-- ----------------------------
-- Table structure for ne_info
-- ----------------------------
DROP TABLE IF EXISTS "ne_info";
CREATE TABLE "ne_info" (
  "id" integer NOT NULL,
  "ne_type" text(32) NOT NULL,
  "ne_id" text(32) NOT NULL,
  "rm_uid" text(40),
  "ne_name" text(64),
  "ip" text(128),
  "port" integer(11),
  "pv_flag" text(32),
  "province" text(32),
  "vendor_name" text(64),
  "dn" text(255),
  "ne_address" text(64),
  "host_ids" text(64),
  "status" integer(11),
  "remark" text(255),
  "create_by" text(50),
  "create_time" integer(20),
  "update_by" text(50),
  "update_time" integer(20),
  PRIMARY KEY ("id")
);

-- ----------------------------
-- Indexes structure for table ne_info
-- ----------------------------
CREATE UNIQUE INDEX "ux_netype_neid"
ON "ne_info" (
  "ne_type" ASC,
  "ne_id" ASC
);

-- ----------------------------
-- Records of ne_info
-- ----------------------------
INSERT INTO "ne_info" VALUES (1, 'OMC', '001', '4400HXOMC001', 'OMC_001', '172.16.5.100', 33030, 'PNF', 'AreaNet', '-', '-', '-', '1,2', 0, '', 'system', 1713928436971, '', 0);
INSERT INTO "ne_info" VALUES (2, 'IMS', '001', '4400HXIMS001', 'IMS_001', '172.16.5.110', 33030, 'PNF', 'AreaNet', '-', '-', '-', '3,4', 0, '', 'system', 1713928436971, '', 0);
INSERT INTO "ne_info" VALUES (3, 'AMF', '001', '4400HXAMF001', 'AMF_001', '172.16.5.120', 33030, 'PNF', 'AreaNet', '-', '-', '', '5,6', 0, '', 'system', 1713928436971, '', 0);
INSERT INTO "ne_info" VALUES (4, 'AUSF', '001', '4400HXAUSF001', 'AUSF_001', '172.16.5.130', 33030, 'PNF', 'AreaNet', '-', '-', '', '7,8', 0, '', 'system', 1713928436971, '', 0);
INSERT INTO "ne_info" VALUES (5, 'UDM', '001', '4400HXUDM001', 'UDM_001', '172.16.5.140', 33030, 'PNF', 'AreaNet', '-', '-', '-', '9,10,11', 0, '', 'system', 1713928436971, '', 0);
INSERT INTO "ne_info" VALUES (6, 'SMF', '001', '4400HXSMF001', 'SMF_001', '172.16.5.150', 33030, 'PNF', 'AreaNet', '-', '-', '-', '12,13', 0, '', 'system', 1713928436971, '', 0);
INSERT INTO "ne_info" VALUES (7, 'PCF', '001', '4400HXPCF001', 'PCF_001', '172.16.5.160', 33030, 'PNF', 'AreaNet', '-', '-', '-', '14,15', 0, '', 'system', 1713928436971, '', 0);
INSERT INTO "ne_info" VALUES (10, 'UPF', '001', '4400HXUPF001', 'UPF_001', '172.16.5.190', 33030, 'PNF', 'AreaNet', '-', '-', '', '20,21,22', 0, '', 'system', 1713928436971, '', 0);
