/*
 Navicat Premium Data Transfer

 Source Server         : local_mariadb
 Source Server Type    : MariaDB
 Source Server Version : 100338 (10.3.38-MariaDB)
 Source Host           : localhost:33066
 Source Schema         : omc_db

 Target Server Type    : MariaDB
 Target Server Version : 100338 (10.3.38-MariaDB)
 File Encoding         : 65001

 Date: 18/08/2023 10:13:05
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for ne_check
-- ----------------------------
DROP TABLE IF EXISTS `ne_check`;
CREATE TABLE `ne_check`  (
  `id` int(10) NOT NULL,
  `status` tinyint(4) NULL DEFAULT NULL COMMENT '//0-不健康 1-健康',
  `result` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `create_time` datetime NULL DEFAULT NULL,
  `ne_type` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of ne_check
-- ----------------------------
INSERT INTO `ne_check` VALUES (1, 1, '\"很健康\"', '2023-08-17 21:32:34', NULL);

SET FOREIGN_KEY_CHECKS = 1;
