--
-- Table structure for table `ne_config_backup`
--
DROP TABLE IF EXISTS `ne_config_backup`;
CREATE TABLE `ne_config_backup` (
  `id` bigint NOT NULL AUTO_INCREMENT,
  `ne_id` bigint DEFAULT '0' COMMENT '网元ID',
  `name` varchar(128) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '-' COMMENT '压缩包名称',
  `path` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '压缩包位置',
  `remark` varchar(400) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '备注',
  `create_by` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '创建者',
  `create_time` bigint DEFAULT '0' COMMENT '创建时间',
  `update_by` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '更新者',
  `update_time` bigint DEFAULT '0' COMMENT '更新时间',
  PRIMARY KEY (`id`) USING BTREE,
  KEY `idx_cfgbak_ne_name` (`ne_id`,`name`) USING BTREE COMMENT '索引-网元_包名'
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci COMMENT='网元_配置文件备份记录';
