SET FOREIGN_KEY_CHECKS=0;

INSERT IGNORE INTO `omc_db`.`user` (`id`,`account_id`, `name`, `real_name`, `sn`, `gender`, `email`, `id_card_number`, `description`, `telephone_number`, `phone`, `mobile`, `employee_number`, `employee_type`, `organize`, `supporter_corp_name`, `start_time`, `end_time`, `password`, `password_sha512`, `change_password_flag`, `password_expiration`, `status`, `user_expiration`, `group_name`, `profile`) VALUES (1, 'admin', 'admin', 'administrator', '', '', 'admin@aa.com', NULL, NULL, NULL, '312', NULL, NULL, NULL, NULL, NULL, NULL, NULL, '$2a$10$QgIcp6yuOEGrEU0TNU12K.uQRLbcufesEU7hiRYlRSSdUO7OAkoTq', '324584ab0b03a5af1899c1801485de8a455a114d5f6ee08a48dbdf7e8f1a047eaaa1789e881f9eb268113f6c6814fa20f43183ffa6e014765f2aa8733c526048', 0000, NULL, 'Active', NULL, 'admin', '{\"color\":{\"critical\":\"#e8994a\",\"event\":\"#c5d2dc\",\"major\":\"#494040\",\"minor\":\"#5f70a8\",\"sound\":\"custom\",\"warning\":\"#b9e1dd\"},\"sound\":\"custom\",\"custom\":\"hrxz.com-exz2s3uxhc47391.mp3\"}');

-- add default ne info
INSERT IGNORE INTO `omc_db`.`ne_info` (`id`, `ne_type`, `ne_id`, `rm_uid`, `ne_name`, `ip`, `port`, `pv_flag`, `province`, `vendor_name`, `dn`, `ne_address`, `status`) VALUES (1, 'OMC', '001', '4400HX101', 'OMC_001', '172.16.5.100', 3030, 'PNF', '-', 'AGrandTech', '-', '-', 0);
INSERT IGNORE INTO `omc_db`.`ne_info` (`id`, `ne_type`, `ne_id`, `rm_uid`, `ne_name`, `ip`, `port`, `pv_flag`, `province`, `vendor_name`, `dn`, `ne_address`, `status`) VALUES (2, 'IMS', '001', '4400HX1IMS001', 'IMS_001', '172.16.5.110', 3030, 'PNF', '-', 'AGrandTech', '-', '-', 0);
INSERT IGNORE INTO `omc_db`.`ne_info` (`id`, `ne_type`, `ne_id`, `rm_uid`, `ne_name`, `ip`, `port`, `pv_flag`, `province`, `vendor_name`, `dn`, `ne_address`, `status`) VALUES (3, 'AMF', '001', '4400HX1AMF001', 'AMF_001', '172.16.5.120', 3030, 'PNF', '-', 'AGrandTech', '-', '-', 0);
INSERT IGNORE INTO `omc_db`.`ne_info` (`id`, `ne_type`, `ne_id`, `rm_uid`, `ne_name`, `ip`, `port`, `pv_flag`, `province`, `vendor_name`, `dn`, `ne_address`, `status`) VALUES (4, 'AUSF', '001', '4400HX1AUF001', 'AUSF_001', '172.16.5.130', 3030, 'PNF', '-', 'AGrandTech', '-', '-', 0);
INSERT IGNORE INTO `omc_db`.`ne_info` (`id`, `ne_type`, `ne_id`, `rm_uid`, `ne_name`, `ip`, `port`, `pv_flag`, `province`, `vendor_name`, `dn`, `ne_address`, `status`) VALUES (5, 'UDM', '001', '4400HX1UDM001', 'UDM_001', '172.16.5.140', 3030, 'PNF', '-', 'AGrandTech', '-', '-', 0);
INSERT IGNORE INTO `omc_db`.`ne_info` (`id`, `ne_type`, `ne_id`, `rm_uid`, `ne_name`, `ip`, `port`, `pv_flag`, `province`, `vendor_name`, `dn`, `ne_address`, `status`) VALUES (6, 'SMF', '001', '4400HX1SMF001', 'SMF_001', '172.16.5.150', 3030, 'PNF', '-', 'AGrandTech', '-', '-', 0);
INSERT IGNORE INTO `omc_db`.`ne_info` (`id`, `ne_type`, `ne_id`, `rm_uid`, `ne_name`, `ip`, `port`, `pv_flag`, `province`, `vendor_name`, `dn`, `ne_address`, `status`) VALUES (7, 'PCF', '001', '4400HX1PCF001', 'PCF_001', '172.16.5.160', 3030, 'PNF', '-', 'AGrandTech', '-', '-', 0);
INSERT IGNORE INTO `omc_db`.`ne_info` (`id`, `ne_type`, `ne_id`, `rm_uid`, `ne_name`, `ip`, `port`, `pv_flag`, `province`, `vendor_name`, `dn`, `ne_address`, `status`) VALUES (8, 'NSSF', '001', '4400HX1NSF001', 'NSSF_001', '172.16.5.170', 3030, 'PNF', '-', 'AGrandTech', '-', '-', 0);
INSERT IGNORE INTO `omc_db`.`ne_info` (`id`, `ne_type`, `ne_id`, `rm_uid`, `ne_name`, `ip`, `port`, `pv_flag`, `province`, `vendor_name`, `dn`, `ne_address`, `status`) VALUES (9, 'NRF', '001', '4400HX1NRF001', 'NRF_001', '172.16.5.180', 3030, 'PNF', '-', 'AGrandTech', '-', '-', 0);
INSERT IGNORE INTO `omc_db`.`ne_info` (`id`, `ne_type`, `ne_id`, `rm_uid`, `ne_name`, `ip`, `port`, `pv_flag`, `province`, `vendor_name`, `dn`, `ne_address`, `status`) VALUES (10, 'UPF', '001', '4400HX1UPF001', 'UPF_001', '172.16.5.190', 3030, 'PNF', '-', 'AGrandTech', '-', '-', 0);
INSERT
    IGNORE INTO `omc_db`.`ne_info` (
        `id`,
        `ne_type`,
        `ne_id`,
        `rm_uid`,
        `ne_name`,
        `ip`,
        `port`,
        `pv_flag`,
        `province`,
        `vendor_name`,
        `dn`,
        `ne_address`,
        `status`
    )
VALUES (
        11,
        'LMF',
        '001',
        '4400HX1LMF001',
        'LMF_001',
        '172.16.5.200',
        3030,
        'PNF',
        '-',
        'AGrandTech',
        '-',
        '-',
        0
    );

