/*
 Navicat Premium Data Transfer

 Source Server         : local_mariadb
 Source Server Type    : MariaDB
 Source Server Version : 100338 (10.3.38-MariaDB)
 Source Host           : localhost:33066
 Source Schema         : omc_db

 Target Server Type    : MariaDB
 Target Server Version : 100338 (10.3.38-MariaDB)
 File Encoding         : 65001

 Date: 14/05/2024 11:55:53
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for mml_command
-- ----------------------------
DROP TABLE IF EXISTS `mml_command`;
CREATE TABLE `mml_command`  (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `ne_type` varchar(16) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `category` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `cat_display` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `operation` varchar(10) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `object` varchar(16) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `mml_display` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `param_json` longtext CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT NULL,
  `status` enum('Active','Inactive') CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT 'Active' COMMENT '激活: Active 未激活: Inactive',
  PRIMARY KEY (`id`) USING BTREE,
  INDEX `id`(`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1626 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of mml_command
-- ----------------------------
INSERT INTO `mml_command` VALUES (1593, 'OMC', 'neManagement', 'Network Element Management', 'lst', 'neinfo', 'List NE Information', '[{\"alias\":\"ne_type\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE type\",\"filter\":\"\",\"name\":\"netype\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"ne_id\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE ID\",\"filter\":\"\",\"name\":\"neid\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"rm_uid\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Resource management UID\",\"filter\":\"\",\"name\":\"rmuid\",\"optional\":\"true\",\"type\":\"string\"}]', 'Active');
INSERT INTO `mml_command` VALUES (1594, 'OMC', 'neManagement', 'Network Element Management', 'lst', 'memap', 'List Managed Element Map', '[{\"alias\":\"rm_uid\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Resource management UID\",\"filter\":\"\",\"name\":\"rmuid\",\"optional\":\"true\",\"type\":\"string\"}]', 'Active');
INSERT INTO `mml_command` VALUES (1595, 'OMC', 'neManagement', 'Network Element Management', 'add', 'neinfo', 'Add Network Element', '[{\"alias\":\"ne_type\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"NE type\",\"filter\":\"\",\"loc\":\"false\",\"name\":\"netype\",\"optional\":\"false\",\"type\":\"string\"},{\"alias\":\"ne_id\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"NE ID\",\"filter\":\"\",\"loc\":\"false\",\"name\":\"neid\",\"optional\":\"false\",\"type\":\"string\"},{\"alias\":\"rm_uid\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"Resource management UID\",\"filter\":\"\",\"loc\":\"false\",\"name\":\"rmuid\",\"optional\":\"false\",\"type\":\"string\"},{\"alias\":\"ip\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"IP address\",\"filter\":\"\",\"loc\":\"false\",\"name\":\"ip\",\"optional\":\"false\",\"type\":\"string\"},{\"alias\":\"port\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"Port\",\"filter\":\"\",\"loc\":\"false\",\"name\":\"port\",\"optional\":\"false\",\"type\":\"string\"},{\"alias\":\"ne_name\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"NE name\",\"filter\":\"\",\"loc\":\"false\",\"name\":\"nename\",\"optional\":\"false\",\"type\":\"string\"},{\"alias\":\"pv_flag\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"PV flag\",\"filter\":\"\",\"loc\":\"false\",\"name\":\"pvflag\",\"optional\":\"false\",\"type\":\"string\"}]', 'Active');
INSERT INTO `mml_command` VALUES (1596, 'OMC', 'neManagement', 'Network Element Management', 'mod', 'neinfo', 'Modify Network Element', '[{\"alias\":\"ne_type\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE type\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"netype\",\"optional\":\"false\",\"type\":\"string\"},{\"alias\":\"ne_id\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE ID\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"neid\",\"optional\":\"false\",\"type\":\"string\"},{\"alias\":\"rm_uid\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"Resource management UID\",\"filter\":\"\",\"loc\":\"false\",\"name\":\"rmuid\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"ip\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"IP address\",\"filter\":\"\",\"loc\":\"false\",\"name\":\"ip\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"port\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"Port\",\"filter\":\"\",\"loc\":\"false\",\"name\":\"port\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"ne_name\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"NE name\",\"filter\":\"\",\"loc\":\"false\",\"name\":\"nename\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"pv_flag\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"PV flag\",\"filter\":\"\",\"loc\":\"false\",\"name\":\"pvflag\",\"optional\":\"true\",\"type\":\"string\"}]', 'Active');
