PRAGMA foreign_keys = false;

DELETE FROM "mml_subscriber" WHERE "id" = 609;
INSERT INTO "mml_subscriber" ("id", "ne_type", "category", "cat_display", "operation", "object", "mml_display", "param_json", "status") VALUES (609, 'UDM', 'other', 'Other', 'set suci', '', 'Set SUCI', '[{"comment":"","display":"ID","filter":"","name":"id","optional":"false","type":"string"},{"comment":"","display":"Scheme","filter":"","name":"scheme","optional":"false","type":"string"},{"comment":"","display":"Private Key","filter":"","name":"privatekey","optional":"false","type":"string"},{"comment":"","display":"Public Key","filter":"","name":"publickey","optional":"false","type":"string"}]', 'Active');

DELETE FROM "mml_subscriber" WHERE "id" = 610;
INSERT INTO "mml_subscriber" ("id", "ne_type", "category", "cat_display", "operation", "object", "mml_display", "param_json", "status") VALUES (610, 'UDM', 'other', 'Other', 'set op', '', 'Set OP', '[{"comment":"","display":"ID","filter":"","name":"id","optional":"false","type":"string"},{"comment":"","display":"Value","filter":"","name":"value","optional":"false","type":"string"}]', 'Active');

DELETE FROM "mml_subscriber" WHERE "id" = 611;
INSERT INTO "mml_subscriber" ("id", "ne_type", "category", "cat_display", "operation", "object", "mml_display", "param_json", "status") VALUES (611, 'UDM', 'other', 'Other', 'dec key', '', 'Check Key Profile', 'null', 'Active');

UPDATE "mml_subscriber" SET "ne_type" = 'UDM', "category" = 'authdataManagement', "cat_display" = 'Authentication Data Management', "operation" = 'export', "object" = 'authdat', "mml_display" = 'Export Auth Data to File', "param_json" = '[{"comment":"","display":"Path File","filter":"","name":"path","optional":"false","type":"string"}]', "status" = 'Inactive' WHERE "id" = 596;

UPDATE "mml_subscriber" SET "ne_type" = 'UDM', "category" = 'subscriberManagement', "cat_display" = 'Subcriber Management', "operation" = 'export', "object" = 'udmuser', "mml_display" = 'Export Subscriber Data to File', "param_json" = '[{"comment":"","display":"Path File","filter":"","name":"path","optional":"false","type":"string"}]', "status" = 'Inactive' WHERE "id" = 606;

UPDATE "mml_subscriber" SET "ne_type" = 'UDM', "category" = 'subscriberManagement', "cat_display" = 'Subcriber Management', "operation" = 'sync', "object" = 'start', "mml_display" = 'Sync UDM Data From Public UDM', "param_json" = 'null', "status" = 'Inactive' WHERE "id" = 607;

UPDATE "mml_subscriber" SET "ne_type" = 'UDM', "category" = 'subscriberManagement', "cat_display" = 'Subcriber Management', "operation" = 'sync', "object" = 'state', "mml_display" = 'Query State of Sync Task', "param_json" = 'null', "status" = 'Inactive' WHERE "id" = 608;

DELETE FROM "sys_role_menu" WHERE "role_id" = 2 AND "menu_id" = 2107;
INSERT INTO `sys_role_menu` VALUES (2, 2107);
DELETE FROM "sys_role_menu" WHERE "role_id" = 2 AND "menu_id" = 2109;
INSERT INTO `sys_role_menu` VALUES (2, 2109);

DELETE FROM "sys_role_menu" WHERE "ne_type" = 'UPF';
INSERT INTO "ne_config" VALUES (220, 'UPF', 'general', 'General', 'list', '[{"access":"read-write","comment":"","display":"Config File Directory","filter":"","name":"configFileDirectory","type":"string","value":"/usr/local/etc/upf/"},{"access":"read-write","comment":"","display":"EXE File Directory","filter":"","name":"exeFileDirectory","type":"string","value":"/usr/local/bin/"},{"access":"read-write","comment":"1~255","display":"System ID","filter":"","name":"systemId","type":"int","value":"1"},{"access":"read-write","comment":"1~8","display":"Data Forwarder Number","filter":"1~8","name":"dataForwarderNum","type":"int","value":"1"},{"access":"read-write","comment":"","display":"Common Statistic Interval","filter":"","name":"commonStatisticInterval","type":"int","value":"60"},{"access":"read-write","comment":"","display":"User Statistic Interval","filter":"","name":"userStatisticInterval","type":"int","value":"60"},{"access":"read-write","comment":"","display":"RX N3 OverLoad Threshold Mbps","filter":"","name":"rxN3OverLoadThresholdMbps","type":"int","value":"0"},{"access":"read-write","comment":"","display":"RX N6 OverLoad Threshold Mbps","filter":"","name":"rxN6OverLoadThresholdMbps","type":"int","value":"0"},{"access":"read-write","comment":"0~255","display":"Checksum Offload","filter":"0~255","name":"checksumOffload","type":"int","value":"0"},{"access":"read-write","comment":"","display":"Max Downlink Buffer Num","filter":"","name":"maxDownlinkBufferNum","type":"int","value":"50"}]', 1, '', 1742469466451, 'public');
