-- MariaDB dump 10.19  Distrib 10.6.16-MariaDB, for debian-linux-gnu (x86_64)
--
-- Host: 192.168.2.219    Database: omc_db
-- ------------------------------------------------------
-- Server version	10.3.38-MariaDB

/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!40101 SET NAMES utf8mb4 */;
/*!40103 SET @OLD_TIME_ZONE=@@TIME_ZONE */;
/*!40103 SET TIME_ZONE='+00:00' */;
/*!40014 SET @OLD_UNIQUE_CHECKS=@@UNIQUE_CHECKS, UNIQUE_CHECKS=0 */;
/*!40014 SET @OLD_FOREIGN_KEY_CHECKS=@@FOREIGN_KEY_CHECKS, FOREIGN_KEY_CHECKS=0 */;
/*!40101 SET @OLD_SQL_MODE=@@SQL_MODE, SQL_MODE='NO_AUTO_VALUE_ON_ZERO' */;
/*!40111 SET @OLD_SQL_NOTES=@@SQL_NOTES, SQL_NOTES=0 */;

--
-- Table structure for table `mml_system`
--

DROP TABLE IF EXISTS `mml_system`;
/*!40101 SET @saved_cs_client     = @@character_set_client */;
/*!40101 SET character_set_client = utf8 */;
CREATE TABLE `mml_system` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `ne_type` varchar(16) DEFAULT NULL,
  `category` varchar(32) DEFAULT NULL,
  `cat_display` varchar(64) DEFAULT NULL,
  `operation` varchar(10) DEFAULT NULL,
  `object` varchar(16) DEFAULT NULL,
  `mml_display` varchar(128) DEFAULT NULL,
  `object_type` varchar(16) DEFAULT 'mml',
  `param_json` longtext CHARACTER SET utf8mb4 COLLATE utf8mb4_bin DEFAULT NULL,
  `status` enum('Active','Inactive') DEFAULT 'Active' COMMENT '激活: Active 未激活: Inactive',
  PRIMARY KEY (`id`) USING BTREE,
  KEY `id` (`id`) USING BTREE
) ENGINE=InnoDB AUTO_INCREMENT=906 DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;
/*!40101 SET character_set_client = @saved_cs_client */;

--
-- Dumping data for table `mml_system`
--

LOCK TABLES `mml_system` WRITE;
/*!40000 ALTER TABLE `mml_system` DISABLE KEYS */;
INSERT INTO `mml_system` VALUES (833,'UPF','upfManagement','UPF Management','help','','List UPF MML CMD','mml','null','Active'),(834,'UPF','systemManagement','System Management','set','n3 driver','Set N3 Driver','mml','[{\"comment\":\"\",\"display\":\"Type\",\"filter\":\"\",\"name\":\"type\",\"optional\":\"false\",\"type\":\"int\"},{\"comment\":\"\",\"display\":\"IP address\",\"filter\":\"\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Mask\",\"filter\":\"\",\"name\":\"mask\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Mac address\",\"filter\":\"\",\"name\":\"mac\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"PCI address\",\"filter\":\"\",\"name\":\"pci\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(835,'UPF','systemManagement','System Management','set','n4 ip','Set N4 IP Address','mml','[{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(836,'UPF','systemManagement','System Management','set','n6 driver','Set N6 Driver','mml','[{\"comment\":\"\",\"display\":\"Type\",\"filter\":\"\",\"name\":\"type\",\"optional\":\"false\",\"type\":\"int\"},{\"comment\":\"\",\"display\":\"IP address\",\"filter\":\"\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Mask\",\"filter\":\"\",\"name\":\"mask\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Mac address\",\"filter\":\"\",\"name\":\"mac\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"PCI address\",\"filter\":\"\",\"name\":\"pci\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(837,'UPF','systemManagement','System Management','set','n9 driver','Set N9 Driver','mml','[{\"comment\":\"\",\"display\":\"Type\",\"filter\":\"\",\"name\":\"type\",\"optional\":\"false\",\"type\":\"int\"},{\"comment\":\"\",\"display\":\"IP address\",\"filter\":\"\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Mask\",\"filter\":\"\",\"name\":\"mask\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Mac address\",\"filter\":\"\",\"name\":\"mac\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"PCI address\",\"filter\":\"\",\"name\":\"pci\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(838,'UPF','systemManagement','System