SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for sys_job
-- ----------------------------
CREATE TABLE IF NOT EXISTS `sys_job` (
  `job_id` bigint NOT NULL AUTO_INCREMENT COMMENT '任务ID',
  `job_name` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT '任务名称',
  `job_group` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT 'DEFAULT' COMMENT '任务组名',
  `invoke_target` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL COMMENT '调用目标字符串',
  `target_params` varchar(2048) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT '调用目标传入参数',
  `cron_expression` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT 'cron执行表达式',
  `misfire_policy` varchar(1) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '3' COMMENT '计划执行错误策略（1立即执行 2执行一次 3放弃执行）',
  `concurrent` varchar(1) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '0' COMMENT '是否并发执行（0禁止 1允许）',
  `status_flag` varchar(1) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '0' COMMENT '任务状态（0暂停 1正常）',
  `save_log` varchar(1) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '0' COMMENT '是否记录任务日志（0不记录 1记录）',
  `create_by` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT '创建者',
  `create_time` bigint NULL DEFAULT 0 COMMENT '创建时间',
  `update_by` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT '更新者',
  `update_time` bigint NULL DEFAULT 0 COMMENT '更新时间',
  `remark` varchar(500) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT '备注',
  PRIMARY KEY (`job_id`) USING BTREE,
  UNIQUE INDEX `uk_name_group`(`job_name` ASC, `job_group` ASC) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 50 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci COMMENT = '系统_调度任务调度表' ROW_FORMAT = Dynamic;

-- ----------------------------
-- COLUMN for sys_job
-- ----------------------------
ALTER TABLE `sys_job` DROP COLUMN `status`;
ALTER TABLE `sys_job` DROP INDEX `idx_uni_name_group`;
ALTER TABLE `sys_job` MODIFY COLUMN `job_name` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT '任务名称' AFTER `job_id`;
ALTER TABLE `sys_job` MODIFY COLUMN `job_group` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT 'DEFAULT' COMMENT '任务组名' AFTER `job_name`;
ALTER TABLE `sys_job` MODIFY COLUMN `invoke_target` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL COMMENT '调用目标字符串' AFTER `job_group`;
ALTER TABLE `sys_job` MODIFY COLUMN `cron_expression` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT 'cron执行表达式' AFTER `target_params`;
ALTER TABLE `sys_job` MODIFY COLUMN `misfire_policy` varchar(1) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '3' COMMENT '计划执行错误策略（1立即执行 2执行一次 3放弃执行）' AFTER `cron_expression`;
ALTER TABLE `sys_job` MODIFY COLUMN `concurrent` varchar(1) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '0' COMMENT '是否并发执行（0禁止 1允许）' AFTER `misfire_policy`;
ALTER TABLE `sys_job` ADD COLUMN `status_flag` varchar(1) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '0' COMMENT '任务状态（0暂停 1正常）' AFTER `concurrent`;
ALTER TABLE `sys_job` MODIFY COLUMN `create_by` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT '创建者' AFTER `save_log`;
ALTER TABLE `sys_job` MODIFY COLUMN `update_by` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT '更新者' AFTER `create_time`;
ALTER TABLE `sys_job` ADD UNIQUE INDEX `uk_name_group`(`job_name`, `job_group`) USING BTREE;
ALTER TABLE `sys_job` COMMENT = '系统_调度任务调度表';

-- ----------------------------
-- Data of sys_job
-- ----------------------------
REPLACE INTO `sys_job` VALUES (1, 'job.monitor_sys_resource', 'SYSTEM', 'monitor_sys_resource', '{\"interval\":5}', '0 0/5 * * * ?', '3', '0', '1', '0', 'system', 1698478134839, 'system', 1698478134839, 'job.monitor_sys_resource_remark');
REPLACE INTO `sys_job` VALUES (3, 'job.ne_data_udm', 'SYSTEM', 'ne_data_udm', '', '0 0 0/12 * * ?', '3', '0', '1', '1', 'system', 1698478134839, 'system', 1698478134839, '');
REPLACE INTO `sys_job` VALUES (6, 'job.ne_config_backup', 'SYSTEM', 'ne_config_backup', '', '0 30 0 * * ?', '3', '0', '1', '1', 'system', 1698478134839, 'system', 1698478134839, 'job.ne_config_backup_remark');