INSERT INTO "ne_config" VALUES (221, 'UPF', 'logger', 'Logger', 'list', '[{"access":"read-write","comment":"","display":"Log File Full Path","filter":"","name":"logFileFullPath","type":"string","value":"/var/log/upf.log"},{"access":"read-write","comment":"error|warning|info|debug","display":"Log Level","filter":"","name":"logLevel","type":"string","value":"error"},{"access":"read-write","comment":"error|warning|info|debug","display":"Upfd Log Level","filter":"","name":"upfdLogLevel","type":"string","value":"error"},{"access":"read-write","comment":"","display":"Upfd Log Transfer","filter":"","name":"upfdLogTransfer","type":"bool","value":"false"},{"access":"read-write","comment":"","display":"Report Caller","filter":"","name":"reportCaller","type":"bool","value":"false"}]', 3, '', 1742469466510, 'public');
INSERT INTO "ne_config" VALUES (222, 'UPF', 'pfcp', 'PFCP', 'list', '[{"access":"read-write","comment":"ipv4|ipv6|ipv46","display":"IP Type","filter":"","name":"ipType","type":"string","value":"ipv4"},{"access":"read-write","comment":"","display":"Local IPv4","filter":"","name":"localIpv4","type":"string","value":"0.0.0.0"},{"access":"read-write","comment":"","display":"Local IPv6","filter":"","name":"localIpv6","type":"string","value":""},{"access":"read-write","comment":"1~65535","display":"Local UDP Port","filter":"1~65535","name":"localUdpPort","type":"int","value":"8805"},{"access":"read-write","comment":"","display":"SMF IPv4","filter":"","name":"smfIpv4","type":"string","value":"0.0.0.0"},{"access":"read-write","comment":"","display":"SMF IPv6","filter":"","name":"smfIpv6","type":"string","value":""},{"access":"read-write","comment":"1~65535","display":"SMF UDP Port","filter":"1~65535","name":"smfUdpPort","type":"int","value":"8805"},{"access":"read-write","comment":"1~255","display":"Retry Interval","filter":"1~255","name":"retryInterval","type":"int","value":"2"},{"access":"read-write","comment":"0~255","display":"Max Retry","filter":"0~255","name":"maxRetry","type":"int","value":"3"},{"access":"read-write","comment":"1~255","display":"Heartbeat Interval","filter":"1~255","name":"heartbeatInterval","type":"int","value":"15"}]', 5, '', 1742469466514, 'public');
INSERT INTO "ne_config" VALUES (223, 'UPF', 'telnet', 'Telnet', 'list', '[{"access":"read-write","comment":"","display":"Enabled","filter":"","name":"enabled","type":"bool","value":"false"},{"access":"read-write","comment":"ipv4|ipv6|ipv46","display":"IP Type","filter":"","name":"ipType","type":"string","value":"ipv4"},{"access":"read-write","comment":"","display":"Local IPv4","filter":"","name":"localIpv4","type":"string","value":"0.0.0.0"},{"access":"read-write","comment":"","display":"Local IPv6","filter":"","name":"localIpv6","type":"string","value":""},{"access":"read-write","comment":"1~65535","display":"Local Port","filter":"1~65535","name":"localPort","type":"int","value":"4100"}]', 7, '', 1742469466518, 'public');
INSERT INTO "ne_config" VALUES (224, 'UPF', 'redisDb', 'Redis DB', 'list', '[{"access":"read-write","comment":"","display":"Enabled","filter":"","name":"enabled","type":"bool","value":"false"},{"access":"read-write","comment":"tcp|udp","display":"Net Type","filter":"","name":"netType","type":"string","value":"tcp"},{"access":"read-write","comment":"","display":"Server Address","filter":"","name":"serverAddr","type":"string","value":"0.0.0.0:0"}]', 9, '', 1742469466521, 'public');
