-- MariaDB dump 10.19  Distrib 10.6.16-MariaDB, for debian-linux-gnu (x86_64)
--
-- Table structure for table `pt_ne_config_data`
--

DROP TABLE IF EXISTS `pt_ne_config_data`;
CREATE TABLE `pt_ne_config_data` (
  `id` bigint NOT NULL AUTO_INCREMENT COMMENT 'ID',
  `create_by` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '创建者',
  `create_time` bigint DEFAULT '0' COMMENT '创建时间',
  `update_by` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '更新者',
  `update_time` bigint DEFAULT '0' COMMENT '更新时间',
  `remark` varchar(500) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT NULL COMMENT '备注',
  `stub_type` varchar(10) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL DEFAULT '' COMMENT '存根数据类型 0系统 1班级 2个人',
  `ne_type` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL DEFAULT '' COMMENT '网元类型',
  `param_name` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL DEFAULT '' COMMENT '参数名',
  `param_display` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '参数显示名',
  `param_type` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '参数类型 list列表单层 array数组多层',
  `param_json` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci COMMENT '参数数据',
  `dept_id` bigint DEFAULT '0' COMMENT '部门班级ID 100系统',
  PRIMARY KEY (`id`) USING BTREE,
  KEY `idx_user_stub_ne_name` (`create_by`,`stub_type`,`ne_type`,`param_name`) USING BTREE COMMENT '个人_存根_网元_参数可选值'
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci COMMENT='实训教学_网元参数配置数据信息';

INSERT INTO `pt_ne_config_data` VALUES (1, 'admin', 1721115330344, 'admin', 1722596226570, '', '0', 'AMF', 'system', 'System Config', 'list', '[{\"amfName\":\"AMF\",\"ausfUri\":\"http://172.60.5.130:8080\",\"cipheringAlgorithm\":0,\"defaultDnn\":\"internet\",\"dnnCorrectionEnabled\":false,\"integrityAlgorithm\":2,\"lmfUri\":\"http://172.16.5.200:8080\",\"nefUri\":\"http://172.16.5.210:8080\",\"nrfEnabled\":false,\"nrfUri\":\"http://172.60.5.180:8080\",\"pcfUri\":\"http://172.60.5.160:8080\",\"relativeCapacity\":255,\"sbiScheme\":0,\"sbiServerIp\":\"172.60.5.120\",\"sbiServerPort\":8080,\"smfUri\":\"http://172.60.5.150:8080\",\"t3502\":720,\"t3512\":3600,\"t3513\":2,\"t3522\":2,\"t3550\":2,\"t3555\":2,\"t3560\":2,\"t3565\":2,\"t3570\":2,\"udmUri\":\"http://172.60.5.140:8080\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (2, 'admin', 1721115333776, 'admin', 1722596226582, '', '0', 'AMF', 'association', 'TNL Association List', 'array', '[{\"index\":0,\"ngapIp\":\"192.168.5.60\",\"ngapSctpPort\":38412,\"weightFactor\":255}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (3, 'admin', 1721115335363, 'admin', 1722596226588, '', '0', 'AMF', 'guami', 'GUAMI List', 'array', '[{\"index\":0,\"plmnId\":\"00101\",\"pointer\":1,\"regionId\":1,\"setId\":1}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (4, 'admin', 1721115335515, 'admin', 1722596226592, '', '0', 'AMF', 'tai', 'TAI List', 'array', '[{\"index\":0,\"plmnId\":\"00101\",\"tac\":\"4388\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (5, 'admin', 1721115336497, 'admin', 1722596226595, '', '0', 'AMF', 'slice', 'Slice List', 'array', '[{\"index\":0,\"plmnId\":\"00101\",\"sd\":\"000001\",\"sst\":1}]', 100);

INSERT INTO `pt_ne_config_data` VALUES (10, 'admin', 1722062503452, 'admin', 1722596269441, '', '0', 'AUSF', 'system', 'System', 'list', '[{\"enableNrf\":false,\"groupId\":\"ausfGroup001\",\"nrfUri\":\"http://172.60.5.180:8080\",\"scheme\":0,\"serviceIP\":\"172.60.5.130\",\"servicePort\":8080,\"udmUri\":\"http://172.60.5.140:8080\"}]', 100);

INSERT INTO `pt_ne_config_data` VALUES (20, 'admin', 1722062508293, 'admin', 1722596273008, '', '0', 'UDM', 'system', 'System', 'list', '[{\"ausfIP\":\"172.60.5.130\",\"capacity\":4096,\"enableNrf\":false,\"fqdn\":\"udm.5gc.com\",\"gpsiRanges\":\"msisdn-69072000~msisdn-69072099\",\"groupId\":\"0\",\"nrfUri\":\"http://172.60.5.180:8080\",\"priority\":1,\"redisAddr\":\"172.60.5.140:6379\",\"redisLink\":0,\"scheme\":0,\"serviceIP\":\"172.60.5.140\",\"servicePort\":8080,\"supiRanges\":\"imsi-001010100080000~imsi-001010100080099\",\"supportedPlmn1\":\"00101\",\"supportedPlmn2\":\"\",\"supportedPlmn3\":\"\",\"supportedPlmn4\":\"\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (21, 'admin', 1722062508301, 'admin', 1722596273012, '', '0', 'UDM', 'subsUEAmbr', 'Subs UE AMBR', 'array', '[{\"downlink\":\"20 Gbps\",\"index\":1,\"name\":\"def_ambr\",\"uplink\":\"10 Gbps\"},{\"downlink\":\"2 Gbps\",\"index\":2,\"name\":\"lab_ambr\",\"uplink\":\"1 Gbps\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (22, 'admin', 1722062508337, 'admin', 1722596273018, '', '0', 'UDM', 'subsNssais', 'Subs NSSAIs', 'array', '[{\"defaultSingleNSSAIs\":\"1-000001\",\"index\":1,\"name\":\"def_nssai\",\"singleNssais\":\"1-000001\",\"supportedFeatures\":\"00000002\"},{\"defaultSingleNSSAIs\":\"2-000002\",\"index\":2,\"name\":\"lab_nssai\",\"singleNssais\":\"2-000001\",\"supportedFeatures\":\"00000006\"},{\"defaultSingleNSSAIs\":\"1-000002\",\"index\":3,\"name\":\"nssai_2\",\"singleNssais\":\"1-000002\",\"supportedFeatures\":\"00000002\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (23, 