/*
 Navicat Premium Data Transfer

 Source Server         : local_mariadb
 Source Server Type    : MariaDB
 Source Server Version : 100338 (10.3.38-MariaDB)
 Source Host           : localhost:33066
 Source Schema         : tenants_db

 Target Server Type    : MariaDB
 Target Server Version : 100338 (10.3.38-MariaDB)
 File Encoding         : 65001

 Date: 19/06/2024 14:12:55
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for sys_role_tenant
-- ----------------------------
DROP TABLE IF EXISTS `sys_role_tenant`;
CREATE TABLE `sys_role_tenant`  (
  `role_id` bigint(20) NOT NULL COMMENT '角色ID',
  `tenant_id` bigint(20) NOT NULL COMMENT '租户ID',
  PRIMARY KEY (`role_id`, `tenant_id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci COMMENT = '角色和部门关联表' ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
