SET FOREIGN_KEY_CHECKS=0;

CREATE TABLE IF NOT EXISTS `ne_host_cmd`  (
  `cmd_id` bigint NOT NULL AUTO_INCREMENT COMMENT '命令主键',
  `cmd_type` varchar(16) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT '命令类型',
  `group_id` char(1) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '0' COMMENT '分组（0默认 1快速命令）',
  `title` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT '标题名称',
  `command` varchar(500) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT '命令字符串',
  `remark` varchar(500) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '备注',
  `create_by` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT '创建者',
  `create_time` bigint NULL DEFAULT 0 COMMENT '创建时间',
  `update_by` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT '更新者',
  `update_time` bigint NULL DEFAULT 0 COMMENT '更新时间',
  PRIMARY KEY (`cmd_id`) USING BTREE,
  UNIQUE INDEX `uk_type_group_title`(`cmd_type` ASC, `group_id` ASC, `title` ASC) USING BTREE COMMENT '同组内名称唯一'
) ENGINE = InnoDB AUTO_INCREMENT = 10 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci COMMENT = '网元主机命令表' ROW_FORMAT = DYNAMIC;

-- 初始记录

SET FOREIGN_KEY_CHECKS=1;    