/*
 Navicat Premium Data Transfer

 Source Server         : local_mariadb
 Source Server Type    : MariaDB
 Source Server Version : 100338 (10.3.38-MariaDB)
 Source Host           : localhost:33066
 Source Schema         : omc_db

 Target Server Type    : MariaDB
 Target Server Version : 100338 (10.3.38-MariaDB)
 File Encoding         : 65001

 Date: 30/07/2023 02:45:48
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for mml_http_map
-- ----------------------------
DROP TABLE IF EXISTS `mml_http_map`;
CREATE TABLE `mml_http_map`  (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `ne_type` varchar(16) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `operation` varchar(10) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `object` varchar(16) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `method` varchar(10) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT NULL,
  `uri` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `params` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `output` longtext CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT NULL,
  PRIMARY KEY (`id`) USING BTREE,
  INDEX `id`(`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 515 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of mml_http_map
-- ----------------------------
INSERT INTO `mml_http_map` VALUES (513, 'EMS', 'dsp', 'neInfo', 'Get', '/api/rest/databaseManagement/v1/omc_db/ne_info', 'WHERE', '{\r\n\"retFmt\": \"GetDB\",    \r\n\"retMsg\": \"RetCode = %d operation succeeded\\n\\n\",\r\n\"errMsg\": \"ErrorCode = %d operation failed: %s\\n\\n\",\r\n\"title\": \"Network element information\",\r\n\"singleList\": true,\r\n\"sepSpaceNum\": 2,\r\n\"alignmentM\": \"Left\",\r\n\"alignmentSN\": \"Right\",\r\n\"alignmentSV\": \"Left\",\r\n\"cols\":\r\n[\r\n    {\r\n        \"name\": \"ne_type\",\r\n        \"display\": \"Network type\", \r\n        \"length\": 10\r\n    },\r\n    {\r\n        \"name\": \"ne_id\",\r\n        \"display\": \"Network identifier\",\r\n        \"length\": 16\r\n    },\r\n    {\r\n        \"name\": \"rm_uid\",\r\n        \"display\": \"Resource management universal identifier\",\r\n        \"length\": 28\r\n    }    \r\n],\r\n\"end\": \"(Number of results = %d)\\n\\n\"\r\n}\r\n\r\n');
INSERT INTO `mml_http_map` VALUES (514, 'EMS', 'dsp', 'neState', 'Get', '/api/rest/systemManagement/v1/elementType/UDM/objectType/systemState', NULL, NULL);

SET FOREIGN_KEY_CHECKS = 1;