'admin', 1722062508436, 'admin', 1722596273023, '', '0', 'UDM', 'forbiddenAreas', 'Forbidden Areas', 'array', '[{\"areaCodes\":\"\",\"index\":1,\"name\":\"def_arfb\",\"tacs\":\"\"},{\"areaCodes\":\"\",\"index\":2,\"name\":\"arfb_0\",\"tacs\":\"123\"},{\"areaCodes\":\"\",\"index\":3,\"name\":\"arfb_1\",\"tacs\":\"456\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (24, 'admin', 1722062508495, 'admin', 1722596273027, '', '0', 'UDM', 'serviceAreaRestriction', 'Service Area Restriction', 'array', '[{\"areaCodes\":\"\",\"index\":1,\"maxTAs\":0,\"name\":\"def_sar\",\"restrictionType\":1,\"tacs\":\"\"},{\"areaCodes\":\"\",\"index\":2,\"maxTAs\":0,\"name\":\"sar_not_allowed\",\"restrictionType\":1,\"tacs\":\"4388\"},{\"areaCodes\":\"\",\"index\":3,\"maxTAs\":0,\"name\":\"sar_allowed\",\"restrictionType\":0,\"tacs\":\"4388\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (25, 'admin', 1722062508545, 'admin', 1722596273031, '', '0', 'UDM', 'smfSelection', 'Subs SMF Selection', 'array', '[{\"dnnList\":[{\"defaultDnnInd\":true,\"dnn\":\"internet\",\"index\":1,\"iwkEpsInd\":false,\"ladnIndicator\":false,\"lboRoamingAllowed\":false},{\"defaultDnnInd\":true,\"dnn\":\"ims\",\"index\":2,\"iwkEpsInd\":false,\"ladnIndicator\":false,\"lboRoamingAllowed\":false}],\"index\":1,\"name\":\"def_snssai\",\"snssai\":\"1-000001\"},{\"dnnList\":[{\"defaultDnnInd\":true,\"dnn\":\"internet\",\"index\":1,\"iwkEpsInd\":false,\"ladnIndicator\":false,\"lboRoamingAllowed\":false}],\"index\":2,\"name\":\"lab_snssai\",\"snssai\":\"1-000001\"},{\"dnnList\":[{\"defaultDnnInd\":true,\"dnn\":\"internet\",\"index\":1,\"iwkEpsInd\":false,\"ladnIndicator\":false,\"lboRoamingAllowed\":false},{\"defaultDnnInd\":false,\"dnn\":\"ims\",\"index\":2,\"iwkEpsInd\":false,\"ladnIndicator\":false,\"lboRoamingAllowed\":false}],\"index\":3,\"name\":\"snssai_2\",\"snssai\":\"1-000001\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (26, 'admin', 1722062508595, 'admin', 1722596273035, '', '0', 'UDM', 'dnn', 'DNN Conf', 'array', '[{\"5qi\":9,\"allowedPDUSessionTypes\":6,\"allowedSSCmodes\":3,\"arpPreemptCap\":0,\"arpPreemptVuln\":0,\"arpPriorityLevel\":6,\"chargingCharacteristics\":\"0002\",\"defaultPDUSessionType\":0,\"defaultSSCmode\":0,\"index\":1,\"interworkingEPSIndicator\":true,\"ladnIndicator\":false,\"name\":\"internet\",\"priorityLevel\":90,\"staticIPAddress\":\"\",\"subscribedSessionAmbrDL\":\"20Gbps\",\"subscribedSessionAmbrUL\":\"10Gbps\",\"userPlaneConfidentiality\":3,\"userPlaneIntegrity\":3},{\"5qi\":5,\"allowedPDUSessionTypes\":6,\"allowedSSCmodes\":3,\"arpPreemptCap\":0,\"arpPreemptVuln\":0,\"arpPriorityLevel\":6,\"chargingCharacteristics\":\"0001\",\"defaultPDUSessionType\":0,\"defaultSSCmode\":0,\"index\":2,\"interworkingEPSIndicator\":false,\"ladnIndicator\":false,\"name\":\"ims\",\"priorityLevel\":10,\"staticIPAddress\":\"\",\"subscribedSessionAmbrDL\":\"2Gbps\",\"subscribedSessionAmbrUL\":\"1Gbps\",\"userPlaneConfidentiality\":3,\"userPlaneIntegrity\":3}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (27, 'admin', 1722062508696, 'admin', 1722596273044, '', '0', 'UDM', 'epsTemplate', 'EPS User Template', 'array', '[{\"ambrDownlink\":200000000,\"ambrUplink\":100000000,\"apnOIReplacement\":\"money\",\"chargingCharacteristic\":\"0001\",\"index\":1,\"name\":\"def_eps\",\"rauTauTimer\":120,\"rfsp\":1}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (28, 'admin', 1722062508738, 'admin', 1722596273048, '', '0', 'UDM', 'epsApn', 'EPS APN', 'array', '[{\"ambrDownlink\":200000000,\"ambrUplink\":100000000,\"arpPreemptCap\":1,\"arpPreemptVuln\":0,\"arpPriorityLevel\":8,\"chargingCharacteristic\":\"0001\",\"contextIdentifier\":1,\"dnn\":\"internet\",\"index\":1,\"pdnGWAllocationType\":1,\"pdnType\":0,\"qci\":9,\"vplmnDynamicAddressAllowed\":true},{\"ambrDownlink\":10000000,\"ambrUplink\":10000000,\"arpPreemptCap\":1,\"arpPreemptVuln\":0,\"arpPriorityLevel\":2,\"chargingCharacteristic\":\"0400\",\"contextIdentifier\":2,\"dnn\":\"ims\",\"index\":2,\"pdnGWAllocationType\":1,\"pdnType\":0,\"qci\":5,\"vplmnDynamicAddressAllowed\":true}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (29, 'admin', 1722062508771, 'admin', 1722596273052, '', '0', 'UDM', 'applicationServer', 'Application Server', 'array', '[{\"defaultHandling\":0,\"diameterAddress\":\"mmtel.ims.mnc001.mcc001.3gppnetwork.org\",\"includeRegisterRequest\":false,\"includeRegisterResponse\":false,\"index\":1,\"name\":\"mmtel_as\",\"repDataSizeLimit\":0,\"serverName\":\"sip:192.168.5.60:7060\"},{\"defaultHandling\":0,\"diameterAddress\":\"smsc.ims.mnc001.mcc001.3gppnetwork.org\",\"includeRegisterRequest\":false,\"includeRegisterResponse\":false,\"index\":2,\"name\":\"sms_as\",\"repDataSizeLimit\":0,\"serverName\":\"sip:192.168.5.60:8060\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (30, 'admin', 1722062508788, 'admin', 