SET FOREIGN_KEY_CHECKS=0;

INSERT IGNORE INTO
    `omc_db`.`sys_user_role` (`user_id`, `role_id`)
VALUES (1, 1);

INSERT IGNORE INTO
    `omc_db`.`sys_user_role` (`user_id`, `role_id`)
VALUES (2, 2);

SET FOREIGN_KEY_CHECKS=1;