INSERT INTO "ne_config" VALUES (225, 'UPF', 'dataForwarderCommon', 'Data Forwarder Common', 'list', '[{"access":"read-write","comment":"upfd|tun","display":"Type","filter":"","name":"type","type":"string","value":"upfd"},{"access":"read-only","comment":"1~8","display":"Instance ID","filter":"1~8","name":"instanceId","type":"int","value":"1"},{"access":"read-write","comment":"1~255","display":"Main CPU","filter":"1~255","name":"mainCpu","type":"int","value":"1"},{"access":"read-write","comment":"2,3,4,5 or 2-5","display":"CPU Workers","filter":"","name":"cpuWorkers","type":"string","value":""},{"access":"read-write","comment":"data forwarder already run or not","display":"Is Run","filter":"0~1","name":"isRun","type":"int","value":"0"},{"access":"read-write","comment":"Hot Standby work or not","display":"Is Hot Standby","filter":"0~1","name":"isHotStandby","type":"int","value":"0"},{"access":"read-write","comment":"The value from which TEID is allocated","display":"TEID Start","filter":"","name":"teidStart","type":"int","value":"16777216"},{"access":"read-write","comment":"","display":"N3 Heartbeat Interval","filter":"","name":"n3HeartbeatInterval","type":"int","value":"30"},{"access":"read-write","comment":"","display":"RX TX Queue Num","filter":"","name":"rxTxQueueNum","type":"int","value":"1"},{"access":"read-write","comment":"data rx\u0026tx use C socket","display":"Use Socket","filter":"0~1","name":"useSocket","type":"int","value":"0"},{"access":"read-write","comment":"Enable 5G ethernet LAN","display":"Enable Tap","filter":"0~1","name":"enableTap","type":"int","value":"0"},{"access":"read-write","comment":"Enable PFCP Qer Control","display":"Enable Qer","filter":"0~1","name":"enableQer","type":"int","value":"0"},{"access":"read-write","comment":"Enable NAT For N6 interface","display":"Enable NAT","filter":"0~1","name":"enableNat","type":"int","value":"0"},{"access":"read-write","comment":"Enable Arp Proxy For N6 interface","display":"Enable Arp Proxy","filter":"0~1","name":"enableArpProxy","type":"int","value":"0"}]', 11, '', 1742469466525, 'public');
INSERT INTO "ne_config" VALUES (226, 'UPF', 'dataForwarderUpfd', 'Data Forwarder Upfd', 'list', '[{"access":"read-write","comment":"Currently only support vfio-pci","display":"UIO Driver","filter":"","name":"uioDriver","type":"string","value":"vfio-pci"},{"access":"read-write","comment":"The format must be IP:Port","display":"Telnet Address IP:Port","filter":"","name":"commandlineListen","type":"string","value":"localhost:5002"},{"access":"read-write","comment":"the unit is GB","display":"Heap Size GB","filter":"1~8","name":"heapSizeGB","type":"int","value":"2"},{"access":"read-write","comment":"the unit is MB","display":"State Seg Size MB","filter":"64~512","name":"stateSegSizeMB","type":"int","value":"256"},{"access":"read-write","comment":"","display":"DPDK No PCI","filter":"0~1","name":"dpdkNoPci","type":"int","value":"0"},{"access":"read-write","comment":"","display":"Mem Channel Num","filter":"0~128","name":"memChannelNum","type":"int","value":"0"},{"access":"read-write","comment":"","display":"Session Base Va","filter":"","name":"sessionBaseVa","type":"string","value":"0x2000000000"},{"access":"read-write","comment":"","display":"Buffers Per Numa","filter":"","name":"buffersPerNuma","type":"int","value":"0"},{"access":"read-write","comment":"","display":"N3 RSS Hash","filter":"","name":"n3RssHash","type":"string","value":""}]', 13, '', 1742469466530, 'public');
INSERT INTO "ne_config" VALUES (227, 'UPF', 'dataInterfaceList', 'Data Interface List', 'array', '[{"access":"read-only","comment":"1~32","display":"Index","filter":"1~32","name":"index","type":"int","value":"1"},{"access":"read-write","comment":"N3|N6|N9|N19","display":"Interface Type","filter":"","name":"interfaceType","type":"string","value":"N3"},{"access":"read-write","comment":"","display":"Interface ID","filter":"1~32","name":"interfaceId","type":"int","value":"1"},{"access":"read-write","comment":"host|vmxnet3|dpdk|socket|uds","display":"Driver Type","filter":"","name":"driverType","type":"string","value":"host"},{"access":"read-write","comment":"ipv4|ipv6|ipv4v6","display":"IP