/*
 Navicat Premium Data Transfer

 Source Server         : local_mariadb
 Source Server Type    : MariaDB
 Source Server Version : 100338 (10.3.38-MariaDB)
 Source Host           : localhost:33066
 Source Schema         : omc_db

 Target Server Type    : MariaDB
 Target Server Version : 100338 (10.3.38-MariaDB)
 File Encoding         : 65001

 Date: 30/07/2023 02:46:28
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for mml_command
-- ----------------------------
DROP TABLE IF EXISTS `mml_command`;
CREATE TABLE `mml_command`  (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `ne_type` varchar(16) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `category` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `cat_display` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `operation` varchar(10) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `object` varchar(16) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `mml_display` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `param_json` longtext CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT NULL,
  PRIMARY KEY (`id`) USING BTREE,
  INDEX `id`(`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 523 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of mml_command
-- ----------------------------
INSERT INTO `mml_command` VALUES (518, 'EMS', 'neManagement', 'Network Element Management', 'dsp', 'neInfo', 'Display Network Element Information', '[{\"alias\":\"ne_type\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Network Element Type\",\"filter\":\"\",\"name\":\"neType\",\"optional\":\"false\",\"type\":\"string\"},{\"alias\":\"ne_id\",\"comment\":\"\",\"display\":\"Network Element ID\",\"filter\":\"\",\"name\":\"neId\",\"optional\":\"false\",\"type\":\"string\"},{\"alias\":\"rm_uid\",\"comment\":\"\",\"display\":\"Resource Management Universal Identifier\",\"filter\":\"\",\"name\":\"RmUID\",\"optional\":\"true\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Phisical/Virtual Flag\",\"filter\":\"\",\"name\":\"pvFlag\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Status\",\"filter\":\"\",\"name\":\"status\",\"optional\":\"false\",\"type\":\"string\"}]');
INSERT INTO `mml_command` VALUES (519, 'EMS', 'neManagement', 'Network Element Management', 'add', 'neInfo', 'Add Network Element', '[{\"comment\":\"\",\"display\":\"NE Type\",\"filter\":\"\",\"name\":\"neType\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"NE ID\",\"filter\":\"\",\"name\":\"neId\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Phisical/Virtual Flag\",\"filter\":\"\",\"name\":\"pvFlag\",\"optional\":\"false\",\"type\":\"string\"}]');
INSERT INTO `mml_command` VALUES (520, 'EMS', 'neManagement', 'Network Element Management', 'mod', 'neInfo', 'Modify Network Element', '[{\"comment\":\"\",\"display\":\"NE Type\",\"filter\":\"\",\"name\":\"neType\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"NE ID\",\"filter\":\"\",\"name\":\"neId\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Phisical/Virtual Flag\",\"filter\":\"\",\"name\":\"pvFlag\",\"optional\":\"false\",\"type\":\"string\"}]');
INSERT INTO `mml_command` VALUES (521, 'EMS', 'neManagement', 'Network Element Management', 'del', 'neInfo', 'Delete Network Element', '[{\"comment\":\"\",\"display\":\"NE Type\",\"filter\":\"\",\"name\":\"neType\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"NE ID\",\"filter\":\"\",\"name\":\"neId\",\"optional\":\"false\",\"type\":\"string\"}]');
INSERT INTO `mml_command` VALUES (522, 'EMS', 'faultManagement', 'Fault Management', 'dsp', 'alarms', 'Display Alarms Information', '[{\"comment\":\"\",\"display\":\"NE Type\",\"filter\":\"\",\"name\":\"neType\",\"optional\":\"false\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"NE ID\",\"filter\":\"\",\"name\":\"neId\",\"optional\":\"true\",\"type\":\"string\"},{\"comment\":\"\",\"display\":\"Alarm Code\",\"filter\":\"\",\"name\":\"alarmCode\",\"optional\":\"true\",\"type\":\"int\"},{\"comment\":\"\",\"display\":\"Original Severity\",\"filter\":\"{\\\"Critical\\\",\\\"Major\\\",\\\"Minor\\\",\\\"Warning\\\",\\\"Event\\\"}\",\"name\":\"origSeverity\",\"optional\":\"true\",\"type\":\"enum\"},{\"comment\":\"\",\"display\":\"Alarm Event Start Time\",\"filter\":\"\",\"name\":\"startTime\",\"optional\":\"true\",\"type\":\"string\"}]');

SET FOREIGN_KEY_CHECKS = 1;