INSERT INTO `mml_command` VALUES (1597, 'OMC', 'neManagement', 'Network Element Management', 'del', 'neinfo', 'Delete Network Element', '[{\"alias\":\"ne_type\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE type\",\"filter\":\"\",\"name\":\"netype\",\"optional\":\"false\",\"type\":\"string\"},{\"alias\":\"ne_id\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE ID\",\"filter\":\"\",\"name\":\"neid\",\"optional\":\"false\",\"type\":\"string\"}]', 'Active');
INSERT INTO `mml_command` VALUES (1598, 'OMC', 'neConfigManagement', 'NE Config Parameter Management', 'dsp', 'neconfig', 'Display NE Config Parameter', '[{\"alias\":\"ne_type\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE type\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"netype\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"ne_id\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE ID\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"neid\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"top_tag\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Parameter tag\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"tag\",\"optional\":\"true\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_command` VALUES (1599, 'OMC', 'faultManagement', 'Fault Management', 'dsp', 'alarm', 'Display Alarm Information', '[{\"alias\":\"ne_type\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE type\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"netype\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"ne_id\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE UID\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"neid\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"ne_name\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE name\",\"filter\":\"\",\"name\":\"nename\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"alarm_code\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Alarm code\",\"filter\":\"\",\"name\":\"alarmcode\",\"optional\":\"true\",\"type\":\"int\"},{\"alias\":\"orig_severity\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Original severity\",\"filter\":\"{\\\"Critical\\\":\\\"Critical\\\",\\\"Major\\\":\\\"Major\\\",\\\"Minor\\\":\\\"Minor\\\",\\\"Warning\\\":\\\"Warning\\\",\\\"Event\\\":\\\"Event\\\"}\",\"name\":\"origseverity\",\"optional\":\"true\",\"type\":\"enum\"},{\"alias\":\"pv_flag\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"PV flag\",\"filter\":\"\",\"name\":\"pvflag\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"event_time\\u003e\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Alarm event start time\",\"filter\":\"\",\"name\":\"starttime\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"event_time\\u003c\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Alarm event end time\",\"filter\":\"\",\"name\":\"endtime\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"alarm_type\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Alarm type\",\"filter\":\"{\\\"CommunicationAlarm\\\":\\\"CommunicationAlarm\\\",\\\"EquipmentAlarm\\\":\\\"EquipmentAlarm\\\",\\\"ProcessingFailure\\\":\\\"ProcessingFailure\\\",\\\"EnvironmentalAlarm\\\":\\\"EnvironmentalAlarm\\\",\\\"QualityOfServiceAlarm\\\":\\\"QualityOfServiceAlarm\\\"}\",\"name\":\"alarmtype\",\"optional\":\"true\",\"type\":\"enum\"},{\"alias\":\"alarm_status\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Alarm status\",\"filter\":\"\",\"name\":\"alarmstatus\",\"optional\":\"true\",\"type\":\"int\"}]', 'Active');
INSERT INTO `mml_command` VALUES (1600, 'OMC', 'systemCommand', 'Linux System Command', 'run', 'shell', 'Run Shell Command', '[{\"alias\":\"cmd\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Shell command\",\"filter\":\"\",\"loc\":\"false\",\"name\":\"cmd\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_command` VALUES (1601, 'OMC', 'licenseManagement', 'License Management', 'dsp', 'licenseinfo', 'Display NE License Information', '[{\"alias\":\"neType\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"NE type\",\"filter\":\"\",\"name\":\"netype\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"neId\",\"comment\":\"\",\"display\":\"NE ID\",\"filter\":\"\",\"name\":\"neid\",\"optional\":\"true\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_command` VALUES (1602, 'OMC', 'licenseManagement', 'License Management', 'lst', 'license', 'List NE License Information', '[{\"alias\":\"ne_type\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE type\",\"filter\":\"\",\"name\":\"netype\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"ne_id\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE ID\",\"filter\":\"\",\"name\":\"neid\",\"optional\":\"true\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_command` VALUES (1603, 'OMC', 'licenseManagement', 'License Management', 'dep', 'license', 'Deployment NE License', '[{\"alias\":\"ne_type\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Source NE type\",\"filter\":\"\",\"name\":\"srcnetype\",\"optional\":\"false\",\"type\":\"string\"},{\"alias\":\"ne_id\",\"comment\":\"\",\"display\":\"Source NE ID\",\"filter\":\"\",\"name\":\"srcneid\",\"optional\":\"false\",\"type\":\"string\"},{\"alias\":\"ne_type\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"Destination NE type\",\"filter\":\"\",\"name\":\"dstnetype\",\"optional\":\"false\",\"type\":\"string\"},{\"alias\":\"ne_id\",\"comment\":\"\",\"display\":\"Destination NE ID\",\"filter\":\"\",\"name\":\"dstneid\",\"optional\":\"false\",\"type\":\"string\"},{\"alias\":\"dep_number\",\"comment\":\"\",\"display\":\"Deployment number\",\"filter\":\"\",\"name\":\"number\",\"optional\":\"false\",\"type\":\"int\"}]', 'Inactive');