REPLACE INTO `sys_job` VALUES (10, 'job.delete_ne_config_backup', 'SYSTEM', 'delete_ne_config_backup', '{\"storeDays\":7,\"storeNum\":7}', '0 20 0 * * ?', '3', '0', '1', '1', 'system', 1698478134839, 'system', 1698478134839, 'job.delete_ne_config_backup_remark');
REPLACE INTO `sys_job` VALUES (11, 'job.delete_alarm_record', 'SYSTEM', 'delete_alarm_record', '{\"storeDays\":7}', '0 10 0 * * ?', '3', '0', '1', '1', 'system', 1698478134839, 'system', 1698478134839, 'job.delete_alarm_record_remark');
REPLACE INTO `sys_job` VALUES (12, 'job.delete_kpi_record', 'SYSTEM', 'delete_kpi_record', '{\"storeDays\":7,\"neList\":[\"IMS\",\"AMF\",\"UDM\",\"UPF\",\"MME\",\"SMSC\",\"SMF\",\"MME\"]}', '0 20 0 * * ?', '3', '0', '1', '1', 'system', 1698478134839, 'system', 1698478134839, 'job.delete_kpi_record_remark');
REPLACE INTO `sys_job` VALUES (13, 'job.delete_cdr_record', 'SYSTEM', 'delete_cdr_record', '{\"storeDays\":7,\"neList\":[\"IMS\",\"SMF\",\"SGWC\",\"SMSC\"]}', '0 25 0 * * ?', '3', '0', '1', '1', 'system', 1698478134839, 'system', 1698478134839, 'job.delete_cdr_record_remark');
REPLACE INTO `sys_job` VALUES (14, 'job.delete_uenb_record', 'SYSTEM', 'delete_uenb_record', '{\"storeDays\":7,\"neList\":[\"AMF\",\"MME\"]}', '0 28 0 * * ?', '3', '0', '1', '1', 'system', 1698478134839, 'system', 1698478134839, 'job.delete_uenb_record_remark');

REPLACE INTO `sys_job` VALUES (20, 'job.ne_alarm_state_check', 'SYSTEM', 'ne_alarm_state_check', '{\"alarmTitle\":\"NE State Check Alarm\",\"alarmType\":\"EquipmentAlarm\",\"origSeverity\":\"Major\",\"specificProblem\":\"alarm cause: the system state of target NE has not been received\",\"specificProblemId\":\"AC10000\",\"addInfo\":\"\"}', '0/30 * * * * ?', '3', '0', '1', '0', 'system', 1698478134839, 'system', 1698478134839, 'job.ne_alarm_state_check_remark');
REPLACE INTO `sys_job` VALUES (21, 'job.ne_alarm_state_check_cmd', 'SYSTEM', 'ne_alarm_state_check_cmd', '{\"alarmTitle\":\"NE State Check Alarm CPU/Menory/Disk\",\"alarmType\":\"EquipmentAlarm\",\"origSeverity\":\"Major\",\"specificProblem\":\"Alarm Cause: CPU/Menory/Disk status received from target NE reaches the threshold\",\"specificProblemId\":\"AC10100\",\"addInfo\":\"\",\"cpuUseGt\":70,\"memUseGt\":70,\"diskUseGt\":70}', '0/15 * * * * ?', '3', '0', '1', '0', 'system', 1698478134839, 'system', 1698478134839, 'job.ne_alarm_state_check_cmd_remark');
REPLACE INTO `sys_job` VALUES (22, 'job.ne_alarm_state_check_license', 'SYSTEM', 'ne_alarm_state_check_license', '{\"alarmTitle\":\"NE State Check Alarm License\",\"alarmType\":\"EquipmentAlarm\",\"origSeverity\":\"Major\",\"specificProblem\":\"Alarm Cause: License received from target NE is about to expire\",\"specificProblemId\":\"AC10200\",\"addInfo\":\"\",\"dayLt\":7}', '0 5 0 * * ?', '3', '0', '1', '0', 'system', 1698478134839, 'system', 1698478134839, 'job.ne_alarm_state_check_license_remark');