Type","filter":"","name":"ipType","type":"string","value":"ipv4"},{"access":"read-write","array":[{"access":"read-only","comment":"1~8","display":"Index","filter":"1~8","name":"index","type":"int","value":"1"},{"access":"read-write","comment":"IPv4","display":"IPv4","filter":"","name":"ipv4","type":"string","value":"0.0.0.0"},{"access":"read-write","comment":"","display":"IPv4 Mask","filter":"","name":"ipv4Mask","type":"string","value":"0.0.0.0"}],"comment":"","display":"IPv4 Address List","filter":"0~8","name":"ipv4AddrList","type":"int","value":"1"},{"access":"read-write","array":[{"access":"read-only","comment":"1~8","display":"Index","filter":"1~8","name":"index","type":"int","value":"1"},{"access":"read-write","comment":"","display":"IPv6","filter":"","name":"ipv6","type":"string","value":""},{"access":"read-write","comment":"","display":"IPv6 Prefix","filter":"","name":"ipv6Prefix","type":"int","value":"64"}],"comment":"","display":"IPv6 Address List","filter":"0~8","name":"ipv6AddrList","type":"int","value":"1"},{"access":"read-write","comment":"","display":"MAC Address","filter":"","name":"macAddr","type":"string","value":"00:00:00:00:00:00"},{"access":"read-write","comment":"","display":"Interface PCI","filter":"","name":"interfacePCI","type":"string","value":"0000:00:00.0"},{"access":"read-write","comment":"","display":"System Network Card Name","filter":"","name":"systemNetworkCardName","type":"string","value":""},{"access":"read-write","comment":"","display":"Gateway IPv4","filter":"","name":"gatewayIpv4","type":"string","value":"0.0.0.0"},{"access":"read-write","comment":"null|bak|sub|xor|round|lacp","display":"Bond Type","filter":"","name":"bondType","type":"string","value":"0"},{"access":"read-write","comment":"","display":"Bond ID","filter":"0~32","name":"bondId","type":"int","value":"1"},{"access":"read-write","comment":"","display":"BFD TX Interval Ms","filter":"","name":"bfdTxIntervalMs","type":"int","value":"0"},{"access":"read-write","comment":"","display":"BFD RX Interval Ms","filter":"","name":"bfdRxIntervalMs","type":"int","value":"0"},{"access":"read-write","comment":"","display":"DNN Name","filter":"","name":"dnnName","type":"string","value":"default"},{"access":"read-write","comment":"","display":"Gateway IPv6","filter":"","name":"gatewayIpv6","type":"string","value":""},{"access":"read-write","comment":"","display":"BFD Gateway IPv4","filter":"","name":"bfdGatewayIpv4","type":"string","value":"0.0.0.0"},{"access":"read-write","comment":"","display":"BFD Gateway IPv6","filter":"","name":"bfdGatewayIpv6","type":"string","value":""},{"access":"read-write","comment":"","display":"MTU","filter":"0~65535","name":"mtu","type":"int","value":"1500"},{"access":"read-write","comment":"","display":"Vlan ID Min","filter":"","name":"vlanIdMin","type":"int","value":"0"},{"access":"read-write","comment":"","display":"Vlan ID Max","filter":"","name":"vlanIdMax","type":"int","value":"0"},{"access":"read-write","comment":"","display":"UDP Src Port","filter":"1~65535","name":"udpSrcPort","type":"int","value":"0"},{"access":"read-write","comment":"","display":"UDP Listen Port","filter":"0~65536","name":"udpListenPort","type":"int","value":"2152"},{"access":"read-write","comment":"","display":"UDS Local File Full Path","filter":"","name":"udsLocalFileFullPath","type":"string","value":""},{"access":"read-write","comment":"","display":"UDS Remote File Full Path","filter":"","name":"udsRemoteFileFullPath","type":"string","value":""},{"access":"read-write","comment":"","display":"Link Detection Type","filter":"0~1","name":"linkDetectionType","type":"int","value":"0"},{"access":"read-write","comment":"","display":"NAT Interface ID","filter":"0~1","name":"natInterfaceId","type":"int","value":"0"},{"access":"read-write","comment":"","display":"IPv4","filter":"","name":"ueIpv4","type":"string","value":"0.0.0.0"},{"access":"read-write","comment":"","display":"UE IPv4 Mask","filter":"","name":"ueIpv4Mask","type":"string","value":"255.255.255.0"},{"access":"read-write","comment":"","display":"UE IPv6","filter":"","name":"ueIpv6","type":"string","value":""},{"access":"read-write","comment":"","display":"UE