/*
 Navicat Premium Data Transfer

 Source Server         : root@192.168.0.229
 Source Server Type    : MariaDB
 Source Server Version : 100335 (10.3.35-MariaDB-log)
 Source Host           : 192.168.0.229:33066
 Source Schema         : omc_db

 Target Server Type    : MariaDB
 Target Server Version : 100335 (10.3.35-MariaDB-log)
 File Encoding         : 65001

 Date: 16/08/2023 09:31:32
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for monitor_base
-- ----------------------------
DROP TABLE IF EXISTS `monitor_base`;
CREATE TABLE `monitor_base`  (
  `id` int(11) UNSIGNED NOT NULL AUTO_INCREMENT COMMENT 'id',
  `created_at` datetime NULL DEFAULT NULL COMMENT '创建时间',
  `updated_at` datetime NULL DEFAULT NULL COMMENT '更新时间',
  `cpu` float NULL DEFAULT NULL COMMENT 'cpu使用率',
  `load_usage` float NULL DEFAULT NULL COMMENT 'cpu平均使用率',
  `cpu_load1` float NULL DEFAULT NULL COMMENT 'cpu使用1分钟',
  `cpu_load5` float NULL DEFAULT NULL COMMENT 'cpu使用5分钟',
  `cpu_load15` float NULL DEFAULT NULL COMMENT 'cpu使用15分钟',
  `memory` float NULL DEFAULT NULL COMMENT '内存使用率',
  `db_size` int(11) UNSIGNED NULL DEFAULT NULL COMMENT '数据库使用空间K',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 17 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci COMMENT = '监控_基本信息' ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
