-- ----------------------------
-- Configuration
-- ----------------------------

-- 启用完整的自动空间回收
PRAGMA auto_vacuum = FULL;
-- 日志模式设置为 WAL 并发写入
PRAGMA journal_mode = WAL;
PRAGMA synchronous = NORMAL;
