--
-- Table structure for table `udm_volte`
--
DROP TABLE IF EXISTS `udm_volte`; 
CREATE TABLE `udm_volte` (
  `id` int NOT NULL AUTO_INCREMENT COMMENT '主键',
  `ne_id` bigint DEFAULT '0' COMMENT '网元ID',
  `imsi` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL COMMENT 'SIM卡/USIM卡ID',
  `msisdn` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '用户电话号码',
  `tag` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '0=VoIP, 1=VoLTE',
  `vni` varchar(128) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT 'VNI',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE KEY `uk_udm_volte_ne_imsi` (`ne_id`,`imsi`) USING BTREE COMMENT '唯一索引-网元_IMSI'
) ENGINE=InnoDB AUTO_INCREMENT=1 DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci COMMENT='UDM用户数据_VoLTE用户';
