SET FOREIGN_KEY_CHECKS=0;

REPLACE INTO `sys_dict_data` VALUES (3029, 3029, 'menu.log.operat', 'Operation Logs', 'i18n_en', NULL, NULL, '1', 'supervisor', 1700000000000, NULL, 0, NULL);
REPLACE INTO `sys_dict_data` VALUES (3030, 3030, 'menu.log.login', 'Security Logs', 'i18n_en', NULL, NULL, '1', 'supervisor', 1700000000000, NULL, 0, NULL);
REPLACE INTO `sys_dict_data` VALUES (3092, 3092, 'menu.log.alarm', 'Alarm Logs', 'i18n_en', NULL, NULL, '1', 'supervisor', 1700000000000, NULL, 0, NULL);
REPLACE INTO `sys_dict_data` VALUES (3094, 3094, 'menu.log.forwarding', 'Alarm Forwarding Logs', 'i18n_en', NULL, NULL, '1', 'supervisor', 1700000000000, NULL, 0, NULL);
REPLACE INTO `sys_dict_data` VALUES (3104, 3104, 'menu.log.alarmRemark', 'Alarm Logs Menu', 'i18n_en', NULL, NULL, '1', 'supervisor', 1700000000000, NULL, 0, NULL);
REPLACE INTO `sys_dict_data` VALUES (4014, 4014, 'menu.log.neFile', 'NE Log Files', 'i18n_en', NULL, NULL, '1', 'supervisor', 1700000000000, NULL, 0, NULL);

-- PSAP Menu and Data Dictionary
REPLACE INTO `sys_dict_data` VALUES (25000, 25000, 'menu.psap.agent', 'Agent', 'i18n_en', '', '', '1', 'supervisor', 1721902269805, '', 0, '');
REPLACE INTO `sys_dict_data` VALUES (25001, 25001, 'menu.psap.agent.callings', 'Calling Information', 'i18n_en', '', '', '1', 'supervisor', 1721902269805, '', 0, '');
REPLACE INTO `sys_dict_data` VALUES (25002, 25002, 'menu.psap.agent.callback', 'CallBack Management', 'i18n_en', '', '', '1', 'supervisor', 1721902269805, '', 0, '');
REPLACE INTO `sys_dict_data` VALUES (25003, 25003, 'callback.status.NEW', 'NEW', 'i18n_en', NULL, NULL, '1', 'supervisor', 1749784015598, '', 0, NULL);
REPLACE INTO `sys_dict_data` VALUES (25004, 25004, 'callback.status.IN_PROGRESS', 'IN_PROGRESS', 'i18n_en', NULL, NULL, '1', 'supervisor', 1749784045911, '', 0, NULL);
REPLACE INTO `sys_dict_data` VALUES (25005, 25005, 'callback.status.NO_ANSWER_1', 'NO_ANSWER_1', 'i18n_en', NULL, NULL, '1', 'supervisor', 1749784070706, '', 0, NULL);
REPLACE INTO `sys_dict_data` VALUES (25006, 25006, 'callback.status.NO_ANSWER_2', 'NO_ANSWER_2', 'i18n_en', NULL, NULL, '1', 'supervisor', 1749784078301, '', 0, NULL);
REPLACE INTO `sys_dict_data` VALUES (25007, 25007, 'callback.status.TIMEOUT', 'TIMEOUT', 'i18n_en', NULL, NULL, '1', 'supervisor', 1749784100809, '', 0, NULL);
REPLACE INTO `sys_dict_data` VALUES (25008, 25008, 'callback.status.PENDING', 'PENDING', 'i18n_en', NULL, NULL, '1', 'supervisor', 1749784115379, '', 0, NULL);
REPLACE INTO `sys_dict_data` VALUES (25009, 25009, 'callback.status.CLOSED', 'CLOSED', 'i18n_en', NULL, NULL, '1', 'supervisor', 1749784127612, '', 0, NULL);
REPLACE INTO `sys_dict_data` VALUES (25010, 25010, 'job.export.cdr.mf', 'Regularly Export MF CDR', 'i18n_en', '', '', '1', 'supervisor', 1721902269805, '', 0, '');
REPLACE INTO `sys_dict_data` VALUES (25011, 25011, 'job.psap.ticket.monitor', 'Callback Ticket Monitor', 'i18n_en', '', '', '1', 'supervisor', 1721902269805, '', 0, '');
REPLACE INTO `sys_dict_data` VALUES (25012, 25012, 'menu.psap.cdr.mf', 'PSAP CDR', 'i18n_en', NULL, NULL, '1', 'supervisor', NULL, '', 0, NULL);
REPLACE INTO `sys_dict_data` VALUES (25013, 25013, 'menu.psap.cdr.crbt', 'CRBT CDR', 'i18n_en', NULL, NULL, '1', 'supervisor', NULL, '', 0, NULL);
REPLACE INTO `sys_dict_data` VALUES (25014, 25014, 'menu.psap.cdr.mms', 'MMS CDR', 'i18n_en', NULL, NULL, '1', 'supervisor', NULL, '', 0, NULL);
REPLACE INTO `sys_dict_data` VALUES (25015, 25015, 'menu.psap.cbc.cbe', 'Broadcast', 'i18n_en', NULL, NULL, '1', 'supervisor', NULL, '', 0, NULL);

SET FOREIGN_KEY_CHECKS=1;