-- ----------------------------
-- Table structure for monitor_base
-- ----------------------------
DROP TABLE IF EXISTS "monitor_base";
CREATE TABLE "monitor_base" (
  "id" integer NOT NULL,
  "create_time" integer(20),
  "cpu" integer,
  "load_usage" integer,
  "cpu_load1" integer,
  "cpu_load5" integer,
  "cpu_load15" integer,
  "memory" integer,
  "ne_type" text(32),
  "ne_id" text(32),
  PRIMARY KEY ("id")
);

-- ----------------------------
-- Records of monitor_base
-- ----------------------------