INSERT INTO `mml_command` VALUES (1604, 'OMC', 'licenseManagement', 'License Management', 'rel', 'license', 'Batch Release NE License', '[{\"alias\":\"ne_type\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE type\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"netype\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"ne_id\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE ID\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"neid\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"capcity\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"Release number\",\"filter\":\"\",\"loc\":\"false\",\"name\":\"capcity\",\"optional\":\"false\",\"type\":\"int\"}]', 'Inactive');
INSERT INTO `mml_command` VALUES (1605, 'OMC', 'licenseManagement', 'License Management', 'ins', 'license', 'Install NE License', '[{\"alias\":\"ne_type\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE type\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"netype\",\"optional\":\"false\",\"type\":\"string\"},{\"alias\":\"ne_id\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE ID\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"neid\",\"optional\":\"false\",\"type\":\"string\"},{\"alias\":\"capcity\",\"comment\":\"\",\"display\":\"Install number\",\"filter\":\"\",\"loc\":\"false\",\"name\":\"capcity\",\"optional\":\"false\",\"type\":\"int\"}]', 'Inactive');
INSERT INTO `mml_command` VALUES (1606, 'OMC', 'licenseManagement', 'License Management', 'adj', 'license', 'Adjustment NE License', '[{\"alias\":\"ne_type\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE type\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"netype\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"ne_id\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE ID\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"neid\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"number\",\"comment\":\"\",\"display\":\"Adjustment number\",\"filter\":\"\",\"loc\":\"false\",\"name\":\"number\",\"optional\":\"false\",\"type\":\"int\"}]', 'Inactive');
INSERT INTO `mml_command` VALUES (1607, 'OMC', 'licenseManagement', 'License Management', 'exp', 'license', 'Export NE License', '[{\"alias\":\"ne_type\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE type\",\"filter\":\"\",\"name\":\"netype\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"ne_id\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE ID\",\"filter\":\"\",\"name\":\"neid\",\"optional\":\"true\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_command` VALUES (1608, 'OMC', 'licenseManagement', 'License Management', 'uni', 'license', 'Uninstall NE License', '[{\"alias\":\"ne_type\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE type\",\"filter\":\"\",\"name\":\"netype\",\"optional\":\"false\",\"type\":\"string\"},{\"alias\":\"ne_id\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE ID\",\"filter\":\"\",\"name\":\"neid\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_command` VALUES (1609, 'OMC', 'licenseManagement', 'License Management', 'dsp', 'nelink', 'Display NE Interface Link Status', '[{\"alias\":\"ne_type\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"NE type\",\"filter\":\"\",\"name\":\"netype\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"ne_id\",\"comment\":\"\",\"display\":\"NE ID\",\"filter\":\"\",\"name\":\"neid\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"interface\",\"comment\":\"\",\"display\":\"Interface\",\"filter\":\"\",\"name\":\"interface\",\"optional\":\"true\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_command` VALUES (1610, 'OMC', 'nrmManagement', 'NBI Resources Management', 'dsp', 'nbicm', 'Display NBI Resources Management', '[{\"alias\":\"ne_type\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE type\",\"filter\":\"\",\"name\":\"netype\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"ne_id\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE ID\",\"filter\":\"\",\"name\":\"neid\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"rm_uid\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Resource management UID\",\"filter\":\"\",\"name\":\"rmuid\",\"optional\":\"true\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_command` VALUES (1611, 'OMC', 'neVersionManagement', 'NE Version Management', 'upg', 'neversion', 'Upgrade NE Software Version', '[{\"alias\":\"ne_type\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE type\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"netype\",\"optional\":\"false\",\"type\":\"string\"},{\"alias\":\"ne_id\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE ID\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"neid\",\"optional\":\"false\",\"type\":\"string\"},{\"alias\":\"version\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Version\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"version\",\"optional\":\"false\",\"type\":\"string\"}]', 'Inactive');