1722596273056, '', '0', 'UDM', 'scscfSet', 'SCSCF Set', 'array', '[{\"index\":1,\"name\":\"def_scscf\",\"priority\":1,\"serverName\":\"sip:scscf.ims.mnc001.mcc001.3gppnetwork.org:6060\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (31, 'admin', 1722062508806, 'admin', 1722596273061, '', '0', 'UDM', 'triggerPoint', 'Trigger Point', 'array', '[{\"conditionTypeCNF\":0,\"index\":1,\"name\":\"mmtel_tp\",\"sptList\":[{\"conditionNegated\":0,\"enable\":true,\"group\":1,\"index\":1,\"method\":\"REGISTER\",\"sipContent\":\"\",\"sipHeader\":\"\"},{\"conditionNegated\":0,\"enable\":true,\"group\":2,\"index\":2,\"method\":\"INVITE\",\"sipContent\":\"\",\"sipHeader\":\"\"}]},{\"conditionTypeCNF\":0,\"index\":2,\"name\":\"sms_tp\",\"sptList\":[{\"conditionNegated\":0,\"enable\":true,\"group\":0,\"index\":1,\"method\":\"REGISTER\",\"sipContent\":\"\",\"sipHeader\":\"\"},{\"conditionNegated\":0,\"enable\":true,\"group\":2,\"index\":2,\"method\":\"\",\"sipContent\":\"123456789\",\"sipHeader\":\"to\"},{\"conditionNegated\":0,\"enable\":true,\"group\":2,\"index\":3,\"method\":\"MESSAGE\",\"sipContent\":\"\",\"sipHeader\":\"\"}]}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (32, 'admin', 1722062508824, 'admin', 1722596273064, '', '0', 'UDM', 's6aServer', 'S6a Server', 'list', '[{\"addr\":\"172.60.5.140:3868\",\"enable\":true,\"host\":\"hss.ims.mnc001.mcc001.3gppnetwork.org\",\"netType\":1,\"realm\":\"ims.mnc001.mcc001.3gppnetwork.org\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (33, 'admin', 1722062508838, 'admin', 1722596273068, '', '0', 'UDM', 'cxServer', 'Cx Server', 'list', '[{\"addr\":\"172.60.5.140:3868\",\"enable\":true,\"host\":\"hss.ims.mnc001.mcc001.3gppnetwork.org\",\"netType\":0,\"realm\":\"ims.mnc001.mcc001.3gppnetwork.org\"}]', 100);

INSERT INTO `pt_ne_config_data` VALUES (50, 'admin', 1722062512389, 'admin', 1722596281081, '', '0', 'SMF', 'smfSystem', 'SMF System Config', 'list', '[{\"amfUri\":\"172.60.5.120:8080\",\"chfEnable\":false,\"chfPrimaryUri\":\"172.16.5.240:8080\",\"chfSecondaryUri\":\"\",\"n10CfgEnable\":false,\"n10IpAddr\":\"\",\"n10Port\":0,\"n10Scheme\":0,\"n11CfgEnable\":false,\"n11IpAddr\":\"\",\"n11Port\":0,\"n11Scheme\":0,\"n4Ipv4\":\"172.60.5.150\",\"n4Ipv6\":\"\",\"n4UIpv4\":\"\",\"n4UIpv6\":\"\",\"n7CfgEnable\":false,\"n7IpAddr\":\"\",\"n7Port\":0,\"n7Scheme\":0,\"nrfCfgEnable\":false,\"nrfEnable\":false,\"nrfIpAddr\":\"\",\"nrfPort\":0,\"nrfScheme\":0,\"nrfUri\":\"172.60.5.180:8080\",\"pcfEnable\":true,\"pcfUri\":\"172.60.5.160:8080\",\"primaryDnsIpv4\":\"8.8.4.4\",\"primaryDnsIpv6\":\"\",\"primaryPcscfIpv4\":\"192.168.5.60\",\"primaryPcscfIpv6\":\"\",\"sbiIpAddr\":\"172.60.5.150\",\"sbiPort\":8080,\"sbiScheme\":0,\"secondaryDnsIpv4\":\"1.1.1.1\",\"secondaryDnsIpv6\":\"\",\"secondaryPcscfIpv4\":\"\",\"secondaryPcscfIpv6\":\"\",\"udmUri\":\"172.60.5.140:8080\",\"ueMtu\":1400}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (51, 'admin', 1722062512552, 'admin', 1722596281099, '', '0', 'SMF', 'spgwSystem', 'SPGW Sytem Config', 'list', '[{\"gxChargingEnable\":false,\"localDiameterHostName\":\"smf.mnc001.mcc001.3gppnetwork.org\",\"localDiameterIp\":\"172.60.5.150\",\"localDiameterRealmName\":\"mnc001.mcc001.3gppnetwork.org\",\"localGxConfigEnable\":null,\"localGxHostName\":null,\"localGxIp\":null,\"localGxRealmName\":null,\"localGyConfigEnable\":null,\"localGyHostName\":null,\"localGyIp\":null,\"localGyRealmName\":null,\"peerGxEnable\":true,\"peerGyEnable\":false,\"primaryPeerGxIp\":\"172.60.5.160\",\"primaryPeerGxPort\":3868,\"primaryPeerGyIp\":\"\",\"primaryPeerGyPort\":3868,\"s11Ip\":\"172.60.5.150\",\"secondaryPeerGxIp\":\"\",\"secondaryPeerGxPort\":3868,\"secondaryPeerGyIp\":\"\",\"secondaryPeerGyPort\":3868}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (52, 'admin', 1722062512600, 'admin', 1722596281103, '', '0', 'SMF', 'upfConfig', 'UPF Config', 'array', '[{\"addr\":\"172.60.5.190:8805\",\"id\":\"upf-1\",\"index\":0,\"ipPoolType\":\"ipv4v6\",\"ipv4Pools\":\"10.2.1.0/24\",\"ipv6Pools\":\"\",\"staticIpv4Enable\":false,\"staticIpv4End\":\"10.2.1.240\",\"staticIpv4Start\":\"10.2.1.200\",\"staticIpv6Enable\":false,\"staticIpv6End\":\"\",\"staticIpv6Start\":\"\",\"ueDnnIpPool\":[{\"dnn\":\"test\",\"index\":0,\"ipPoolType\":\"ipv4v6\",\"ipv4Pools\":\"10.10.13.0/24\",\"ipv6Pools\":\"fd0d:10:1::/50\",\"staticIpv4Enable\":false,\"staticIpv4End\":\"0.0.0.0\",\"staticIpv4Start\":\"0.0.0.0\",\"staticIpv6Enable\":false,\"staticIpv6End\":\"\",\"staticIpv6Start\":\"\"}]}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (53, 'admin', 1722062512754, 'admin', 1722596281105, '', '0', 'SMF', 'dnnSelectUpf', 'DNN Select UPF', 'array', '[{\"dnn\":\"internet\",\"index\":0,\"upfId\":\"upf-1\"},{\"dnn\":\"ims\",\"index\":1,\"upfId\":\"upf-1\"},{\"dnn\":\"*\",\"index\":2,\"upfId\":\"upf-1\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (54, 'admin', 1722062512921, 'admin', 1722596281107, '', '0', 'SMF', 'dnnTaiSelectUpf', 'DNN TAI Select UPF', 'array', '[{\"dnn\":\"example\",\"index\":0,\"tai\":\"00101666666\",\"upfId\":\"upf2-id\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (55, 'admin', 1722062513008, 'admin', 1722596281111, '', '0', 'SMF', 'offlineChargingConfig', 'Offline Charging Config', 'list', '[{\"cdrFileMaxAge\":30,\"cdrFileName\":\"smf.cdr\",\"cdrFileNum\":50,\"cdrFilePath\":\"/var/log/smfCdr\",\"cdrFileSize\":300,\"freeSubsCdrEnable\":false,\"timeThreshold\":600,\"volumeThreshold\":0}]', 100);

