SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for cdr_event
-- ----------------------------
DROP TABLE IF EXISTS `cdr_event`;
CREATE TABLE `cdr_event` (
  `id` int NOT NULL AUTO_INCREMENT,
  `ne_type` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '',
  `ne_name` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '',
  `rm_uid` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '',
  `timestamp` bigint DEFAULT '0' COMMENT '接收到的timestamp秒级存储毫秒时间戳',
  `cdr_json` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci COMMENT 'data JSON String',
  `created_at` bigint DEFAULT '0' COMMENT '记录创建存储毫秒',
  PRIMARY KEY (`id`) USING BTREE,
  KEY `idx_type_timestamp` (`rm_uid`,`timestamp`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci COMMENT='CDR事件_基础表结构';

SET FOREIGN_KEY_CHECKS = 1;