INSERT INTO `mml_command` VALUES (1612, 'OMC', 'pmTaskManagement', 'Performance Measure Task Management', 'lst', 'measuretask', 'List Performance Measure Task', '[{\"alias\":\"id\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"Task ID\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"id\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"ne_type\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE type\",\"filter\":\"\",\"name\":\"netype\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"granul_option\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Time granularity\",\"filter\":\"\",\"name\":\"granuloption\",\"optional\":\"true\",\"type\":\"string\"}]', 'Active');
INSERT INTO `mml_command` VALUES (1613, 'OMC', 'pmTaskManagement', 'Performance Measure Task Management', 'add', 'measuretask', 'Add Performance Measure Task', '[{\"alias\":\"ne_type\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"NE type\",\"filter\":\"\",\"loc\":\"false\",\"name\":\"netype\",\"optional\":\"false\",\"type\":\"string\"},{\"alias\":\"ne_ids\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"NE ID set\",\"filter\":\"\",\"loc\":\"false\",\"name\":\"neids\",\"optional\":\"false\",\"type\":\"array\"},{\"alias\":\"granul_option\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"Granularity option\",\"filter\":\"\",\"loc\":\"false\",\"name\":\"granuloption\",\"optional\":\"false\",\"type\":\"string\"},{\"alias\":\"kpi_set\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"KPI set\",\"filter\":\"\",\"loc\":\"false\",\"name\":\"kpiset\",\"optional\":\"false\",\"type\":\"json\"},{\"alias\":\"start_time\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"Measure task start time\",\"filter\":\"\",\"loc\":\"false\",\"name\":\"starttime\",\"optional\":\"false\",\"type\":\"string\"},{\"alias\":\"end_time\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"Measure task end time\",\"filter\":\"\",\"loc\":\"false\",\"name\":\"endtime\",\"optional\":\"false\",\"type\":\"string\"}]', 'Active');
INSERT INTO `mml_command` VALUES (1614, 'OMC', 'pmTaskManagement', 'Performance Measure Task Management', 'mod', 'measuretask', 'Modify Performance Measure Task', '[{\"alias\":\"id\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"Task ID\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"id\",\"optional\":\"false\",\"type\":\"string\"},{\"alias\":\"kpi_set\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"KPI set\",\"filter\":\"\",\"loc\":\"false\",\"name\":\"kpiset\",\"optional\":\"true\",\"type\":\"json\"},{\"alias\":\"start_time\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"Measure task start time\",\"filter\":\"\",\"loc\":\"false\",\"name\":\"starttime\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"end_time\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"Measure task end time\",\"filter\":\"\",\"loc\":\"false\",\"name\":\"endtime\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"granul_option\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"granularity option\",\"filter\":\"\",\"loc\":\"false\",\"name\":\"granuloption\",\"optional\":\"true\",\"type\":\"string\"}]', 'Active');
INSERT INTO `mml_command` VALUES (1615, 'OMC', 'pmTaskManagement', 'Performance Measure Task Management', 'del', 'measuretask', 'Delete Performance Measure Task', '[{\"alias\":\"id\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"Task ID\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"id\",\"optional\":\"false\",\"type\":\"string\"}]', 'Active');
INSERT INTO `mml_command` VALUES (1616, 'OMC', 'pmTaskManagement', 'Performance Measure Task Management', 'act', 'measuretask', 'Active Performance Measure Task', '[{\"alias\":\"id\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"Task ID\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"id\",\"optional\":\"false\",\"type\":\"string\"}]', 'Active');
INSERT INTO `mml_command` VALUES (1617, 'OMC', 'pmTaskManagement', 'Performance Measure Task Management', 'dea', 'measuretask', 'Deactive Performance Measure Task', '[{\"alias\":\"id\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"Task ID\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"id\",\"optional\":\"false\",\"type\":\"string\"}]', 'Active');
INSERT INTO `mml_command` VALUES (1618, 'OMC', 'pmDataManagement', 'Performance Data Management', 'lst', 'measuredata', 'List Performance Data', '[{\"alias\":\"task_id\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"Task ID\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"id\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"ne_type\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE type\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"netype\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"kpi_id\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE type\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"kpiid\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"start_time\\u003e\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"Measure period start time(\\u003e=)\",\"filter\":\"\",\"name\":\"starttime\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"start_time\\u003c\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"Measure period start time(\\u003c=)\",\"filter\":\"\",\"name\":\"endtime\",\"optional\":\"true\",\"type\":\"string\"}]', 'Active');