REPLACE INTO `sys_job` VALUES (30, 'job.backup_remove_file', 'SYSTEM', 'backup_remove_file', '[{\"backupPath\":\"/udm_data/auth\",\"storeDays\":30},{\"backupPath\":\"/udm_data/sub\",\"storeDays\":30},{\"backupPath\":\"/udm_data/voip\",\"storeDays\":30},{\"backupPath\":\"/udm_data/volte\",\"storeDays\":30},{\"backupPath\":\"/cdr/ims_cdr_event\",\"storeDays\":30},{\"backupPath\":\"/cdr/smsc_cdr_event\",\"storeDays\":30},{\"backupPath\":\"/cdr/smf_cdr_event\",\"storeDays\":30},{\"backupPath\":\"/cdr/sgwc_cdr_event\",\"storeDays\":30},{\"backupPath\":\"/log/sys_log_operate\",\"storeDays\":30,\"storeNum\":7},{\"backupPath\":\"/log/sys_log_login\",\"storeDays\":30,\"storeNum\":7}]', '0 10 0 * * ?', '3', '0', '1', '1', 'system', 1698478134839, 'system', 1698478134839, 'job.backup_remove_file_remark');
REPLACE INTO `sys_job` VALUES (31, 'job.backup_export_udm', 'SYSTEM', 'backup_export_udm', '{\"dataType\":[\"auth\",\"sub\",\"voip\",\"volte\"],\"fileType\":\"txt\"}', '0 35 0 * * ?', '3', '0', '1', '1', 'system', 1698478134839, 'supervisor', 1745481169354, 'job.backup_export_udm_remark');
REPLACE INTO `sys_job` VALUES (32, 'job.backup_export_cdr', 'SYSTEM', 'backup_export_cdr', '{\"dataType\":[\"ims\",\"smf\",\"sgwc\",\"smsc\"],\"fileType\":\"xlsx\",\"hour\":1}', '0 0 0/1 * * ?', '3', '0', '1', '1', 'system', 1698478134839, 'supervisor', 1745481169354, 'job.backup_export_cdr_remark');
REPLACE INTO `sys_job` VALUES (33, 'job.backup_export_log', 'SYSTEM', 'backup_export_log', '{\"dataType\":[\"operate\",\"login\"],\"fileType\":\"xlsx\",\"hour\":1}', '0 0 0/1 * * ?', '3', '0', '1', '1', 'system', 1698478134839, 'supervisor', 1745481169354, 'job.backup_export_log_remark');
-- REPLACE INTO `sys_job` VALUES (34, 'job.backup_export_table_sys_log_operate', 'SYSTEM', 'backup_export_table', '{\"hour\":1,\"columns\":[\"id\",\"title\",\"business_type\",\"opera_by\",\"opera_url_method\",\"opera_url\",\"opera_ip\",\"status\",\"opera_time\",\"cost_time\"],\"tableName\":\"sys_log_operate\",\"backupPath\":\"/log/operate_log\"}', '0 0 0/1 * * ?', '3', '0', '0', '1', 'system', 1698478134839, 'system', 1698478134839, 'job.backup_export_table_sys_log_operate_remark');
-- REPLACE INTO `sys_job` VALUES (35, 'job.backup_export_table_cdr_event_ims', 'SYSTEM', 'backup_export_table', '{\"hour\":1,\"columns\":[\"id\",\"record_type\",\"call_type\",\"caller_party\",\"called_party\",\"call_duration\",\"cause\",\"seizure_time\",\"release_time\"],\"tableName\":\"cdr_event_ims\",\"backupPath\":\"/cdr/ims_cdr\"}', '0 0 0/1 * * ?', '3', '0', '0', '1', 'system', 1698478134839, 'system', 1698478134839, 'job.backup_export_table_cdr_event_ims_remark');
-- REPLACE INTO `sys_job` VALUES (36, 'job.backup_export_table_cdr_event_smf', 'SYSTEM', 'backup_export_table', '{\"hour\":1,\"columns\":[\"id\",\"charging_id\",\"subscription_id_data\",\"subscription_id_type\",\"data_volume_uplink\",\"data_volume_downlink\",\"data_total_volume\",\"invocation_timestamp\",\"user_identifier\",\"ssc_mode\",\"dnn_id\",\"pdu_type\",\"rat_type\",\"pdu_ipv4\",\"pdu_ipv6\",\"network_function_ipv4_address\",\"record_nfId\",\"record_type\",\"record_opening_time\"],\"tableName\":\"cdr_event_smf\",\"backupPath\":\"/cdr/smf_cdr\"}', '0 0 0/1 * * ?', '3', '0', '0', '1', 'system', 1698478134839, 'system', 1698478134839, 'job.backup_export_table_cdr_event_smf_remark');
-- REPLACE INTO `sys_job` VALUES (37, 'job.backup_export_table_cdr_event_smsc', 'SYSTEM', 'backup_export_table', '{\"hour\":1,\"columns\":[\"id\",\"record_type\",\"service_type\",\"caller_party\",\"called_party\",\"result\",\"update_time\"],\"tableName\":\"cdr_event_smsc\",\"backupPath\":\"/cdr/smsc_cdr\"}', '0 0 0/1 * * ?', '3', '0', '0', '1', 'system', 1698478134839, 'system', 1698478134839, 'job.backup_export_table_cdr_event_smsc_remark');
-- REPLACE INTO `sys_job` VALUES (38, 'job.backup_export_table_cdr_event_sgwc', 'SYSTEM', 'backup_export_table', '{\"hour\":1,\"columns\":[\"charging_id\",\"served_imsi\",\"served_msisdn\",\"data_volume_gprs_uplink\",\"data_volume_gprs_downlink\",\"duration\",\"invocation_timestamp\",\"pgw_address_used\",\"sgw_address\",\"rat_type\",\"pdp_pdn_type\",\"served_pdppdn_address\",\"serving_node_address\",\"serving_node_type\",\"access_point_name_ni\",\"cause_for_rec_closing\",\"record_sequence_number\",\"local_record_sequence_number\",\"record_type\",\"record_opening_time\"],\"tableName\":\"cdr_event_sgwc\",\"backupPath\":\"/cdr/sgwc_cdr\"}', '0 0 0/1 * * ?', '3', '0', '0', '1', 'system', 1698478134839, 'system', 1698478134839, 'job.backup_export_table_cdr_event_sgwc_remark');

SET FOREIGN_KEY_CHECKS = 1;

-- Dump completed on 2025-02-14 15:26:56