Management','set','dnn','Set DNN','mml','[{\"comment\":\"\",\"display\":\"DNN\",\"filter\":\"\",\"name\":\"dnn\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(839,'UPF','systemManagement','System Management','set','pfcp','Set PFCP','mml','[{\"comment\":\"\",\"display\":\"Path\",\"filter\":\"\",\"name\":\"path\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Local IP Address\",\"filter\":\"\",\"name\":\"local\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Remote IP Address\",\"filter\":\"\",\"name\":\"remote\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(840,'UPF','systemManagement','System Management','set','qos','Set Qos','mml','[{\"comment\":\"\",\"display\":\"Index\",\"filter\":\"\",\"name\":\"index\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"5qi\",\"filter\":\"\",\"name\":\"5qi\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Priority Level\",\"filter\":\"\",\"name\":\"priority\",\"optional\":\"false\",\"type\":\"int\"},{\"comment\":\"\",\"display\":\"MBR\",\"filter\":\"\",\"name\":\"mbr\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"GBR\",\"filter\":\"\",\"name\":\"gbr\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(841,'UPF','systemManagement','System Management','set','pccrule','Set PCC Rule','mml','[{\"comment\":\"\",\"display\":\"Index\",\"filter\":\"0~65535\",\"name\":\"index\",\"optional\":\"false\",\"type\":\"int\"},{\"comment\":\"\",\"display\":\"Precedence\",\"filter\":\"\",\"name\":\"precedence\",\"optional\":\"false\",\"type\":\"int\"},{\"comment\":\"\",\"display\":\"QOS Index\",\"filter\":\"\",\"name\":\"qosindex\",\"optional\":\"false\",\"type\":\"int\"},{\"comment\":\"\",\"display\":\"Filter Direction\",\"filter\":\"{\\\"0\\\":\\\"NA\\\", \\\"1\\\":\\\"Uplink\\\", \\\"2\\\":\\\"Downlink\\\", \\\"3\\\":\\\"Bidirectionallink\\\"}\",\"name\":\"direction\",\"optional\":\"true\",\"type\":\"int\"},{\"comment\":\"\",\"display\":\"Filter\",\"filter\":\"\",\"name\":\"filter\",\"optional\":\"true\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Application ID\",\"filter\":\"\",\"name\":\"appid\",\"optional\":\"true\",\"type\":\"string\"}]','Inactive'),(842,'UPF','systemManagement','System Management','exec','shell','Execute Shell Command','mml','[{\"comment\":\"\",\"display\":\"CMD\",\"filter\":\"\",\"name\":\"cmd\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(843,'UPF','systemManagement','System Management','reload','','Reload Config','mml','null','Inactive'),(853,'SMF','smfManagement','SMF Management','help','','List SMF MML CMD','mml','null','Active'),(854,'SMF','systemManagement','System Management','set','n7 server','Set N7 Server','mml','[{\"comment\":\"\",\"display\":\"Scheme\",\"filter\":\"{\\\"0\\\":\\\"http\\\", \\\"1\\\":\\\"https\\\"}\",\"name\":\"scheme\",\"optional\":\"false\",\"type\":\"enum\"},{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"0~64\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Port\",\"filter\":\"0~65535\",\"name\":\"port\",\"optional\":\"false\",\"type\":\"int\"}]','Inactive'),(855,'SMF','systemManagement','System Management','set','n7 client','Set N7 Client','mml','[{\"comment\":\"\",\"display\":\"Scheme\",\"filter\":\"{\\\"0\\\":\\\"http\\\", \\\"1\\\":\\\"https\\\"}\",\"name\":\"scheme\",\"optional\":\"false\",\"type\":\"enum\"},{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"0~64\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(856,'SMF','systemManagement','System Management','set','n10 server','Set N10 Server','mml','[{\"comment\":\"\",\"display\":\"Scheme\",\"filter\":\"{\\\"0\\\":\\\"http\\\", \\\"1\\\":\\\"https\\\"}\",\"name\":\"scheme\",\"optional\":\"false\",\"type\":\"enum\"},{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"0~64\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Port\",\"filter\":\"0~65535\",\"name\":\"port\",\"optional\":\"false\",\"type\":\"int\"}]','Inactive'),(857,'SMF','systemManagement','System