IPv6 Prefix","filter":"1~128","name":"ueIpv6Prefix","type":"int","value":"64"},{"access":"read-write","array":[{"access":"read-only","comment":"1~32","display":"Index","filter":"1~32","name":"index","type":"int","value":"1"},{"access":"read-write","comment":"","display":"IPv4","filter":"","name":"ipv4","type":"string","value":"0.0.0.0"},{"access":"read-write","comment":"","display":"IPv4 Mask","filter":"","name":"ipv4Mask","type":"string","value":"0.0.0.0"}],"comment":"","display":"GTPU Remote IPv4 Pool List","filter":"1~32","name":"gtpuRemoteIpv4PoolList","type":"int","value":"1"},{"access":"read-write","array":[{"access":"read-only","comment":"1~32","display":"Index","filter":"1~32","name":"index","type":"int","value":"1"},{"access":"read-write","comment":"","display":"IPv6","filter":"","name":"ipv6","type":"string","value":""},{"access":"read-write","comment":"","display":"IPv6 Prefix","filter":"","name":"ipv6Prefix","type":"int","value":"64"}],"comment":"","display":"GTPU Remote IPv6 Pool List","filter":"0~32","name":"gtpuRemoteIpv6PoolList","type":"int","value":"1"},{"access":"read-write","comment":"","display":"GTPU Signaling Handle","filter":"0~1","name":"gtpuSignalingHandle","type":"int","value":"0"},{"access":"read-write","comment":"","display":"IMS Default DSCP Value","filter":"0~1","name":"imsDefaultDSCPValue","type":"int","value":"0"},{"access":"read-write","comment":"","display":"Data Default DSCP Value","filter":"0~1","name":"dataDefaultDSCPValue","type":"int","value":"0"},{"access":"read-write","comment":"","display":"Inner DSCP Value Map","filter":"0~1","name":"innerDSCPValueMap","type":"int","value":"0"},{"access":"read-write","comment":"","display":"Max Support Speed Mbps","filter":"0~65536","name":"maxSupportSpeedMbps","type":"int","value":"0"},{"access":"read-write","comment":"","display":"DPDK RX Queues Number","filter":"0~127","name":"dpdkRxQueuesNumber","type":"int","value":"0"},{"access":"read-write","comment":"","display":"DPDK TX Queues Number","filter":"0~127","name":"dpdkTxQueuesNumber","type":"int","value":"0"},{"access":"read-write","comment":"","display":"DPDK RX Desc Number","filter":"0~32768","name":"dpdkRxDescNumber","type":"int","value":"0"},{"access":"read-write","comment":"","display":"DPDK TX Desc Number","filter":"0~32768","name":"dpdkTxDescNumber","type":"int","value":"0"},{"access":"read-write","comment":"","display":"DPDK Workers","filter":"","name":"dpdkworkers","type":"string","value":""}]', 15, '', 1742469466536, 'public');
INSERT INTO "ne_config" VALUES (228, 'UPF', 'networkControlCommon', 'Network Control Common', 'list', '[{"access":"read-write","comment":"","display":"Local Switch Disabled","filter":"0~1","name":"localSwitchDisabled","type":"int","value":"0"},{"access":"read-write","comment":"","display":"Max TCP Sync Per Second","filter":"","name":"maxTCPSyncPerSecond","type":"int","value":"0"},{"access":"read-write","comment":"","display":"UPF Max Support Mbps","filter":"","name":"upfMaxSupportMbps","type":"int","value":"0"},{"access":"read-write","comment":"","display":"dscp Inner Mapping","filter":"","name":"dscpInnerMapping","type":"int","value":"0"}]', 17, '', 1742469466542, 'public');
INSERT INTO "ne_config" VALUES (229, 'UPF', 'networkControlDnnList', 'Network Control DNN List', 'array', '[{"access":"read-only","comment":"1~32","display":"Index","filter":"1~32","name":"index","type":"int","value":"1"},{"access":"read-write","comment":"","display":"DNN Name","filter":"","name":"dnnName","type":"string","value":""},{"access":"read-write","comment":"","display":"N3 Interface ID","filter":"0~32","name":"n3InterfaceId","type":"int","value":"0"},{"access":"read-write","comment":"","display":"N6 Interface ID","filter":"0~32","name":"n6InterfaceId","type":"int","value":"0"},{"access":"read-write","comment":"","display":"HTTP Proto Enabled","filter":"0~1","name":"httpProtoEnabled","type":"int","value":"0"},{"access":"read-write","comment":"","display":"HTTPS Proto