SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

--
-- Table structure for table `ne_info`
--


CREATE TABLE IF NOT EXISTS `ne_info` (
  `id` int NOT NULL AUTO_INCREMENT,
  `ne_type` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
  `ne_id` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL DEFAULT '',
  `rm_uid` varchar(40) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '',
  `ne_name` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '',
  `ip` varchar(128) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '',
  `port` int DEFAULT '0' COMMENT '端口',
  `pv_flag` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT 'PNF' COMMENT '''PNF'',''VNF''',
  `province` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '-' COMMENT '省份地域',
  `vendor_name` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '-',
  `dn` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '',
  `ne_address` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'MAC地址',
  `host_ids` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '网元主机ID组 数据格式(ssh,telnet)-来自ne_host表',
  `status` int DEFAULT '0' COMMENT '0离线 1在线 2配置待下发 3备用模式',
  `remark` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '备注',
  `create_by` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '创建者',
  `create_time` bigint DEFAULT '0' COMMENT '创建时间',
  `update_by` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '更新者',
  `update_time` bigint DEFAULT '0' COMMENT '更新时间',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE KEY `ux_netype_neid` (`ne_type`,`ne_id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci COMMENT='网元信息表 对应一个网元版本、网元授权、网元主机';

-- 初始网元数据
INSERT IGNORE INTO `ne_info` VALUES (1, 'OMC', '001', '4400PSAPOMC001', 'PSAP门户管理中心', '172.16.5.100', 33030, 'PNF', '-', '-', '-', '-', '1,2', 0, '', '', 0, '', 0);

SET FOREIGN_KEY_CHECKS=1;
