/*
 Navicat Premium Data Transfer

 Source Server         : local_mariadb
 Source Server Type    : MariaDB
 Source Server Version : 100338 (10.3.38-MariaDB)
 Source Host           : localhost:33066
 Source Schema         : omc_db

 Target Server Type    : MariaDB
 Target Server Version : 100338 (10.3.38-MariaDB)
 File Encoding         : 65001

 Date: 21/06/2023 20:52:49
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for user_menu
-- ----------------------------
DROP TABLE IF EXISTS `user_menu`;
CREATE TABLE `user_menu`  (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `user_id` int(11) NULL DEFAULT NULL,
  `menu_tag` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '',
  `sort_id` int(11) NULL DEFAULT NULL,
  `lang_tag` varchar(16) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `menu_json` longtext CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT NULL,
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 15 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of user_menu
-- ----------------------------
INSERT INTO `user_menu` VALUES (1, 3, 'topologyManagement', 1, 'cn', '{\r\n	\"id\": 1,\r\n	\"href\": null,\r\n	\"icon\": \"fa fa-home\",\r\n	\"child\": [{\r\n		\"id\": 3,\r\n		\"href\": \"page/main.html\",\r\n		\"icon\": \"fa fa-caret-right\",\r\n		\"child\": null,\r\n		\"title\": \"网元状态\",\r\n		\"target\": null,\r\n		\"parentId\": 1\r\n	}],\r\n	\"title\": \"系统状态\",\r\n	\"target\": null,\r\n	\"parentId\": 0\r\n}');
INSERT INTO `user_menu` VALUES (2, 3, 'faultManagement', 2, 'cn', '{\r\n	\"id\": 1,\r\n	\"href\": \"\",\r\n	\"icon\": \"fa fa-wrench\",\r\n	\"child\": [{\r\n		\"id\": 2,\r\n		\"href\": \"page/alarm/alarmListDown.html\",\r\n		\"icon\": \"fa fa-caret-right\",\r\n		\"child\": null,\r\n		\"title\": \"活动告警\",\r\n		\"target\": null,\r\n		\"parentId\": 1\r\n	}, {\r\n		\"id\": 3,\r\n		\"href\": \"page/alarm/AlarmListHistory.html\",\r\n		\"icon\": \"fa fa-caret-right\",\r\n		\"child\": null,\r\n		\"title\": \"历史告警\",\r\n		\"target\": null,\r\n		\"parentId\": 1\r\n	}, {\r\n		\"id\": 4,\r\n		\"href\": \"page/alarm/alarmInfoConfig.html\",\r\n		\"icon\": \"fa fa-caret-right\",\r\n		\"child\": null,\r\n		\"title\": \"告警设置\",\r\n		\"target\": null,\r\n		\"parentId\": 1\r\n	}],\r\n	\"title\": \"故障管理\",\r\n	\"target\": null,\r\n	\"parentId\": 0\r\n}');
INSERT INTO `user_menu` VALUES (3, 3, 'systemManagement', 3, 'cn', '{\r\n	\"id\": 1,\r\n	\"href\": null,\r\n	\"icon\": \"fa fa-pencil-square-o\",\r\n	\"child\": [{\r\n		\"id\": 2,\r\n		\"href\": \"page/nfManage/list.html\",\r\n		\"icon\": \"fa fa-caret-right\",\r\n		\"child\": null,\r\n		\"title\": \"网元管理\",\r\n		\"target\": null,\r\n		\"parentId\": 1\r\n	}, {\r\n		\"id\": 3,\r\n		\"href\": \"dormitoryset/list.html\",\r\n		\"icon\": \"fa fa-caret-right\",\r\n		\"child\": null,\r\n		\"title\": \"参数配置\",\r\n		\"target\": null,\r\n		\"parentId\": 1\r\n	}, ],\r\n	\"title\": \"配置管理\",\r\n	\"target\": null,\r\n	\"parentId\": 0\r\n}');
INSERT INTO `user_menu` VALUES (4, 3, 'performanceManagement', 4, 'cn', '{\r\n	\"id\": 1,\r\n	\"href\": null,\r\n	\"icon\": \"fa fa-line-chart\",\r\n	\"child\": [{\r\n		\"id\": 1,\r\n		\"href\": \"page/task/list.html\",\r\n		\"icon\": \"fa fa-caret-right\",\r\n		\"child\": null,\r\n		\"title\": \"任务管理\",\r\n		\"target\": null,\r\n		\"parentId\": 1\r\n	}, {\r\n		\"id\": 2,\r\n		\"href\": \"page/repair/list.html\",\r\n		\"icon\": \"fa fa-caret-right\",\r\n		\"child\": null,\r\n		\"title\": \"数据管理\",\r\n		\"target\": null,\r\n		\"parentId\": 1\r\n	}, {\r\n		\"id\": 4,\r\n		\"href\": \"page/task/threshold.html\",\r\n		\"icon\": \"fa fa-caret-right\",\r\n		\"child\": null,\r\n		\"title\": \"性能门限\",\r\n		\"target\": null,\r\n		\"parentId\": 1\r\n	}],\r\n	\"title\": \"性能管理\",\r\n	\"target\": null,\r\n	\"parentId\": 0\r\n}');