INSERT INTO `pt_ne_config_data` VALUES (70, 'admin', 1722062518382, 'admin', 1722596289640, '', '0', 'PCF', 'system', 'System', 'list', '[{\"enableNrf\":false,\"nrfUri\":\"http://172.60.5.180:8080\",\"scheme\":0,\"serviceIP\":\"172.60.5.160\",\"servicePort\":8080,\"supportedPlmn1\":\"00101\",\"supportedPlmn2\":\"\",\"supportedPlmn3\":\"\",\"supportedPlmn4\":\"\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (71, 'admin', 1722062518461, 'admin', 1722596289650, '', '0', 'PCF', 'serviceAreaRestriction', 'Service Area Restriction', 'array', '[{\"areaCodes\":\"\",\"index\":1,\"maxTAs\":0,\"name\":\"def_sar\",\"restrictionType\":1,\"tacs\":\"\"},{\"areaCodes\":\"\",\"index\":2,\"maxTAs\":0,\"name\":\"sar_not_allowed\",\"restrictionType\":1,\"tacs\":\"4388\"},{\"areaCodes\":\"\",\"index\":3,\"maxTAs\":0,\"name\":\"sar_allowed\",\"restrictionType\":0,\"tacs\":\"4388\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (72, 'admin', 1722062518548, 'admin', 1722596289663, '', '0', 'PCF', 'pccRules', 'PCC Rules', 'array', '[{\"activate\":true,\"appId\":\"\",\"flowTemplate\":\"flow_any\",\"flowUsage\":0,\"index\":1,\"precedence\":253,\"qosId\":\"qos_internet\",\"ruleId\":\"internet\",\"trafficControlId\":\"\",\"usageMonitoringId\":\"\"},{\"activate\":true,\"appId\":\"\",\"flowTemplate\":\"flow_any\",\"flowUsage\":1,\"index\":2,\"precedence\":80,\"qosId\":\"qos_ims\",\"ruleId\":\"ims_sig\",\"trafficControlId\":\"\",\"usageMonitoringId\":\"\"},{\"activate\":false,\"appId\":\"\",\"flowTemplate\":\"flow_web\",\"flowUsage\":0,\"index\":3,\"precedence\":85,\"qosId\":\"qos_web\",\"ruleId\":\"rule_web\",\"trafficControlId\":\"\",\"usageMonitoringId\":\"\"},{\"activate\":false,\"appId\":\"\",\"flowTemplate\":\"flow_ftp\",\"flowUsage\":0,\"index\":4,\"precedence\":80,\"qosId\":\"qos_ftp\",\"ruleId\":\"rule_ftp\",\"trafficControlId\":\"\",\"usageMonitoringId\":\"\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (73, 'admin', 1722062518601, 'admin', 1722596289667, '', '0', 'PCF', 'sessionRules', 'Session Rules', 'array', '[{\"activate\":true,\"ambrDl\":\"5Gbps\",\"ambrUl\":\"1Gbps\",\"arpPreemptCap\":0,\"arpPreemptVuln\":1,\"arpPriorityLevel\":1,\"averagingWindow\":0,\"fiveQI\":9,\"fiveQIPriorityLevel\":0,\"flowUsage\":0,\"gbrDl\":\"1Gbps\",\"gbrUl\":\"1Gbps\",\"index\":1,\"maxDataBurstVolume\":0,\"maxbrDl\":\"5Gbps\",\"maxbrUl\":\"5Gbps\",\"ruleId\":\"internet\",\"usageMonitoringId\":\"def_um\"},{\"activate\":true,\"ambrDl\":\"200Kbps\",\"ambrUl\":\"100Kbps\",\"arpPreemptCap\":0,\"arpPreemptVuln\":0,\"arpPriorityLevel\":10,\"averagingWindow\":0,\"fiveQI\":5,\"fiveQIPriorityLevel\":0,\"flowUsage\":1,\"gbrDl\":\"\",\"gbrUl\":\"\",\"index\":2,\"maxDataBurstVolume\":0,\"maxbrDl\":\"\",\"maxbrUl\":\"\",\"ruleId\":\"ims_sig\",\"usageMonitoringId\":\"\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (74, 'admin', 1722062518622, 'admin', 1722596289672, '', '0', 'PCF', 'gxServer', 'Gx Server', 'list', '[{\"addr\":\"172.60.5.160:3868\",\"enable\":true,\"host\":\"pcrf.epc.mnc001.mcc001.3gppnetwork.org\",\"netType\":0,\"realm\":\"epc.mnc001.mcc001.3gppnetwork.org\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (75, 'admin', 1722062518639, 'admin', 1722596289675, '', '0', 'PCF', 'rxServer', 'Rx Server', 'list', '[{\"addr\":\"172.60.5.160:3867\",\"enable\":false,\"host\":\"pcrf.epc.mnc001.mcc001.3gppnetwork.org\",\"netType\":0,\"realm\":\"epc.mnc001.mcc001.3gppnetwork.org\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (76, 'admin', 1722062518655, 'admin', 1722596289679, '', '0', 'PCF', 'flowTemplate', 'Flow Template', 'array', '[{\"flowDescription\":\"permit out ip from any to assigned\",\"flowDirection\":3,\"index\":1,\"templateName\":\"flow_any\"},{\"flowDescription\":\"permit out 6 from 192.168.1.205 80 to assigned\",\"flowDirection\":3,\"index\":2,\"templateName\":\"flow_web\"},{\"flowDescription\":\"permit out 6 from any 20-21 to assigned\",\"flowDirection\":3,\"index\":3,\"templateName\":\"flow_ftp\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (77, 'admin', 1722062518703, 'admin', 1722596289683, '', '0', 'PCF', 'qosTemplate', 'QoS Template', 