Enabled","filter":"0~1","name":"httpsProtoEnabled","type":"int","value":"0"},{"access":"read-write","array":[{"access":"read-only","comment":"1~32","display":"Index","filter":"1~32","name":"index","type":"int","value":"1"},{"access":"read-write","comment":"","display":"Type","filter":"","name":"type","type":"int","value":"0"},{"access":"read-write","comment":"","display":"Name","filter":"","name":"name","type":"string","value":""},{"access":"read-write","comment":"","display":"Value","filter":"","name":"value","type":"string","value":""}],"comment":"","display":"Header Enrich Info List","filter":"0~32","name":"headerEnrichInfoList","type":"int","value":"1"},{"access":"read-write","comment":"","display":"Statistic Enabled","filter":"0~1","name":"statisticEnabled","type":"int","value":"0"},{"access":"read-write","comment":"","display":"Local Switch Check","filter":"0~1","name":"localSwitchCheck","type":"int","value":"0"},{"access":"read-write","comment":"","display":"QER Max Support Mbps","filter":"","name":"qerMaxSupportMbps","type":"int","value":"0"},{"access":"read-write","array":[{"access":"read-only","comment":"1~32","display":"Index","filter":"1~32","name":"index","type":"int","value":"1"},{"access":"read-write","comment":"","display":"IPv4","filter":"","name":"ipv4","type":"string","value":"0.0.0.0"},{"access":"read-write","comment":"","display":"IPv4 Mask","filter":"","name":"ipv4Mask","type":"string","value":"255.255.255.0"}],"comment":"","display":"UE IPv4 Pool List","filter":"0~32","name":"ueIpv4PoolList","type":"int","value":"1"},{"access":"read-write","array":[{"access":"read-only","comment":"1~32","display":"Index","filter":"1~32","name":"index","type":"int","value":"1"},{"access":"read-write","comment":"","display":"IPv6","filter":"","name":"ipv6","type":"string","value":""},{"access":"read-write","comment":"","display":"IPv6 Prefix","filter":"1~128","name":"ipv6Prefix","type":"int","value":"64"}],"comment":"","display":"UE IPv6 Pool List","filter":"0~32","name":"ueIpv6PoolList","type":"int","value":"1"},{"access":"read-write","array":[{"access":"read-only","comment":"1~32","display":"Index","filter":"1~32","name":"index","type":"int","value":"1"},{"access":"read-write","comment":"","display":"IPv4","filter":"","name":"ipv4","type":"string","value":"0.0.0.0"},{"access":"read-write","comment":"","display":"IPv4 Mask","filter":"","name":"ipv4Mask","type":"string","value":"255.255.255.0"}],"comment":"","display":"Dst Server IPv4 Pool List","filter":"0~32","name":"dstServerIpv4PoolList","type":"int","value":"1"},{"access":"read-write","array":[{"access":"read-only","comment":"1~32","display":"Index","filter":"1~32","name":"index","type":"int","value":"1"},{"access":"read-write","comment":"","display":"IPv6","filter":"","name":"ipv6","type":"string","value":""},{"access":"read-write","comment":"","display":"IPv6 Prefix","filter":"1~128","name":"ipv6Prefix","type":"int","value":"64"}],"comment":"","display":"Dst Server IPv6 Pool List","filter":"0~32","name":"dstServerIpv6PoolList","type":"int","value":"1"},{"access":"read-write","comment":"ipv4|ipv6|ipv4v6","display":"Gateway IP Type","filter":"","name":"gatewayIpType","type":"string","value":"ipv4"},{"access":"read-write","comment":"","display":"Gateway IPv4","filter":"","name":"gatewayIpv4","type":"string","value":"0.0.0.0"},{"access":"read-write","comment":"","display":"Gateway IPv6","filter":"","name":"gatewayIpv6","type":"string","value":""},{"access":"read-write","comment":"","display":"Secondary Gateway IPv4","filter":"","name":"secondaryGatewayIpv4","type":"string","value":"0.0.0.0"},{"access":"read-write","comment":"","display":"Secondary Gateway IPv6","filter":"","name":"secondaryGatewayIpv6","type":"string","value":""}]', 19, '', 1742469466545, 'public');
