SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for sys_dict_data
-- ----------------------------

-- psap callback status
REPLACE INTO `sys_dict_data` VALUES (500, 500, 'callback.status.NEW', 'NEW', 'callback_status', NULL, NULL, '1', 'supervisor', 1749784015598, '', 0, NULL);
REPLACE INTO `sys_dict_data` VALUES (501, 501, 'callback.status.IN_PROGRESS', 'IN_PROGRESS', 'callback_status', NULL, NULL, '1', 'supervisor', 1749784045911, '', 0, NULL);
REPLACE INTO `sys_dict_data` VALUES (502, 502, 'callback.status.NO_ANSWER_1', 'NO_ANSWER_1', 'callback_status', NULL, NULL, '1', 'supervisor', 1749784070706, '', 0, NULL);
REPLACE INTO `sys_dict_data` VALUES (503, 503, 'callback.status.NO_ANSWER_2', 'NO_ANSWER_2', 'callback_status', NULL, NULL, '1', 'supervisor', 1749784078301, '', 0, NULL);
REPLACE INTO `sys_dict_data` VALUES (504, 504, 'callback.status.TIMEOUT', 'TIMEOUT', 'callback_status', NULL, NULL, '1', 'supervisor', 1749784100809, '', 0, NULL);
REPLACE INTO `sys_dict_data` VALUES (505, 505, 'callback.status.PENDING', 'PENDING', 'callback_status', NULL, NULL, '1', 'supervisor', 1749784115379, '', 0, NULL);
REPLACE INTO `sys_dict_data` VALUES (506, 506, 'callback.status.CLOSED', 'CLOSED', 'callback_status', NULL, NULL, '1', 'supervisor', 1749784127612, '', 0, NULL);

SET FOREIGN_KEY_CHECKS = 1;