Management','set','n10 client','Set N10 Client','mml','[{\"comment\":\"\",\"display\":\"Scheme\",\"filter\":\"{\\\"0\\\":\\\"http\\\", \\\"1\\\":\\\"https\\\"}\",\"name\":\"scheme\",\"optional\":\"false\",\"type\":\"enum\"},{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"0~64\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(858,'SMF','systemManagement','System Management','set','n11 server','Set N11 Server','mml','[{\"comment\":\"\",\"display\":\"Scheme\",\"filter\":\"{\\\"0\\\":\\\"http\\\", \\\"1\\\":\\\"https\\\"}\",\"name\":\"scheme\",\"optional\":\"false\",\"type\":\"enum\"},{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"0~64\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Port\",\"filter\":\"0~65535\",\"name\":\"port\",\"optional\":\"false\",\"type\":\"int\"}]','Inactive'),(859,'SMF','systemManagement','System Management','set','n11 client','Set N11 Client','mml','[{\"comment\":\"\",\"display\":\"Scheme\",\"filter\":\"{\\\"0\\\":\\\"http\\\", \\\"1\\\":\\\"https\\\"}\",\"name\":\"scheme\",\"optional\":\"false\",\"type\":\"enum\"},{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"0~64\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(860,'SMF','systemManagement','System Management','set','dnn','Set DNN','mml','[{\"comment\":\"\",\"display\":\"Index\",\"filter\":\"\",\"name\":\"index\",\"optional\":\"false\",\"type\":\"int\"},{\"comment\":\"\",\"display\":\"DNN\",\"filter\":\"\",\"name\":\"DNN\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(862,'SMF','systemManagement','System Management','set','qos','Set Qos','mml','[{\"comment\":\"\",\"display\":\"Index\",\"filter\":\"\",\"name\":\"index\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"SD\",\"filter\":\"\",\"name\":\"5qi\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"5qipl\",\"filter\":\"\",\"name\":\"5qipl\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"arppl\",\"filter\":\"\",\"name\":\"arppl\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"arppci\",\"filter\":\"\",\"name\":\"arppci\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"arppvi\",\"filter\":\"\",\"name\":\"arppvi\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"mfbrul\",\"filter\":\"\",\"name\":\"mfbrul\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"mfbrdl\",\"filter\":\"\",\"name\":\"mfbrdl\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"gfbrul\",\"filter\":\"\",\"name\":\"gfbrul\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"gfbrdl\",\"filter\":\"\",\"name\":\"gfbrdl\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(863,'SMF','systemManagement','System Management','set','snssai','Set Snssai','mml','[{\"comment\":\"\",\"display\":\"Index\",\"filter\":\"\",\"name\":\"index\",\"optional\":\"false\",\"type\":\"string\"},{\"display\":\"sst-sd\",\"filter\":\"\",\"name\":\"sst-sd\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(864,'SMF','systemManagement','System Management','release','imsi','Release IMSI','mml','[{\"comment\":\"\",\"display\":\"IMSI\",\"filter\":\"\",\"name\":\"imsi\",\"optional\":\"false\",\"type\":\"string\"},{\"display\":\"PDU Session Id\",\"filter\":\"\",\"name\":\"pduSessId\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(865,'SMF','systemManagement','System Management','set','urr','Set URR','mml','[{\"comment\":\"\",\"display\":\"Index\",\"filter\":\"\",\"name\":\"index\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Quota Volume Tatol\",\"filter\":\"\",\"name\":\"quotavolumetatol\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Quota Volume UL\",\"filter\":\"\",\"name\":\"quotavolumeul\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Quota Volume DL\",\"filter\":\"\",\"name\":\"quotavolumedl\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Quota