'array', '[{\"arpPreemptCap\":0,\"arpPreemptVuln\":1,\"arpPriorityLevel\":1,\"defQosFlowIndication\":false,\"fiveQI\":8,\"fiveQIPriorityLevel\":0,\"gbrDl\":\"2Gbps\",\"gbrUl\":\"500Mbps\",\"index\":1,\"maxbrDl\":\"5Gbps\",\"maxbrUl\":\"1Gbps\",\"qosId\":\"qos_internet\"},{\"arpPreemptCap\":0,\"arpPreemptVuln\":1,\"arpPriorityLevel\":1,\"defQosFlowIndication\":false,\"fiveQI\":8,\"fiveQIPriorityLevel\":0,\"gbrDl\":\"2Gbps\",\"gbrUl\":\"500Mbps\",\"index\":2,\"maxbrDl\":\"5Gbps\",\"maxbrUl\":\"1Gbps\",\"qosId\":\"qos_enrich\"},{\"arpPreemptCap\":0,\"arpPreemptVuln\":0,\"arpPriorityLevel\":10,\"defQosFlowIndication\":false,\"fiveQI\":5,\"fiveQIPriorityLevel\":0,\"gbrDl\":\"200Mbps\",\"gbrUl\":\"100Mbps\",\"index\":3,\"maxbrDl\":\"500Mbps\",\"maxbrUl\":\"200Mbps\",\"qosId\":\"qos_ims\"},{\"arpPreemptCap\":0,\"arpPreemptVuln\":0,\"arpPriorityLevel\":10,\"defQosFlowIndication\":false,\"fiveQI\":6,\"fiveQIPriorityLevel\":0,\"gbrDl\":\"50Mbps\",\"gbrUl\":\"30Mbps\",\"index\":4,\"maxbrDl\":\"50Mbps\",\"maxbrUl\":\"30Mbps\",\"qosId\":\"qos_web\"},{\"arpPreemptCap\":0,\"arpPreemptVuln\":0,\"arpPriorityLevel\":10,\"defQosFlowIndication\":false,\"fiveQI\":8,\"fiveQIPriorityLevel\":0,\"gbrDl\":\"50Mbps\",\"gbrUl\":\"30Mbps\",\"index\":5,\"maxbrDl\":\"50Mbps\",\"maxbrUl\":\"30Mbps\",\"qosId\":\"qos_ftp\"},{\"arpPreemptCap\":0,\"arpPreemptVuln\":0,\"arpPriorityLevel\":1,\"defQosFlowIndication\":false,\"fiveQI\":1,\"fiveQIPriorityLevel\":0,\"gbrDl\":\"41Kbps\",\"gbrUl\":\"41Kbps\",\"index\":6,\"maxbrDl\":\"64Kbps\",\"maxbrUl\":\"64Kbps\",\"qosId\":\"qos_audio\"},{\"arpPreemptCap\":0,\"arpPreemptVuln\":0,\"arpPriorityLevel\":2,\"defQosFlowIndication\":false,\"fiveQI\":2,\"fiveQIPriorityLevel\":0,\"gbrDl\":\"960Kbps\",\"gbrUl\":\"960Kbps\",\"index\":7,\"maxbrDl\":\"960Kbps\",\"maxbrUl\":\"960Kbps\",\"qosId\":\"qos_video\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (78, 'admin', 1722062518749, 'admin', 1722596289685, '', '0', 'PCF', 'usageMonitoringTemplate', 'Usage Monitoring Template', 'array', '[{\"inactivityTime\":0,\"index\":1,\"timeThreshold\":1800,\"umId\":\"def_um\",\"volumeThreshold\":5120,\"volumeThresholdDownlink\":0,\"volumeThresholdUplink\":0}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (79, 'admin', 1722062518767, 'admin', 1722596289689, '', '0', 'PCF', 'trafficControlTemplate', 'Traffic Control Template', 'array', '[{\"flowStatus\":0,\"index\":1,\"muteNotif\":true,\"tcId\":\"tc_01\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (80, 'admin', 1722062518825, 'admin', 1722596289693, '', '0', 'PCF', 'headerEnrichTemplate', 'Header Enrich Template', 'array', '[{\"headerName\":\"gpsi\",\"headerType\":0,\"index\":1,\"templateName\":\"gpsi\"},{\"headerName\":\"supi\",\"headerType\":1,\"index\":2,\"templateName\":\"supi\"},{\"headerName\":\"ueip\",\"headerType\":2,\"index\":3,\"templateName\":\"ueip\"},{\"headerName\":\"dnn\",\"headerType\":4,\"index\":4,\"templateName\":\"dnn\"},{\"headerName\":\"uli\",\"headerType\":3,\"index\":5,\"templateName\":\"uli\"},{\"headerName\":\"dnn\",\"headerType\":4,\"index\":6,\"templateName\":\"dnn_uli\"}]', 100);

INSERT INTO `pt_ne_config_data` VALUES (90, 'admin', 1722062580153, 'admin', 1722596254903, '', '0', 'IMS', 'system', 'System', 'list', '[{\"InternalCDRInd\":true,\"InternalKPIInd\":true,\"LocalNetworkIPv4\":\"172.60.5.110\\n\",\"dispatchSystemIP\":\"1.0.0.1\",\"dispatchSystemInd\":false,\"dispatchSystemPort\":0,\"domainName1\":\"ims.mnc001.mcc001.3gppnetwork.org\",\"domainName2\":\"\",\"domainName3\":\"\",\"domainName4\":\"\",\"hplmnMCC\":\"001\",\"hplmnMNC\":\"01\",\"internalSMSInd\":true,\"label\":\"IMS-CORE\",\"logDir\":\"/var/log/ims\",\"logLevel\":\"INFO\",\"logNum\":10,\"logSize\":\"200\",\"maxCallDuration\":43200,\"multiDomainInd\":true,\"multiIPStackInd\":false,\"pcfIP\":\"172.60.5.160\",\"redisAddr\":\"\\\"127.0.0.1:6379\",\"redisPassword\":\"\\\"helloearth\",\"redisUserName\":\"\",\"registerTimer\":4000,\"serviceIP\":\"192.168.5.60\",\"serviceIPv6\":\"::1\",\"transcodeInd\":false}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (91, 'admin', 1722062580453, 'admin', 1722596254908, '', '0', 'IMS', 'plmn', 'PLMN List', 'array', '[{\"domain\":\"ims.mnc001.mcc001.3gppnetwork.org\",\"index\":0,\"mcc\":\"001\",\"mnc\":\"01\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (92, 'admin', 1722062580462, 'admin', 1722596254913, '', '0', 'IMS', 'mmtel_dialplan', 'MMTEL Dialplan', 'array', '[{\"adminState\":0,\"attrib\":\"1\",\"e164Delete\":\"0\",\"e164Insert\":\"\",\"e164Nai\":\"1\",\"end\":\"\",\"index\":0,\"method\":\"0\",\"naName\":\"NA-1\",\"numberLen\":\"0\",\"prefix\":\"123\",\"rsc\":\"0\",\"start\":\"\",\"title\":\"Called\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (93, 'admin', 1722062580469, 'admin', 1722596254916, '', '0', 'IMS', 'ds_system', 'DS System', 'list', '[{\"dispatchSystemIP\":\"1.0.0.1\",\"dispatchSystemInd\":false,\"dispatchSystemPort\":5060,\"transcodeInd\":false}]', 100);

