SET FOREIGN_KEY_CHECKS=0;

UPDATE `sys_menu` SET `visible` = '1', `status` = '1', `update_by` = 'supervisor', `update_time` = (UNIX_TIMESTAMP(NOW(3)) * 1000) WHERE `menu_id` = 2143;

SET FOREIGN_KEY_CHECKS=1;