Time\",\"filter\":\"\",\"name\":\"quotatime\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(866,'SMF','systemManagement','System Management','set','dpi','Set DPI','mml','[{\"comment\":\"\",\"display\":\"Flag\",\"filter\":\"{\\\"0\\\":\\\"disable\\\", \\\"1\\\":\\\"enable\\\"}\",\"name\":\"flag\",\"optional\":\"false\",\"type\":\"enum\"},{\"comment\":\"\",\"display\":\"Max Detect Packet Number\",\"filter\":\"\",\"name\":\"max\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(867,'SMF','systemManagement','System Management','exec','shell','Execute Shell Command','mml','[{\"comment\":\"\",\"display\":\"CMD\",\"filter\":\"\",\"name\":\"cmd\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(868,'SMF','systemManagement','System Management','reload','','Reload Config','mml','null','Inactive'),(870,'IMS','imsManagement','IMS Management','help','','List IMS MML CMD','mml','null','Active'),(871,'N3IWF','n3iwfManagement','N3IWF Management','help','','List N3IWF MML CMD','mml','null','Active'),(872,'NSSF','nssfManagement','NSSF Management','help','','List NSSF MML CMD','mml','null','Active'),(873,'NRF','nrfManagement','NRF Management','help','','List NRF MML CMD','mml','null','Active'),(874,'PCF','pcfManagement','PCF Management','help','','List PCF MML CMD','mml','null','Active'),(875,'AMF','subsManagement','Subscriber Management','list','imsi','List Online IMSI','mml','[{\"comment\":\"\",\"display\":\"IMSI\",\"filter\":\"32\",\"name\":\"imsi\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(876,'AMF','amfManagement','AMF Management','help','','List AMF MML CMD','mml','null','Active'),(877,'AMF','systemManagement','System Management','set','n8_ip','Set N8 IP Address','mml','[{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"0~64\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(878,'AMF','systemManagement','System Management','set','n11_ip','Set N11 IP Address','mml','[{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"0~64\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(879,'AMF','systemManagement','System Management','set','n12_ip','Set N12 IP Address','mml','[{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"0~64\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(880,'AMF','systemManagement','System Management','set','n2_ip','Set N2 IP Address','mml','[{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(881,'AMF','systemManagement','System Management','set','n2_port','Set N2 Port','mml','[{\"comment\":\"\",\"display\":\"Port\",\"filter\":\"0~65535\",\"name\":\"port\",\"optional\":\"false\",\"type\":\"int\"}]','Inactive'),(882,'AMF','systemManagement','System Management','set','ntpversion','Set NTP Version','mml','[{\"comment\":\"\",\"display\":\"Version\",\"filter\":\"\",\"name\":\"version\",\"optional\":\"false\",\"type\":\"int\"}]','Inactive'),(883,'AMF','systemManagement','System Management','set','ntpmaxdiff','Set NTP Max Diff','mml','[{\"comment\":\"\",\"display\":\"Max Value(ms)\",\"filter\":\"100~2000\",\"name\":\"value\",\"optional\":\"false\",\"type\":\"int\"}]','Inactive'),(884,'AMF','systemManagement','System Management','set','ntpsynctimer','Set NTP Sync Timer','mml','[{\"comment\":\"\",\"display\":\"Periods(second)\",\"filter\":\"\",\"name\":\"periods\",\"optional\":\"false\",\"type\":\"int\"}]','Inactive'),(885,'AMF','systemManagement','System Management','add','slice','Add Slice','mml','[{\"comment\":\"\",\"display\":\"SST\",\"filter\":\"\",\"name\":\"sst\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"SD\",\"filter\":\"\",\"name\":\"sd\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(886,'AMF','systemManagement','System Management','deregister','imsi','Deregister IMSI','mml','[{\"comment\":\"\",\"display\":\"IMSI\",\"filter\":\"\",\"name\":\"IMSI\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(887,'AMF','systemManagement','System