INSERT INTO `pt_ne_config_data` VALUES (100, 'admin', 1722062709590, 'admin', 1722596313267, '', '0', 'UPF', 'general', 'General', 'list', '[{\"checksumOffload\":0,\"commonStatisticInterval\":60,\"configFileDirectory\":\"/usr/local/etc/upf/\",\"dataForwarderNum\":1,\"exeFileDirectory\":\"/usr/local/bin/\",\"maxDownlinkBufferNum\":32,\"rxN3OverLoadThresholdMbps\":0,\"rxN6OverLoadThresholdMbps\":0,\"systemId\":0,\"userStatisticInterval\":60}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (101, 'admin', 1722062709895, 'admin', 1722596313273, '', '0', 'UPF', 'logger', 'Logger', 'list', '[{\"logDir\":\"/var/log/\",\"logLevel\":\"debug\",\"logNum\":10,\"logSize\":200,\"reportCaller\":false,\"upfdLogLevel\":\"debug\",\"upfdLogTransfer\":false}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (102, 'admin', 1722062710095, 'admin', 1722596313285, '', '0', 'UPF', 'pfcp', 'PFCP', 'list', '[{\"heartbeatInterval\":15,\"ipType\":\"ipv4\",\"localIpv4\":\"172.60.5.190\",\"localIpv6\":\"\",\"localUdpPort\":8805,\"maxRetry\":3,\"retryInterval\":2,\"smfIpv4\":\"0.0.0.0\",\"smfIpv6\":\"\",\"smfUdpPort\":8805}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (103, 'admin', 1722062711707, 'admin', 1722596313288, '', '0', 'UPF', 'telnet', 'Telnet', 'list', '[{\"enabled\":true,\"ipType\":\"ipv4\",\"localIpv4\":\"172.60.5.190\",\"localIpv6\":\"\",\"localPort\":4100}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (104, 'admin', 1722062712550, 'admin', 1722596313290, '', '0', 'UPF', 'redisDb', 'Redis DB', 'list', '[{\"enabled\":false,\"netType\":\"tcp\",\"password\":\"helloearth\",\"serverAddr\":\"172.16.5.140:6379\",\"username\":\"\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (105, 'admin', 1722062713042, 'admin', 1722596313293, '', '0', 'UPF', 'dataForwarderCommon', 'Data Forwarder Common', 'list', '[{\"cpuWorkers\":\"\",\"downlinkCpuWorkers\":\"\",\"enableQer\":0,\"enableTap\":0,\"instanceId\":1,\"isHotStandby\":0,\"isRun\":0,\"mainCpu\":1,\"n3HeartbeatInterval\":30,\"pfcpIpType\":\"ipv4\",\"pfcpLocalIpv4\":\"0.0.0.0\",\"pfcpLocalIpv6\":\"\",\"pfcpLocalUdpPort\":8805,\"rxTxQueueNum\":1,\"teidStart\":16777216,\"type\":\"tun\",\"uplinkCpuWorkers\":\"\",\"useSocket\":0}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (106, 'admin', 1722062713076, 'admin', 1722596313296, '', '0', 'UPF', 'dataForwarderUpfd', 'Data Forwarder Upfd', 'list', '[{\"Dprc\":0,\"buffersPerNuma\":100000,\"commandlineListen\":\"172.60.5.190:5002\",\"dpdkNoPci\":0,\"heapSizeGB\":2,\"memChannelNum\":0,\"n3RssHash\":\"\",\"sessionBaseVa\":\"0x2000000000\",\"stateSegSizeMB\":256,\"uioDriver\":\"vfio-pci\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (107, 'admin', 1722062713526, 'admin', 1722596313299, '', '0', 'UPF', 'dataInterfaceList', 'Data Interface List', 'array', '[{\"bfdGatewayIpv4\":\"0.0.0.0\",\"bfdGatewayIpv6\":\"\",\"bfdRxIntervalMs\":0,\"bfdTxIntervalMs\":0,\"bondId\":1,\"bondType\":\"\",\"dataDefaultDSCPValue\":0,\"dnnName\":\"default\",\"dpdkRxDescNumber\":0,\"dpdkRxQueuesNumber\":0,\"dpdkTxDescNumber\":0,\"dpdkTxQueuesNumber\":0,\"dpdkworkers\":\"\",\"driverType\":\"vmxnet3\",\"gatewayIpv4\":\"192.168.1.1\",\"gatewayIpv6\":\"\",\"gtpuRemoteIpv4PoolList\":[{\"index\":1,\"ipv4\":\"0.0.0.0\",\"ipv4Mask\":\"255.255.255.0\"}],\"gtpuRemoteIpv6PoolList\":[{\"index\":1,\"ipv6\":\"\",\"ipv6Prefix\":64}],\"gtpuSignalingHandle\":0,\"imsDefaultDSCPValue\":0,\"index\":1,\"innerDSCPValueMap\":0,\"interfaceId\":1,\"interfacePCI\":\"0000:00:00.0\",\"interfaceType\":\"N3\",\"ipType\":\"ipv4\",\"ipv4\":\"\",\"ipv4AddrList\":[{\"index\":1,\"ipv4\":\"192.168.5.60\",\"ipv4Mask\":\"255.255.255.0\"}],\"ipv4Mask\":\"\",\"ipv6\":\"\",\"ipv6AddrList\":[{\"index\":1,\"ipv6\":\"\",\"ipv6Prefix\":64}],\"ipv6Prefix\":0,\"linkDetectionType\":0,\"macAddr\":\"00:00:00:00:00:00\",\"maxSupportSpeedMbps\":0,\"mtu\":1500,\"natInterfaceId\":0,\"systemNetworkCardName\":\"\",\"udpListenPort\":2152,\"udpSrcPort\":0,\"udsLocalFileFullPath\":\"\",\"udsRemoteFileFullPath\":\"\",\"ueIpv4\":\"10.2.1.0\",\"ueIpv4Mask\":\"255.255.255.0\",\"ueIpv6\":\"\",\"ueIpv6Prefix\":64,\"vlanIdMax\":0,\"vlanIdMin\":0},{\"bfdGatewayIpv4\":\"0.0.0.0\",\"bfdGatewayIpv6\":\"\",\"bfdRxIntervalMs\":0,\"bfdTxIntervalMs\":0,\"bondId\":1,\"bondType\":\"\",\"dataDefaultDSCPValue\":0,\"dnnName\":\"default\",\"dpdkRxDescNumber\":0,\"dpdkRxQueuesNumber\":0,\"dpdkTxDescNumber\":0,\"dpdkTxQueuesNumber\":0,\"dpdkworkers\":\"\",\"driverType\":\"vmxnet3\",\"gatewayIpv4\":\"192.168.1.1\",\"gatewayIpv6\":\"\",\"gtpuRemoteIpv4PoolList\":[{\"index\":1,\"ipv4\":\"0.0.0.0\",\"ipv4Mask\":\"255.255.255.0\"}],\"gtpuRemoteIpv6PoolList\":[{\"index\":1,\"ipv6\":\"\",\"ipv6Prefix\":64}],\"gtpuSignalingHandle\":0,\"imsDefaultDSCPValue\":0,\"index\":2,\"innerDSCPValueMap\":0,\"interfaceId\":1,\"interfacePCI\":\"0000:00:00.0\",\"interfaceType\":\"N6\",\"ipType\":\"ipv4\",\"ipv4\":\"\",\"ipv4AddrList\":[{\"index\":1,\"ipv4\":\"192.168.8.191\",\"ipv4Mask\":\"255.255.255.0\"}],\"ipv4Mask\":\"\",\"ipv6\":\"\",\"ipv6AddrList\":[{\"index\":1,\"ipv6\":\"\",\"ipv6Prefix\":64}],\"ipv6Prefix\":0,\"linkDetectionType\":0,\"macAddr\":\"00:00:00:00:00:00\",\"maxSupportSpeedMbps\":0,\"mtu\":1500,\"natInterfaceId\":0,\"systemNetworkCardName\":\"\",\"udpListenPort\":2152,\"udpSrcPort\":0,\"udsLocalFileFullPath\":\"\",\"udsRemoteFileFullPath\":\"\",\"ueIpv4\":\"10.2.1.0\",