/*
 Navicat Premium Data Transfer

 Source Server         : root@192.168.0.229
 Source Server Type    : MariaDB
 Source Server Version : 100335 (10.3.35-MariaDB-log)
 Source Host           : 192.168.0.229:33066
 Source Schema         : omc_db

 Target Server Type    : MariaDB
 Target Server Version : 100335 (10.3.35-MariaDB-log)
 File Encoding         : 65001

 Date: 16/08/2023 19:00:09
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for sys_perf_data
-- ----------------------------
DROP TABLE IF EXISTS `sys_perf_data`;
CREATE TABLE `sys_perf_data`  (
  `id` int(11) NOT NULL AUTO_INCREMENT COMMENT '主鍵',
  `create_time` datetime NULL DEFAULT NULL COMMENT '創建時間',
  `dir_used` varchar(10) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '文件目錄空間使用GB',
  `dir_list` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '文件目錄列表數據json',
  `db_info` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '數據庫空間使用信息',
  `mem_used` varchar(5) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '内存使用率%',
  `cpu_used` varchar(5) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT 'CPU使用率%',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 2 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci COMMENT = '系统指标数据' ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
