/*
 Navicat Premium Data Transfer

 Source Server         : root@192.168.2.166
 Source Server Type    : MariaDB
 Source Server Version : 100616 (10.6.16-MariaDB-0ubuntu0.22.04.1)
 Source Host           : 192.168.2.166:33066
 Source Schema         : tenants_db

 Target Server Type    : MariaDB
 Target Server Version : 100616 (10.6.16-MariaDB-0ubuntu0.22.04.1)
 File Encoding         : 65001

 Date: 19/06/2024 14:32:47
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for sys_user
-- ----------------------------
DROP TABLE IF EXISTS `sys_user`;
CREATE TABLE `sys_user`  (
  `user_id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT '用户ID',
  `dept_id` bigint(20) NULL DEFAULT 0 COMMENT '部门ID',
  `tenant_id` bigint(20) NULL DEFAULT NULL COMMENT 'Tenant ID',
  `user_name` varchar(36) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL DEFAULT '' COMMENT '用户账号',
  `nick_name` varchar(36) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL DEFAULT '' COMMENT '用户昵称',
  `user_type` varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT 'sys' COMMENT '用户类型（sys系统用户）',
  `email` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT '用户邮箱',
  `phonenumber` varchar(16) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT '手机号码',
  `sex` char(1) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '0' COMMENT '用户性别（0未知 1男 2女）',
  `avatar` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT '头像地址',
  `password` varchar(100) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT '密码',
  `status` char(1) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '0' COMMENT '帐号状态（0停用 1正常）',
  `del_flag` char(1) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '0' COMMENT '删除标志（0代表存在 1代表删除）',
  `login_ip` varchar(128) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT '最后登录IP',
  `login_date` bigint(20) NULL DEFAULT 0 COMMENT '最后登录时间',
  `create_by` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT '创建者',
  `create_time` bigint(20) NULL DEFAULT 0 COMMENT '创建时间',
  `update_by` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT '更新者',
  `update_time` bigint(20) NULL DEFAULT 0 COMMENT '更新时间',
  `remark` varchar(500) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT '备注',
  PRIMARY KEY (`user_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 100 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci COMMENT = '用户信息表' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of sys_user
-- ----------------------------
INSERT INTO `sys_user` VALUES (1, NULL, NULL, 'supervisor', 'supervisor', 'sys', '', '', '', '', '$2a$10$QgIcp6yuOEGrEU0TNU12K.uQRLbcufesEU7hiRYlRSSdUO7OAkoTq', '1', '0', '127.0.0.1', 0, '', 0, '', 0, '');
INSERT INTO `sys_user` VALUES (2, NULL, NULL, 'admin', 'admin', 'sys', '', '', '', '', '$2a$10$QgIcp6yuOEGrEU0TNU12K.uQRLbcufesEU7hiRYlRSSdUO7OAkoTq', '1', '0', '192.168.2.219', 1718778383378, '', 0, 'admin', 1718778383379, '');
INSERT INTO `sys_user` VALUES (3, NULL, NULL, 'manager', 'manager', 'sys', '', '', '', '', '$2a$10$RND3fUw9Ai.WcggYSI57tu.u3OIlktdPxFzlWkmiHC1paV038t0I2', '1', '0', '127.0.0.1', 0, '', 0, '', 0, '');
INSERT INTO `sys_user` VALUES (4, NULL, NULL, 'monitor', 'monitor', 'sys', '', '', '', '', '$2a$10$t3zpKQ0olECotFyI1yO43.tCoS0EXoSRBDcqwl09xvrsmn14qFHHy', '1', '0', '127.0.0.1', 0, '', 0, '', 0, '');

SET FOREIGN_KEY_CHECKS = 1;