INSERT
    IGNORE INTO `omc_db`.`ne_info` (
        `id`,
        `ne_type`,
        `ne_id`,
        `rm_uid`,
        `ne_name`,
        `ip`,
        `port`,
        `pv_flag`,
        `province`,
        `vendor_name`,
        `dn`,
        `ne_address`,
        `status`
    )
VALUES (
        12,
        'NEF',
        '001',
        '4400HX1NEF001',
        'NEF_001',
        '172.16.5.210',
        3030,
        'PNF',
        '-',
        'AGrandTech',
        '-',
        '-',
        0
    );

INSERT
    IGNORE INTO `omc_db`.`ne_info` (
        `id`,
        `ne_type`,
        `ne_id`,
        `rm_uid`,
        `ne_name`,
        `ip`,
        `port`,
        `pv_flag`,
        `province`,
        `vendor_name`,
        `dn`,
        `ne_address`,
        `status`
    )
VALUES (
        13,
        'MME',
        '001',
        '4400HX1MME001',
        'MME_001',
        '172.16.5.220',
        3030,
        'PNF',
        '-',
        'AGrandTech',
        '-',
        '-',
        0
    );

INSERT
    IGNORE INTO `omc_db`.`ne_info` (
        `id`,
        `ne_type`,
        `ne_id`,
        `rm_uid`,
        `ne_name`,
        `ip`,
        `port`,
        `pv_flag`,
        `province`,
        `vendor_name`,
        `dn`,
        `ne_address`,
        `status`
    )
VALUES (
        14,
        'N3IWF',
        '001',
        '4400HX1IWF001',
        'N3IWF_001',
        '172.16.5.230',
        3030,
        'PNF',
        '-',
        'AGrandTech',
        '-',
        '-',
        0
    );

SET FOREIGN_KEY_CHECKS = 1;