT '网元类型',
  `ne_id` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT NULL COMMENT '网元ID',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC COMMENT='监控_基本信息';

-- Dump completed on 2025-02-14 15:26:56
