/*
 Navicat Premium Data Transfer

 Source Server         : local_mariadb
 Source Server Type    : MariaDB
 Source Server Version : 100338 (10.3.38-MariaDB)
 Source Host           : localhost:33066
 Source Schema         : omc_db

 Target Server Type    : MariaDB
 Target Server Version : 100338 (10.3.38-MariaDB)
 File Encoding         : 65001

 Date: 25/09/2023 11:48:44
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for trace_data
-- ----------------------------
DROP TABLE IF EXISTS `trace_data`;
CREATE TABLE `trace_data`  (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `task_id` int(11) NULL DEFAULT NULL,
  `imsi` varchar(16) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `msisdn` varchar(16) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `src_addr` varchar(128) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `dst_addr` varchar(128) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `if_type` int(11) NULL DEFAULT 0,
  `msg_type` int(11) NULL DEFAULT NULL,
  `msg_direct` int(11) NULL DEFAULT NULL,
  `timestamp` bigint(20) NULL DEFAULT NULL,
  `raw_msg` blob NULL DEFAULT NULL,
  `dec_msg` blob NULL DEFAULT NULL,
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 311486 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
