SET FOREIGN_KEY_CHECKS=0;

-- PSAP Menu and Data Dictionary
INSERT IGNORE INTO `sys_dict_data` VALUES (25000, 25000, 'menu.psap.agent', 'Agent', 'i18n_en', '', '', '1', 'supervisor', 1721902269805, '', 0, '');
INSERT IGNORE INTO `sys_dict_data` VALUES (25001, 25001, 'menu.psap.agent.callings', 'Calling Info', 'i18n_en', '', '', '1', 'supervisor', 1721902269805, '', 0, '');
INSERT IGNORE INTO `sys_dict_data` VALUES (25002, 25002, 'menu.psap.agent.callback', 'CallBack Management', 'i18n_en', '', '', '1', 'supervisor', 1721902269805, '', 0, '');
INSERT IGNORE INTO `sys_dict_data` VALUES (25003, 25003, 'callback.status.NEW', 'NEW', 'callback_status', NULL, NULL, '1', 'supervisor', 1749784015598, '', 0, NULL);
INSERT IGNORE INTO `sys_dict_data` VALUES (25004, 25004, 'callback.status.IN_PROGRESS', 'IN_PROGRESS', 'callback_status', NULL, NULL, '1', 'supervisor', 1749784045911, '', 0, NULL);
INSERT IGNORE INTO `sys_dict_data` VALUES (25005, 25005, 'callback.status.NO_ANSWER_1', 'NO_ANSWER_1', 'callback_status', NULL, NULL, '1', 'supervisor', 1749784070706, '', 0, NULL);
INSERT IGNORE INTO `sys_dict_data` VALUES (25006, 25006, 'callback.status.NO_ANSWER_2', 'NO_ANSWER_2', 'callback_status', NULL, NULL, '1', 'supervisor', 1749784078301, '', 0, NULL);
INSERT IGNORE INTO `sys_dict_data` VALUES (25007, 25007, 'callback.status.TIMEOUT', 'TIMEOUT', 'callback_status', NULL, NULL, '1', 'supervisor', 1749784100809, '', 0, NULL);
INSERT IGNORE INTO `sys_dict_data` VALUES (25008, 25008, 'callback.status.PENDING', 'PENDING', 'callback_status', NULL, NULL, '1', 'supervisor', 1749784115379, '', 0, NULL);
INSERT IGNORE INTO `sys_dict_data` VALUES (25009, 25009, 'callback.status.CLOSED', 'CLOSED', 'callback_status', NULL, NULL, '1', 'supervisor', 1749784127612, '', 0, NULL);
INSERT IGNORE INTO `sys_dict_data` VALUES (25010, 25010, 'job.export.cdr.mf', 'Regularly Export MF CDR', 'i18n_en', '', '', '1', 'supervisor', 1721902269805, '', 0, '');
INSERT IGNORE INTO `sys_dict_data` VALUES (25011, 25011, 'job.psap.ticket.monitor', 'Callback Ticket Monitor', 'i18n_en', '', '', '1', 'supervisor', 1721902269805, '', 0, '');

SET FOREIGN_KEY_CHECKS=1;