\"ueIpv4Mask\":\"255.255.255.0\",\"ueIpv6\":\"\",\"ueIpv6Prefix\":64,\"vlanIdMax\":0,\"vlanIdMin\":0},{\"bfdGatewayIpv4\":\"0.0.0.0\",\"bfdGatewayIpv6\":\"\",\"bfdRxIntervalMs\":0,\"bfdTxIntervalMs\":0,\"bondId\":1,\"bondType\":\"\",\"dataDefaultDSCPValue\":0,\"dnnName\":\"default\",\"dpdkRxDescNumber\":0,\"dpdkRxQueuesNumber\":0,\"dpdkTxDescNumber\":0,\"dpdkTxQueuesNumber\":0,\"dpdkworkers\":\"\",\"driverType\":\"\",\"gatewayIpv4\":\"0.0.0.0\",\"gatewayIpv6\":\"\",\"gtpuRemoteIpv4PoolList\":[{\"index\":1,\"ipv4\":\"0.0.0.0\",\"ipv4Mask\":\"255.255.255.0\"}],\"gtpuRemoteIpv6PoolList\":[{\"index\":1,\"ipv6\":\"\",\"ipv6Prefix\":64}],\"gtpuSignalingHandle\":0,\"imsDefaultDSCPValue\":0,\"index\":3,\"innerDSCPValueMap\":0,\"interfaceId\":1,\"interfacePCI\":\"0000:00:00.0\",\"interfaceType\":\"N9\",\"ipType\":\"ipv4\",\"ipv4\":\"\",\"ipv4AddrList\":[{\"index\":1,\"ipv4\":\"0.0.0.0\",\"ipv4Mask\":\"255.255.255.0\"}],\"ipv4Mask\":\"\",\"ipv6\":\"\",\"ipv6AddrList\":[{\"index\":1,\"ipv6\":\"\",\"ipv6Prefix\":64}],\"ipv6Prefix\":0,\"linkDetectionType\":0,\"macAddr\":\"00:00:00:00:00:00\",\"maxSupportSpeedMbps\":0,\"mtu\":1500,\"natInterfaceId\":0,\"systemNetworkCardName\":\"\",\"udpListenPort\":2152,\"udpSrcPort\":0,\"udsLocalFileFullPath\":\"\",\"udsRemoteFileFullPath\":\"\",\"ueIpv4\":\"0.0.0.0\",\"ueIpv4Mask\":\"255.255.255.0\",\"ueIpv6\":\"\",\"ueIpv6Prefix\":64,\"vlanIdMax\":0,\"vlanIdMin\":0},{\"bfdGatewayIpv4\":\"0.0.0.0\",\"bfdGatewayIpv6\":\"\",\"bfdRxIntervalMs\":0,\"bfdTxIntervalMs\":0,\"bondId\":1,\"bondType\":\"\",\"dataDefaultDSCPValue\":0,\"dnnName\":\"default\",\"dpdkRxDescNumber\":0,\"dpdkRxQueuesNumber\":0,\"dpdkTxDescNumber\":0,\"dpdkTxQueuesNumber\":0,\"dpdkworkers\":\"\",\"driverType\":\"\",\"gatewayIpv4\":\"0.0.0.0\",\"gatewayIpv6\":\"\",\"gtpuRemoteIpv4PoolList\":[{\"index\":1,\"ipv4\":\"0.0.0.0\",\"ipv4Mask\":\"255.255.255.0\"}],\"gtpuRemoteIpv6PoolList\":[{\"index\":1,\"ipv6\":\"\",\"ipv6Prefix\":64}],\"gtpuSignalingHandle\":0,\"imsDefaultDSCPValue\":0,\"index\":4,\"innerDSCPValueMap\":0,\"interfaceId\":1,\"interfacePCI\":\"0000:00:00.0\",\"interfaceType\":\"N19\",\"ipType\":\"ipv4\",\"ipv4\":\"\",\"ipv4AddrList\":[{\"index\":1,\"ipv4\":\"0.0.0.0\",\"ipv4Mask\":\"255.255.255.0\"}],\"ipv4Mask\":\"\",\"ipv6\":\"\",\"ipv6AddrList\":[{\"index\":1,\"ipv6\":\"\",\"ipv6Prefix\":64}],\"ipv6Prefix\":0,\"linkDetectionType\":0,\"macAddr\":\"00:00:00:00:00:00\",\"maxSupportSpeedMbps\":0,\"mtu\":1500,\"natInterfaceId\":0,\"systemNetworkCardName\":\"\",\"udpListenPort\":2152,\"udpSrcPort\":0,\"udsLocalFileFullPath\":\"\",\"udsRemoteFileFullPath\":\"\",\"ueIpv4\":\"0.0.0.0\",\"ueIpv4Mask\":\"255.255.255.0\",\"ueIpv6\":\"\",\"ueIpv6Prefix\":64,\"vlanIdMax\":0,\"vlanIdMin\":0}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (108, 'admin', 1722062713626, 'admin', 1722596313304, '', '0', 'UPF', 'networkControlCommon', 'Network Control Common', 'list', '[{\"dscpInnerMapping\":0,\"localSwitchDisabled\":0,\"maxTCPSyncPerSecond\":0,\"upfMaxSupportMbps\":0}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (109, 'admin', 1722062713643, 'admin', 1722596313308, '', '0', 'UPF', 'networkControlDnnList', 'Network Control DNN List', 'array', '[{\"dnnName\":\"ims\",\"dstServerIpv4PoolList\":[{\"index\":1,\"ipv4\":\"0.0.0.0\",\"ipv4Mask\":\"255.255.255.0\"}],\"dstServerIpv6PoolList\":[{\"index\":1,\"ipv6\":\"\",\"ipv6Prefix\":64}],\"gatewayIpType\":\"ipv4\",\"gatewayIpv4\":\"0.0.0.0\",\"gatewayIpv6\":\"\",\"greLocalInnerIpType\":\"ipv4\",\"greLocalInnerIpv4\":\"0.0.0.0\",\"greLocalInnerIpv6\":\"\",\"greRemoteOuterIpType\":\"ipv4\",\"greRemoteOuterIpv4\":\"0.0.0.0\",\"greRemoteOuterIpv6\":\"\",\"headerEnrichInfoList\":[{\"index\":1,\"name\":\"\",\"type\":0,\"value\":\"\"}],\"httpProtoEnabled\":0,\"httpsProtoEnabled\":0,\"index\":1,\"localSwitchCheck\":0,\"m2mIpType\":\"ipv4\",\"m2mIpv4\":\"0.0.0.0\",\"m2mIpv6\":\"\",\"m2mUdpPort\":0,\"n3InterfaceId\":1,\"n6InterfaceId\":1,\"qerMaxSupportMbps\":0,\"secondaryGatewayIpv4\":\"0.0.0.0\",\"secondaryGatewayIpv6\":\"\",\"statisticEnabled\":0,\"ueIpv4PoolList\":[{\"index\":1,\"ipv4\":\"10.10.0.0\",\"ipv4Mask\":\"255.255.0.0\"}],\"ueIpv6PoolList\":[{\"index\":1,\"ipv6\":\"\",\"ipv6Prefix\":64}]},{\"dnnName\":\"\",\"dstServerIpv4PoolList\":[{\"index\":1,\"ipv4\":\"0.0.0.0\",\"ipv4Mask\":\"255.255.255.0\"}],\"dstServerIpv6PoolList\":[{\"index\":1,\"ipv6\":\"\",\"ipv6Prefix\":64}],\"gatewayIpType\":\"ipv4\",\"gatewayIpv4\":\"0.0.0.0\",\"gatewayIpv6\":\"\",\"greLocalInnerIpType\":\"ipv4\",\"greLocalInnerIpv4\":\"0.0.0.0\",\"greLocalInnerIpv6\":\"\",\"greRemoteOuterIpType\":\"ipv4\",\"greRemoteOuterIpv4\":\"0.0.0.0\",\"greRemoteOuterIpv6\":\"\",\"headerEnrichInfoList\":[{\"index\":1,\"name\":\"\",\"type\":0,\"value\":\"\"}],\"httpProtoEnabled\":0,\"httpsProtoEnabled\":0,\"index\":2,\"localSwitchCheck\":0,\"m2mIpType\":\"ipv4\",\"m2mIpv4\":\"0.0.0.0\",\"m2mIpv6\":\"\",\"m2mUdpPort\":0,\"n3InterfaceId\":1,\"n6InterfaceId\":1,\"qerMaxSupportMbps\":0,\"secondaryGatewayIpv4\":\"0.0.0.0\",\"secondaryGatewayIpv6\":\"\",\"statisticEnabled\":0,\"ueIpv4PoolList\":[{\"index\":1,\"ipv4\":\"0.0.0.0\",\"ipv4Mask\":\"255.255.255.0\"}],\"ueIpv6PoolList\":[{\"index\":1,\"ipv6\":\"\",\"ipv6Prefix\":64}]}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (110, 