INSERT INTO `mml_command` VALUES (1619, 'OMC', 'logManagement', 'Log Management', 'lst', 'systemlog', 'List System Log', '[{\"alias\":\"process_type\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Process type\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"processtype\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"log_time\\u003e\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Log time more than\",\"filter\":\"\",\"name\":\"starttime\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"log_time\\u003c\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Log time less than\",\"filter\":\"\",\"name\":\"endtime\",\"optional\":\"true\",\"type\":\"string\"}]', 'Active');
INSERT INTO `mml_command` VALUES (1620, 'OMC', 'logManagement', 'Log Management', 'lst', 'operationlog', 'List Operation Log', '[{\"alias\":\"account_name\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Account ID\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"accountid\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"log_time\\u003e\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Log time more than\",\"filter\":\"\",\"name\":\"starttime\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"log_time\\u003c\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Log Time Less Than\",\"filter\":\"\",\"name\":\"endtime\",\"optional\":\"true\",\"type\":\"string\"}]', 'Active');
INSERT INTO `mml_command` VALUES (1621, 'OMC', 'logManagement', 'Log Management', 'lst', 'securitylog', 'List Security Log', '[{\"alias\":\"account_name\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Account ID\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"accountid\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"op_time\\u003e\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Log time more than\",\"filter\":\"\",\"name\":\"starttime\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"op_time\\u003c\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Log time less than\",\"filter\":\"\",\"name\":\"endtime\",\"optional\":\"true\",\"type\":\"string\"}]', 'Active');
INSERT INTO `mml_command` VALUES (1622, 'OMC', 'logManagement', 'Log Management', 'lst', 'alarmlog', 'List Alarm Log', '[{\"alias\":\"ne_type\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE type\",\"filter\":\"\",\"name\":\"netype\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"log_time\\u003e\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Log time(\\u003e=)\",\"filter\":\"\",\"name\":\"starttime\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"log_time\\u003c\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Log time less than\",\"filter\":\"\",\"name\":\"endtime\",\"optional\":\"true\",\"type\":\"string\"}]', 'Active');
INSERT INTO `mml_command` VALUES (1623, 'OMC', 'logManagement', 'Log Management', 'lst', 'eventlog', 'List NE Event Log', '[{\"alias\":\"ne_type\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE type\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"netype\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"ne_id\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"NE ID\",\"filter\":\"\",\"loc\":\"true\",\"name\":\"neid\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"log_time\\u003e\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Log time(\\u003e=)\",\"filter\":\"\",\"name\":\"starttime\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"log_time\\u003c\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Log time(\\u003c=)\",\"filter\":\"\",\"name\":\"endtime\",\"optional\":\"true\",\"type\":\"string\"}]', 'Active');
INSERT INTO `mml_command` VALUES (1624, 'OMC', 'mmlManagement', 'MML Management', 'lst', 'mmlcmd', 'List MML Command', '[{\"alias\":\"ne_type\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Category\",\"filter\":\"\",\"name\":\"category\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"operation\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Operation\",\"filter\":\"\",\"name\":\"operation\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"object\",\"apostr\":\"true\",\"comment\":\"\",\"display\":\"Object\",\"filter\":\"\",\"name\":\"object\",\"optional\":\"true\",\"type\":\"string\"}]', 'Active');
INSERT INTO `mml_command` VALUES (1625, 'OMC', 'systemManagement', 'System Management', 'dsp', 'sysinfo', 'Display NE System Information', '[{\"alias\":\"neType\",\"apostr\":\"false\",\"comment\":\"\",\"display\":\"NE type\",\"filter\":\"\",\"name\":\"netype\",\"optional\":\"true\",\"type\":\"string\"},{\"alias\":\"neId\",\"comment\":\"\",\"display\":\"NE ID\",\"filter\":\"\",\"name\":\"neid\",\"optional\":\"true\",\"type\":\"string\"}]', 'Active');

SET FOREIGN_KEY_CHECKS = 1;