INSERT INTO `user_menu` VALUES (5, 3, 'operationMaintenance', 5, 'cn', '{\r\n    \"id\": 1,\r\n    \"title\": \"操作维护\",\r\n    \"icon\": \"fa fa-gear\",\r\n    \"href\": null,\r\n    \"target\": null,\r\n    \"parentId\": 0,\r\n    \"child\": [\r\n     \r\n        {\r\n            \"id\": 2,\r\n            \"title\": \"MML命令\",\r\n            \"icon\": \"fa fa-caret-right\",\r\n            \"href\": \"page/mml/list.html\",\r\n            \"target\": null,\r\n            \"parentId\": 1,\r\n            \"child\": null\r\n        }\r\n    ]\r\n}');
INSERT INTO `user_menu` VALUES (6, 3, 'logManagement', 6, 'cn', '{\r\n	\"id\": 1,\r\n	\"href\": null,\r\n	\"icon\": \"fa fa-newspaper-o\",\r\n	\"child\": [{\r\n		\"id\": 2,\r\n		\"href\": \"page/log/operLogList.html\",\r\n		\"icon\": \"fa fa-caret-right\",\r\n		\"child\": null,\r\n		\"title\": \"操作日志\",\r\n		\"target\": null,\r\n		\"parentId\": 1\r\n	}, {\r\n		\"id\": 4,\r\n		\"href\": \"page/log/alarmLogList.html\",\r\n		\"icon\": \"fa fa-caret-right\",\r\n		\"child\": null,\r\n		\"title\": \"告警日志\",\r\n		\"target\": null,\r\n		\"parentId\": 1\r\n	}, {\r\n		\"id\": 5,\r\n		\"href\": \"page/log/logSet.html\",\r\n		\"icon\": \"fa fa-caret-right\",\r\n		\"child\": null,\r\n		\"title\": \"日志设置\",\r\n		\"target\": null,\r\n		\"parentId\": 1\r\n	}],\r\n	\"title\": \"日志管理\",\r\n	\"target\": null,\r\n	\"parentId\": 0\r\n\r\n}');
INSERT INTO `user_menu` VALUES (7, 3, 'securityManagement', 7, 'cn', '{\r\n    \"id\": 1,\r\n    \"href\": null,\r\n    \"icon\": \"fa fa-users\",\r\n    \"child\": [\r\n        {\r\n            \"id\": 2,\r\n            \"href\": \"page/user/list.html\",\r\n            \"icon\": \"fa fa-caret-right\",\r\n            \"child\": null,\r\n            \"title\": \"用户管理\",\r\n            \"target\": null,\r\n            \"parentId\": 1\r\n        }\r\n    ],\r\n    \"title\": \"安全管理\",\r\n    \"target\": null,\r\n    \"parentId\": 0\r\n}');
INSERT INTO `user_menu` VALUES (8, 1, 'topologyManagement', 1, 'cn', '\r\n{\r\n	\"id\": 1,\r\n	\"href\": null,\r\n	\"icon\": \"fa fa-cog\",\r\n	\"child\": [ {\r\n		\"id\": 3,\r\n		\"href\": \"grade/list.html\",\r\n		\"icon\": \"fa fa-caret-right\",\r\n		\"child\": null,\r\n		\"title\": \"网元状态\",\r\n		\"target\": null,\r\n		\"parentId\": 1\r\n	}],\r\n	\"title\": \"系统状态\",\r\n	\"target\": null,\r\n	\"parentId\": 0\r\n}');
INSERT INTO `user_menu` VALUES (9, 1, 'faultManagement', 2, 'cn', '{\"id\": 1, \"href\": \"\", \"icon\": \"fa fa-telegram\", \"child\": [{\"id\": 2, \"href\": \"page/alarm/alarmListDown.html\", \"icon\": \"fa fa-caret-right\", \"child\": null, \"title\": \"活动告警\", \"target\": null, \"parentId\": 1}, {\"id\": 3, \"href\": \"page/alarm/AlarmListHistory.html\", \"icon\": \"fa fa-caret-right\", \"child\": null, \"title\": \"历史告警\", \"target\": null, \"parentId\": 1}, {\"id\": 4, \"href\": \"page/alarm/alarmInfoConfig.html\", \"icon\": \"fa fa-caret-right\", \"child\": null, \"title\": \"告警设置\", \"target\": null, \"parentId\": 1}], \"title\": \"故障管理\", \"target\": null, \"parentId\": 0}');