'admin', 1722062713659, 'admin', 1722596313314, '', '0', 'UPF', 'networkControlSnssaiList', 'Network Control SNSSAI List', 'array', '[{\"index\":1,\"n3InterfaceId\":1,\"n6InterfaceId\":1,\"qerMaxSupportMbps\":0,\"sd\":0,\"sst\":0,\"statisticEnabled\":0,\"vlanIdMax\":0,\"vlanIdMin\":0}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (111, 'admin', 1722062713803, 'admin', 1722596313318, '', '0', 'UPF', 'networkControlAclWhiteList', 'Network Control ACL White List', 'array', '[{\"dstServerIpv4\":\"0.0.0.0\",\"dstServerIpv4Mask\":\"255.255.255.0\",\"dstServerIpv6\":\"\",\"dstServerIpv6Prefix\":64,\"index\":1,\"ueIpv4\":\"0.0.0.0\",\"ueIpv4Mask\":\"255.255.255.0\",\"ueIpv6\":\"\",\"ueIpv6Prefix\":64}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (112, 'admin', 1722062713820, 'admin', 1722596313331, '', '0', 'UPF', 'networkControlAclBlackList', 'Network Control ACL Black List', 'array', '[{\"dstServerIpv4\":\"0.0.0.0\",\"dstServerIpv4Mask\":\"255.255.255.0\",\"dstServerIpv6\":\"\",\"dstServerIpv6Prefix\":64,\"index\":1,\"ueIpv4\":\"0.0.0.0\",\"ueIpv4Mask\":\"255.255.255.0\",\"ueIpv6\":\"\",\"ueIpv6Prefix\":64}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (113, 'admin', 1722062713919, 'admin', 1722596313335, '', '0', 'UPF', 'networkControlDnsServerList', 'Network Control DNS Server List', 'array', '[{\"dnsName\":\"\",\"enabled\":0,\"index\":1,\"serverIpv4\":\"0.0.0.0\",\"serverIpv6\":\"\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (114, 'admin', 1722062714043, 'admin', 1722596313340, '', '0', 'UPF', 'dpiCommon', 'DPI Common', 'list', '[{\"httpProtoEnabled\":0,\"httpsProtoEnabled\":0,\"maxDetectPacketNum\":20}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (115, 'admin', 1722062714049, 'admin', 1722596313343, '', '0', 'UPF', 'dpiHeaderEnrichInfoList', 'DPI Header Enrich Info List', 'array', '[{\"index\":1,\"name\":\"\",\"type\":0,\"value\":\"\"}]', 100);
INSERT INTO `pt_ne_config_data` VALUES (116, 'admin', 1722062714055, 'admin', 1722596313347, '', '0', 'UPF', 'dpiAppList', 'DPI APP List', 'array', '[{\"appName\":\"\",\"forceCheckType\":0,\"index\":1,\"n3InterfaceId\":1,\"n6InterfaceId\":1,\"proxyEnabled\":0,\"ruleList\":[{\"customName\":\"\",\"flowDescription\":\"\",\"index\":1,\"regexMatch\":\"\",\"ruleId\":1}]}]', 100);

INSERT INTO `omc_db`.`pt_ne_config_data` (`id`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `stub_type`, `ne_type`, `param_name`, `param_display`, `param_type`, `param_json`, `dept_id`) VALUES (117, 'admin', 1722596294290, '', 0, '', '0', 'NSSF', 'general', 'General', 'list', '[{\"logDir\":\"/var/log/\",\"logLevel\":\"info\",\"logNum\":10,\"logSize\":200,\"nfId\":\"f1466470-9dc7-49fb-adff-ba014c58af19\",\"nrfUri\":\"http://172.60.5.180:8080\",\"nssfName\":\"nssf\",\"systemId\":0}]', 100);
INSERT INTO `omc_db`.`pt_ne_config_data` (`id`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `stub_type`, `ne_type`, `param_name`, `param_display`, `param_type`, `param_json`, `dept_id`) VALUES (118, 'admin', 1722596294306, '', 0, '', '0', 'NSSF', 'sbi', 'SBI', 'list', '[{\"bindingIpv4\":\"172.60.5.170\",\"bindingIpv6\":\"\",\"ipType\":\"ipv4\",\"port\":8080,\"registerIpv4\":\"172.60.5.170\",\"registerIpv6\":\"\",\"scheme\":\"http\",\"telnetIpv4\":\"172.60.5.170\",\"telnetIpv6\":\"\",\"telnetPort\":4100}]', 100);
INSERT INTO `omc_db`.`pt_ne_config_data` (`id`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `stub_type`, `ne_type`, `param_name`, `param_display`, `param_type`, `param_json`, `dept_id`) VALUES (119, 'admin', 1722596294310, '', 0, '', '0', 'NSSF', 'supportedNetworkSliceList', 'Supported Network Slice List', 'array', '[{\"accessType\":\"3GPP_ACCESS\",\"amfSetId\":\"001-01-01-001\",\"index\":1,\"mcc\":\"001\",\"mnc\":\"01\",\"nrfId\":\"http://172.60.5.180:8080/nnrf-nfm/v1/nf-instances\",\"nsiId\":\"11\",\"restrictedSd\":\"000001\",\"restrictedSst\":2,\"supportedSd\":\"000001\",\"supportedSst\":1,\"tac\":\"001124\"},{\"accessType\":\"3GPP_ACCESS\",\"amfSetId\":\"001-01-01-002\",\"index\":2,\"mcc\":\"001\",\"mnc\":\"01\",\"nrfId\":\"http://172.60.5.180:8080/nnrf-nfm/v1/nf-instances\",\"nsiId\":\"11\",\"restrictedSd\":\"000001\",\"restrictedSst\":2,\"supportedSd\":\"000001\",\"supportedSst\":1,\"tac\":\"000002\"}]', 100);

INSERT INTO `omc_db`.`pt_ne_config_data` (`id`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `stub_type`, `ne_type`, `param_name`, `param_display`, `param_type`, `param_json`, `dept_id`) VALUES (120, 'admin', 1722596299802, 'admin', 1722596308736, '', '0', 'NRF', 'system', 'System', 'list', '[{\"scheme\":0,\"serviceIP\":\"172.60.5.180\",\"servicePort\":8080}]', 100);

-- Dump completed on 2022-07-27 10:55:22
