SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for oauth2_log_login
-- ----------------------------
CREATE TABLE IF NOT EXISTS `oauth2_log_login` (
  `id` bigint NOT NULL AUTO_INCREMENT COMMENT '登录ID',
  `client_id` varchar(32) COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '应用的唯一标识',
  `login_ip` varchar(128) COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '登录IP地址',
  `login_location` varchar(32) COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '登录地点',
  `browser` varchar(64) COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '浏览器类型',
  `os` varchar(64) COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '操作系统',
  `status_flag` varchar(1) COLLATE utf8mb4_general_ci DEFAULT '0' COMMENT '登录状态（0失败 1成功）',
  `msg` varchar(255) COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '提示消息',
  `login_time` bigint DEFAULT '0' COMMENT '登录时间',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci COMMENT='第三方_用户授权应用登录日志表';

SET FOREIGN_KEY_CHECKS = 1;

-- Dump completed on 2025-04-25 15:26:56
