-- ----------------------------
-- Table structure for monitor_io
-- ----------------------------
DROP TABLE IF EXISTS "monitor_io";
CREATE TABLE "monitor_io" (
  "id" integer NOT NULL,
  "create_time" integer(20),
  "name" text(50) NOT NULL,
  "read" integer(11),
  "write" integer(11),
  "count" integer(11),
  "time" integer(11),
  "ne_type" text(32),
  "ne_id" text(32),
  PRIMARY KEY ("id")
);

-- ----------------------------
-- Records of monitor_io
-- ----------------------------
