-- ----------------------------
-- Table structure for nbi_operation_log
-- ----------------------------
DROP TABLE IF EXISTS "nbi_operation_log";
CREATE TABLE "nbi_operation_log" (
  "id" integer NOT NULL,
  "src_ip" text(64),
  "op_user" text(32),
  "dst_ip" text(64),
  "op_type" text(32),
  "op_proto" text(32),
  "op_params" text(255),
  "op_result" text(64),
  "op_time" text,
  "log_time" text,
  "created_at" text,
  "pri" text,
  "vendor" text,
  "ne_name" text,
  "rm_uid" text,
  "ne_type" text,
  "log_type" text,
  "user_name" text,
  "terminal_ip" text,
  "start_time" text,
  "end_time" text,
  "oper_type" text,
  "risk_level" text,
  "oper_content" text,
  "oper_result" text,
  "failure_cause" text,
  PRIMARY KEY ("id")
);

-- ----------------------------
-- Records of nbi_operation_log
-- ----------------------------