INSERT INTO "ne_config" VALUES (230, 'UPF', 'networkControlSnssaiList', 'Network Control SNSSAI List', 'array', '[{"access":"read-only","comment":"1~32","display":"Index","filter":"1~32","name":"index","type":"int","value":"1"},{"access":"read-write","comment":"","display":"SST","filter":"","name":"sst","type":"int","value":"1"},{"access":"read-write","comment":"","display":"SD","filter":"","name":"sd","type":"int","value":"1"},{"access":"read-write","comment":"","display":"N3 Interface ID","filter":"0~32","name":"n3InterfaceId","type":"int","value":"0"},{"access":"read-write","comment":"","display":"N6 Interface ID","filter":"0~32","name":"n6InterfaceId","type":"int","value":"0"},{"access":"read-write","comment":"","display":"QER Max Support Mbps","filter":"","name":"qerMaxSupportMbps","type":"int","value":"0"},{"access":"read-write","comment":"","display":"Statistic Enabled","filter":"0~1","name":"statisticEnabled","type":"int","value":"0"},{"access":"read-write","comment":"","display":"Vlan ID Min","filter":"","name":"vlanIdMin","type":"int","value":"0"},{"access":"read-write","comment":"","display":"Vlan ID Max","filter":"","name":"vlanIdMax","type":"int","value":"0"}]', 21, '', 1742469466549, 'public');
INSERT INTO "ne_config" VALUES (231, 'UPF', 'networkControlAclWhiteList', 'Network Control ACL White List', 'array', '[{"access":"read-only","comment":"1~32","display":"Index","filter":"1~32","name":"index","type":"int","value":"1"},{"access":"read-write","comment":"","display":"UE IPv4","filter":"","name":"ueIpv4","type":"string","value":"0.0.0.0"},{"access":"read-write","comment":"","display":"UE IPv4 Mask","filter":"","name":"ueIpv4Mask","type":"string","value":"255.255.255.0"},{"access":"read-write","comment":"","display":"UE IPv6","filter":"","name":"ueIpv6","type":"string","value":""},{"access":"read-write","comment":"","display":"UE IPv6 Prefix","filter":"1~128","name":"ueIpv6Prefix","type":"int","value":"64"},{"access":"read-write","comment":"","display":"Dst Server IPv4","filter":"","name":"dstServerIpv4","type":"string","value":"0.0.0.0"},{"access":"read-write","comment":"","display":"Dst Server IPv4 Mask","filter":"","name":"dstServerIpv4Mask","type":"string","value":"255.255.255.0"},{"access":"read-write","comment":"","display":"Dst Server IPv6","filter":"","name":"dstServerIpv6","type":"string","value":""},{"access":"read-write","comment":"","display":"Dst Server IPv6 Prefix","filter":"1~128","name":"dstServerIpv6Prefix","type":"int","value":"64"}]', 23, '', 1742469466554, 'public');
INSERT INTO "ne_config" VALUES (232, 'UPF', 'networkControlAclBlackList', 'Network Control ACL Black List', 'array', '[{"access":"read-only","comment":"1~32","display":"Index","filter":"1~32","name":"index","type":"int","value":"1"},{"access":"read-write","comment":"","display":"UE IPv4","filter":"","name":"ueIpv4","type":"string","value":"0.0.0.0"},{"access":"read-write","comment":"","display":"UE IPv4 Mask","filter":"","name":"ueIpv4Mask","type":"string","value":"255.255.255.0"},{"access":"read-write","comment":"","display":"UE IPv6","filter":"","name":"ueIpv6","type":"string","value":""},{"access":"read-write","comment":"","display":"UE IPv6 Prefix","filter":"1~128","name":"ueIpv6Prefix","type":"int","value":"64"},{"access":"read-write","comment":"","display":"Dst Server IPv4","filter":"","name":"dstServerIpv4","type":"string","value":"0.0.0.0"},{"access":"read-write","comment":"","display":"Dst Server IPv4 Mask","filter":"","name":"dstServerIpv4Mask","type":"string","value":"255.255.255.0"},{"access":"read-write","comment":"","display":"Dst Server IPv6","filter":"","name":"dstServerIpv6","type":"string","value":""},{"access":"read-write","comment":"","display":"Dst Server IPv6 Prefix","filter":"1~128","name":"dstServerIpv6Prefix","type":"int","value":"64"}]', 25, '', 1742469466558, 'public');
INSERT INTO "ne_config" VALUES (233, 'UPF', 'networkControlDnsServerList', 'Network Control DNS Server List', 'array', '[{"access":"read-only","comment":"1~32","display":"Index","filter":"1~32","name":"index","type":"int","value":"1"},{"access":"read-write","comment":"0~1","display":"Enabled","filter":"0~1","name":"enabled","type":"int","value":"0"},{"access":"read-write","comment":"","display":"DNS Name","filter":"","name":"dnsName","type":"string","value":""},{"access":"read-write","comment":"","display":"Server IPv4","filter":"","name":"serverIpv4","type":"string","value":"0.0.0.0"},{"access":"read-write","comment":"","display":"Server IPv6","filter":"","name":"serverIpv6","type":"string","value":""}]', 29, '', 1742469466567, 'public');
