{
  "Version": 1.2,
  "General": {
    "ContinueOnError": false,
    "IncludeDelete": true,
    "IncludeInsert": true,
    "IncludeUpdate": true,
    "RunMultipleSQL": false,
    "ShowCompareResultAndDeploymentSQL": true,
    "ShowDetails": true,
    "SourceCatalog": "",
    "SourceCloudInstanceName": "",
    "SourceProject": "",
    "SourceProjectOwnerNavicatID": "",
    "SourceSchema": "omc_db",
    "SourceServer": "root@192.168.2.166",
    "SourceServerType": "MARIADB",
    "TargetCatalog": "",
    "TargetCloudInstanceName": "",
    "TargetProject": "",
    "TargetProjectOwnerNavicatID": "",
    "TargetSchema": "omc_db",
    "TargetServer": "omc@192.168.2.211",
    "TargetServerType": "MARIADB",
    "UseTransaction": false
  },
  "Tables": [
    {
      "Source": {
        "Name": "sys_menu",
        "ObjectType": "Table_MARIADB"
      },
      "Target": {
        "Name": "sys_menu",
        "ObjectType": "Table_MARIADB"
      },
      "Keys": [],
      "Fields": []
    }
  ]
}