Management','exec','shell','Execute Shell Command','mml','[{\"comment\":\"\",\"display\":\"CMD\",\"filter\":\"\",\"name\":\"cmd\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(888,'AMF','systemManagement','System Management','reload','','Reload Config','mml','null','Inactive'),(889,'UDM','udmManagement','UDM Management','help','','List UDM MML CMD','mml','null','Active'),(890,'UDM','systemManagement','System Management','set','n8ip','Set N8 IP Address','mml','[{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"ipv4\"}]','Inactive'),(891,'UDM','systemManagement','System Management','set','n8port','Set N8 Port','mml','[{\"comment\":\"\",\"display\":\"Port\",\"filter\":\"1~65535\",\"name\":\"port\",\"optional\":\"false\",\"type\":\"int\"}]','Inactive'),(892,'UDM','systemManagement','System Management','set','n8scheme','Set N8 Scheme','mml','[{\"comment\":\"\",\"display\":\"Scheme\",\"filter\":\"{\\\"0\\\":\\\"http\\\", \\\"1\\\":\\\"https\\\"}\",\"name\":\"scheme\",\"optional\":\"false\",\"type\":\"enum\"}]','Inactive'),(893,'UDM','systemManagement','System Management','set','n10ip','Set N10 IP Address','mml','[{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(894,'UDM','systemManagement','System Management','set','n10port','Set N10 Port','mml','[{\"comment\":\"\",\"display\":\"Port\",\"filter\":\"1~65535\",\"name\":\"port\",\"optional\":\"false\",\"type\":\"int\"}]','Inactive'),(895,'UDM','systemManagement','System Management','set','n10scheme','Set N10 Scheme','mml','[{\"comment\":\"\",\"display\":\"Scheme\",\"filter\":\"{\\\"0\\\":\\\"http\\\", \\\"1\\\":\\\"https\\\"}\",\"name\":\"scheme\",\"optional\":\"false\",\"type\":\"enum\"}]','Inactive'),(896,'UDM','systemManagement','System Management','exec','shell','Execute Shell Command','mml','[{\"comment\":\"\",\"display\":\"CMD\",\"filter\":\"\",\"name\":\"cmd\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(897,'UDM','systemManagement','System Management','reload','','Reload Config','mml','null','Inactive'),(898,'AUSF','ausfManagement','AUSF Management','help','','List AUSF MML CMD','mml','null','Active'),(899,'AUSF','systemManagement','System Management','set','n12ip','Set N12 IP Address','mml','[{\"comment\":\"\",\"display\":\"IP Address\",\"filter\":\"\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(900,'AUSF','systemManagement','System Management','set','n12port','Set N12 Port','mml','[{\"comment\":\"\",\"display\":\"Port\",\"filter\":\"1~65535\",\"name\":\"port\",\"optional\":\"false\",\"type\":\"int\"}]','Inactive'),(901,'AUSF','systemManagement','System Management','set','n12scheme','Set N12 Scheme','mml','[{\"comment\":\"\",\"display\":\"Scheme\",\"filter\":\"{\\\"0\\\":\\\"http\\\", \\\"1\\\":\\\"https\\\"}\",\"name\":\"scheme\",\"optional\":\"false\",\"type\":\"enum\"}]','Inactive'),(902,'AUSF','systemManagement','System Management','set','supirange','Set SUPI Range','mml','[{\"comment\":\"\",\"display\":\"SUPI Range\",\"filter\":\"\",\"name\":\"supirange\",\"optional\":\"false\",\"type\":\"string\"}]','Inactive'),(903,'AUSF','systemManagement','System Management','reload','','Reload Config','mml','null','Inactive'),(904,'MME','mmeManagement','MME Management','help','','List MME MML CMD','mml','null','Active');
/*!40000 ALTER TABLE `mml_system` ENABLE KEYS */;
UNLOCK TABLES;
/*!40103 SET TIME_ZONE=@OLD_TIME_ZONE */;

/*!40101 SET SQL_MODE=@OLD_SQL_MODE */;
/*!40014 SET FOREIGN_KEY_CHECKS=@OLD_FOREIGN_KEY_CHECKS */;
/*!40014 SET UNIQUE_CHECKS=@OLD_UNIQUE_CHECKS */;
/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40101 SET CHARACTER_SET_RESULTS=@OLD_CHARACTER_SET_RESULTS */;
/*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
/*!40111 SET SQL_NOTES=@OLD_SQL_NOTES */;

-- Dump completed on 2024-03-06 17:27:03