INSERT INTO "ne_config" VALUES (234, 'UPF', 'dpiCommon', 'DPI Common', 'list', '[{"access":"read-write","comment":"","display":"Max Detect Packet Num","filter":"","name":"maxDetectPacketNum","type":"int","value":"20"},{"access":"read-write","comment":"","display":"HTTP Proto Enabled","filter":"0~1","name":"httpProtoEnabled","type":"int","value":"0"},{"access":"read-write","comment":"","display":"HTTPS Proto Enabled","filter":"0~1","name":"httpsProtoEnabled","type":"int","value":"0"}]', 31, '', 1742469466572, 'public');
INSERT INTO "ne_config" VALUES (235, 'UPF', 'dpiHeaderEnrichInfoList', 'DPI Header Enrich Info List', 'array', '[{"access":"read-only","comment":"1~32","display":"Index","filter":"1~32","name":"index","type":"int","value":"1"},{"access":"read-write","comment":"","display":"Type","filter":"","name":"type","type":"int","value":"0"},{"access":"read-write","comment":"","display":"Name","filter":"","name":"name","type":"string","value":""},{"access":"read-write","comment":"","display":"Value","filter":"","name":"value","type":"string","value":""}]', 33, '', 1742469466576, 'public');
INSERT INTO "ne_config" VALUES (236, 'UPF', 'dpiAppList', 'DPI APP List', 'array', '[{"access":"read-write","comment":"1~32","display":"Index","filter":"1~32","name":"index","type":"int","value":"1"},{"access":"read-write","comment":"","display":"APP Name","filter":"","name":"appName","type":"string","value":""},{"access":"read-write","comment":"","display":"Proxy Enabled","filter":"0~1","name":"proxyEnabled","type":"int","value":"0"},{"access":"read-write","comment":"","display":"Force Check Type","filter":"0~1","name":"forceCheckType","type":"int","value":"0"},{"access":"read-write","comment":"","display":"N3 Interface ID","filter":"0~32","name":"n3InterfaceId","type":"int","value":"0"},{"access":"read-write","comment":"","display":"N6 Interface ID","filter":"0~32","name":"n6InterfaceId","type":"int","value":"0"},{"access":"read-write","array":[{"access":"read-only","comment":"1~32","display":"Index","filter":"1~32","name":"index","type":"int","value":"1"},{"access":"read-write","comment":"","display":"Rule ID","filter":"","name":"ruleId","type":"int","value":""},{"access":"read-write","comment":"","display":"REGEX Match","filter":"","name":"regexMatch","type":"string","value":""},{"access":"read-write","comment":"","display":"Flow Description","filter":"","name":"flowDescription","type":"string","value":""},{"access":"read-write","comment":"","display":"Custom Name","filter":"","name":"customName","type":"string","value":""}],"comment":"","display":"Rule List","filter":"0~32","name":"ruleList","type":"int","value":"1"}]', 35, '', 1742469466580, 'public');
INSERT INTO "ne_config" VALUES (237, 'UPF', 'networkControlFreeServerList', 'Free Server List', 'array', '[{"access":"read-write","comment":"1~32","display":"Index","filter":"1~32","name":"index","type":"int","value":"1"},{"access":"read-write","comment":"","display":"Enabled","filter":"0~1","name":"enabled","type":"int","value":"0"},{"access":"read-write","array":[{"access":"read-only","comment":"1~32","display":"Index","filter":"1~32","name":"index","type":"int","value":"1"},{"access":"read-write","comment":"","display":"Server IPv4","filter":"","name":"serverIpv4","type":"string","value":"0.0.0.0"},{"access":"read-write","comment":"","display":"Server IPv4 Mask","filter":"","name":"serverIpv4Mask","type":"string","value":"255.255.255.0"},{"access":"read-write","comment":"","display":"Server IPv6","filter":"","name":"serverIpv6","type":"string","value":""},{"access":"read-write","comment":"","display":"Server IPv6 Prefix","filter":"","name":"serverIpv6Prefix","type":"int","value":"64"}],"comment":"","display":"Free Server Address List","filter":"0~32","name":"freeServerAddrList","type":"int","value":"1"}]', 27, '', 1742469466563, 'public');

PRAGMA foreign_keys = true;