/*
 Navicat Premium Data Transfer

 Source Server         : root@192.168.0.229
 Source Server Type    : MariaDB
 Source Server Version : 100335 (10.3.35-MariaDB)
 Source Host           : 192.168.0.229:33066
 Source Schema         : omc_db

 Target Server Type    : MariaDB
 Target Server Version : 100335 (10.3.35-MariaDB)
 File Encoding         : 65001

 Date: 25/07/2023 17:40:06
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for session
-- ----------------------------
DROP TABLE IF EXISTS `session`;
CREATE TABLE `session`  (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `account_id` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `name` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `host` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `access_token` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `expires` int(11) NULL DEFAULT NULL,
  `status` enum('online','offline') CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT 'online',
  `login_time` datetime NULL DEFAULT current_timestamp(),
  `shake_time` datetime NULL DEFAULT NULL,
  `logout_time` datetime NULL DEFAULT NULL,
  PRIMARY KEY (`id`) USING BTREE,
  INDEX `idx_token`(`access_token`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 235 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