INSERT INTO `user_menu` VALUES (10, 1, 'systemManagement', 3, 'cn', '{\r\n	\"id\": 1,\r\n	\"href\": null,\r\n	\"icon\": \"fa fa-home\",\r\n	\"child\": [{\r\n		\"id\": 2,\r\n		\"href\": \"page/nfManage/list.html\",\r\n		\"icon\": \"fa fa-caret-right\",\r\n		\"child\": null,\r\n		\"title\": \"网元管理\",\r\n		\"target\": null,\r\n		\"parentId\": 1\r\n	}, {\r\n		\"id\": 3,\r\n		\"href\": \"dormitoryset/list.html\",\r\n		\"icon\": \"fa fa-caret-right\",\r\n		\"child\": null,\r\n		\"title\": \"参数配置\",\r\n		\"target\": null,\r\n		\"parentId\": 1\r\n	},],\r\n	\"title\": \"配置管理\",\r\n	\"target\": null,\r\n	\"parentId\": 0\r\n}');
INSERT INTO `user_menu` VALUES (11, 1, 'performanceManagement', 4, 'cn', '{\r\n	\"id\": 1,\r\n	\"href\": null,\r\n	\"icon\": \"fa fa-wrench\",\r\n	\"child\": [{\r\n		\"id\": 1,\r\n		\"href\": \"page/task/list.html\",\r\n		\"icon\": \"fa fa-caret-right\",\r\n		\"child\": null,\r\n		\"title\": \"任务管理\",\r\n		\"target\": null,\r\n		\"parentId\": 1\r\n	}, {\r\n		\"id\": 2,\r\n		\"href\": \"page/repair/list.html\",\r\n		\"icon\": \"fa fa-caret-right\",\r\n		\"child\": null,\r\n		\"title\": \"数据管理\",\r\n		\"target\": null,\r\n		\"parentId\": 1\r\n	}, {\r\n		\"id\": 3,\r\n		\"href\": \"page/gold/list.html\",\r\n		\"icon\": \"fa fa-caret-right\",\r\n		\"child\": null,\r\n		\"title\": \"黄金指标\",\r\n		\"target\": null,\r\n		\"parentId\": 1\r\n	}, {\r\n		\"id\": 4,\r\n		\"href\": \"page/task/threshold.html\",\r\n		\"icon\": \"fa fa-caret-right\",\r\n		\"child\": null,\r\n		\"title\": \"性能门限设置\",\r\n		\"target\": null,\r\n		\"parentId\": 1\r\n	}],\r\n	\"title\": \"性能管理\",\r\n	\"target\": null,\r\n	\"parentId\": 0\r\n}');
INSERT INTO `user_menu` VALUES (12, 1, 'logManagement', 5, 'cn', '{\r\n	\"id\": 1,\r\n	\"href\": null,\r\n	\"icon\": \"fa fa-home\",\r\n	\"child\": [{\r\n		\"id\": 2,\r\n		\"href\": \"page/log/operLogList.html\",\r\n		\"icon\": \"fa fa-caret-right\",\r\n		\"child\": null,\r\n		\"title\": \"操作日志\",\r\n		\"target\": null,\r\n		\"parentId\": 1\r\n	},  {\r\n		\"id\": 4,\r\n		\"href\": \"page/log/alarmLogList.html\",\r\n		\"icon\": \"fa fa-caret-right\",\r\n		\"child\": null,\r\n		\"title\": \"告警日志\",\r\n		\"target\": null,\r\n		\"parentId\": 1\r\n	}, {\r\n		\"id\": 5,\r\n		\"href\": \"page/log/logSet.html\",\r\n		\"icon\": \"fa fa-caret-right\",\r\n		\"child\": null,\r\n		\"title\": \"日志设置\",\r\n		\"target\": null,\r\n		\"parentId\": 1\r\n	}],\r\n	\"title\": \"日志管理\",\r\n	\"target\": null,\r\n	\"parentId\": 0\r\n}');
INSERT INTO `user_menu` VALUES (13, 1, 'traceManagement', 6, 'cn', '{\r\n	\"id\": 1,\r\n	\"href\": null,\r\n	\"icon\": \"fa fa-home\",\r\n	\"child\": [{\r\n		\"id\": 2,\r\n		\"href\": \"building/list.html\",\r\n		\"icon\": \"fa fa-caret-right\",\r\n		\"child\": null,\r\n		\"title\": \"任务管理\",\r\n		\"target\": null,\r\n		\"parentId\": 1\r\n	}, {\r\n		\"id\": 3,\r\n		\"href\": \"page/mml/list.html\",\r\n		\"icon\": \"fa fa-caret-right\",\r\n		\"child\": null,\r\n		\"title\": \"信令分析\",\r\n		\"target\": null,\r\n		\"parentId\": 1\r\n	}],\r\n	\"title\": \"跟踪管理\",\r\n	\"target\": null,\r\n	\"parentId\": 0\r\n}');
INSERT INTO `user_menu` VALUES (14, 1, 'securityManagement', 7, 'cn', '{\r\n    \"id\": 1,\r\n    \"href\": null,\r\n    \"icon\": \"fa fa-users\",\r\n    \"child\": [\r\n        {\r\n            \"id\": 2,\r\n            \"href\": \"page/user/list.html\",\r\n            \"icon\": \"fa fa-caret-right\",\r\n            \"child\": null,\r\n            \"title\": \"用户管理\",\r\n            \"target\": null,\r\n            \"parentId\": 1\r\n        }\r\n    ],\r\n    \"title\": \"安全管理\",\r\n    \"target\": null,\r\n    \"parentId\": 0\r\n}');

SET FOREIGN_KEY_CHECKS = 1;
