/*
 Navicat Premium Data Transfer

 Source Server         : 192.168.0.229
 Source Server Type    : MySQL
 Source Server Version : 100335
 Source Host           : 192.168.0.229:33066
 Source Schema         : omc_db

 Target Server Type    : MySQL
 Target Server Version : 100335
 File Encoding         : 65001

 Date: 17/08/2023 18:25:09
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for monitor_warn
-- ----------------------------
DROP TABLE IF EXISTS `monitor_warn`;
CREATE TABLE `monitor_warn`  (
  `id` int(11) UNSIGNED NOT NULL AUTO_INCREMENT COMMENT 'id',
  `created_at` datetime(0) NULL DEFAULT NULL COMMENT '创建时间',
  `updated_at` datetime(0) NULL DEFAULT NULL COMMENT '更新时间',
  `title` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '类型标题',
  `warn_type` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '告警类型',
  `value` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '阈值',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci COMMENT = '监控_指标阈值告警' ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
